en-us	##### Incoming connections  It is a bit more complicated with incoming connections because rules are specific for components and configuration.  For Zabbix **agent**:  |Agent connection setup|Cipher configuration| |----------------------|--------------------| |TLSConnect=cert|TLSCipherCert, TLSCipherCert13| |TLSConnect=psk|TLSCipherPSK, TLSCipherPSK13| |TLSAccept=cert|TLSCipherCert, TLSCipherCert13| |TLSAccept=psk|TLSCipherPSK, TLSCipherPSK13| |TLSAccept=cert,psk|TLSCipherAll, TLSCipherAll13|  For Zabbix **server** and \*\* proxy\*\*:  |Connection setup|Cipher configuration| |----------------|--------------------| |Outgoing connections using PSK|TLSCipherPSK, TLSCipherPSK13| |Incoming connections using certificates|TLSCipherAll, TLSCipherAll13| |Incoming connections using PSK if server has no certificate|TLSCipherPSK, TLSCipherPSK13| |Incoming connections using PSK if server has certificate|TLSCipherAll, TLSCipherAll13|  Some pattern can be seen in the two tables above:  -   TLSCipherAll and TLSCipherAll13 can be specified only if a combined     list of certificate- **and** PSK-based ciphersuites is used. There     are two cases when it takes place: server (proxy) with a configured     certificate (PSK ciphersuites are always configured on server, proxy     if crypto library supports PSK), agent configured to accept both     certificate- and PSK-based incoming connections -   in other cases TLSCipherCert\* and/or TLSCipherPSK\* are sufficient  The following tables show the `TLSCipher*` built-in default values. They could be a good starting point for your own custom values.  |Parameter|GnuTLS 3.6.12| |---------|----------------------------------------| |TLSCipherCert|NONE:+VERS-TLS1.2:+ECDHE-RSA:+RSA:+AES-128-GCM:+AES-128-CBC:+AEAD:+SHA256:+SHA1:+CURVE-ALL:+COMP-NULL:+SIGN-ALL:+CTYPE-X.509| |TLSCipherPSK|NONE:+VERS-TLS1.2:+ECDHE-PSK:+PSK:+AES-128-GCM:+AES-128-CBC:+AEAD:+SHA256:+SHA1:+CURVE-ALL:+COMP-NULL:+SIGN-ALL| |TLSCipherAll|NONE:+VERS-TLS1.2:+ECDHE-RSA:+RSA:+ECDHE-PSK:+PSK:+AES-128-GCM:+AES-128-CBC:+AEAD:+SHA256:+SHA1:+CURVE-ALL:+COMP-NULL:+SIGN-ALL:+CTYPE-X.509|  |Parameter|OpenSSL 1.1.1d ^**1**^| |---------|----------------------------------------| |TLSCipherCert13|<| |TLSCipherCert|EECDH+aRSA+AES128:RSA+aRSA+AES128| |TLSCipherPSK13|TLS\_CHACHA20\_POLY1305\_SHA256:TLS\_AES\_128\_GCM\_SHA256| |TLSCipherPSK|kECDHEPSK+AES128:kPSK+AES128| |TLSCipherAll13|<| |TLSCipherAll|EECDH+aRSA+AES128:RSA+aRSA+AES128:kECDHEPSK+AES128:kPSK+AES128|  ^**1**^ Default values are different for older OpenSSL versions (1.0.1, 1.0.2, 1.1.0), for LibreSSL and if OpenSSL is compiled without PSK support.  \*\* Examples of user-configured ciphersuites \*\*  See below the following examples of user-configured ciphersuites:  -   [Testing cipher strings and allowing only PFS     ciphersuites](#testing_cipher_strings_and_allowing_only_pfs_ciphersuites) -   [Switching from AES128 to AES256](#switching_from_aes128_to_aes256)
zh-cn	 ##### 传入连接  对于传入连接来说，这有点复杂，因为规则是特定于组件和配置的。  对 Zabbix **agent**:  |Agent 连接步骤|密码配置| |----------------------|--------------------| |TLSConnect=cert|TLSCipherCert, TLSCipherCert13| |TLSConnect=psk|TLSCipherPSK, TLSCipherPSK13| |TLSAccept=cert|TLSCipherCert, TLSCipherCert13| |TLSAccept=psk|TLSCipherPSK, TLSCipherPSK13| |TLSAccept=cert,psk|TLSCipherAll, TLSCipherAll13|  对 Zabbix **server** 和\*\*proxy\*\* :  |连接步骤|密码配置| |----------------|--------------------| |Outgoing connections using PSK|TLSCipherPSK, TLSCipherPSK13| |Incoming connections using certificates|TLSCipherAll, TLSCipherAll13| |Incoming connections using PSK if server has no certificate|TLSCipherPSK, TLSCipherPSK13| |Incoming connections using PSK if server has certificate|TLSCipherAll, TLSCipherAll13|  在上面的两个表中可以看到一些模式:  -  TLSCipherAll和TLSCipherAll13只能在使用基于证书**和** PSK加密套件的组合列表时指定。发生这种情况有两种情况:server(proxy)配置证书(PSK密码套件总是在server、proxy上配置如果加密库支持PSK)，agent被配置为接受基于证书和基于PSK的传入连接 -   在其他情况下，TLSCipherCert和/或TLSCipherPSK\*就足够了  下表显示了' TLSCipher* '的内置默认值。 对于您自己的定制值来说，它们可能是一个很好的起点。  |参数|GnuTLS 3.6.12| |---------|-------------| |TLSCipherCert|NONE:+VERS-TLS1.2:+ECDHE-RSA:+RSA:+AES-128-GCM:+AES-128-CBC:+AEAD:+SHA256:+SHA1:+CURVE-ALL:+COMP-NULL:+SIGN-ALL:+CTYPE-X.509| |TLSCipherPSK|NONE:+VERS-TLS1.2:+ECDHE-PSK:+PSK:+AES-128-GCM:+AES-128-CBC:+AEAD:+SHA256:+SHA1:+CURVE-ALL:+COMP-NULL:+SIGN-ALL| |TLSCipherAll|NONE:+VERS-TLS1.2:+ECDHE-RSA:+RSA:+ECDHE-PSK:+PSK:+AES-128-GCM:+AES-128-CBC:+AEAD:+SHA256:+SHA1:+CURVE-ALL:+COMP-NULL:+SIGN-ALL:+CTYPE-X.509|  |参数|OpenSSL 1.1.1d ^**1**^| |---------|----------------------| |TLSCipherCert13|<| |TLSCipherCert|EECDH+aRSA+AES128:RSA+aRSA+AES128| |TLSCipherPSK13|TLS\_CHACHA20\_POLY1305\_SHA256:TLS\_AES\_128\_GCM\_SHA256| |TLSCipherPSK|kECDHEPSK+AES128:kPSK+AES128| |TLSCipherAll13|<| |TLSCipherAll|EECDH+aRSA+AES128:RSA+aRSA+AES128:kECDHEPSK+AES128:kPSK+AES128|  ^**1**^ 对于较早的OpenSSL版本(1.0.1,1.0.2,1.1.0)，对于LibreSSL和如果在没有PSK支持的情况下编译OpenSSL，默认值是不同的。  **用户配置的密码套件示例**  请参阅以下用户配置的密码套件示例:  -   [测试密码字符串并只允许PFS密码套件](#testing_cipher_strings_and_allowing_only_pfs_ciphersuites) -   [从AES128切换到AES256](#switching_from_aes128_to_aes256)

en-us	Incoming traffic statistics on network interface. Returns integer
zh-cn	网络接口上传流量统计。返回 整数

en-us	Incorrect %1$s label type value for map "%2$s".
zh-cn	映射 "%2$s" 中存在错误的 %1$s 标签类型数据.

en-us	Incorrect acceptable SLA for service "%1$s".
zh-cn	服务 "%1$s" 存在错误的可接受的 SLA.

en-us	Incorrect acknowledgement action operationid.
zh-cn	哇哦。这个确认操作不正确！

en-us	Incorrect action condition discovery check.
zh-cn	探索检查存在错误的动作情况.

en-us	Incorrect action condition discovery check. Discovery check does not exist or you have no access to it.
zh-cn	探索检查存在错误的动作情况. 探索检查不存在或您没有访问权.

en-us	Incorrect action condition discovery object.
zh-cn	不正确的动作条件发现对象。

en-us	Incorrect action condition discovery rule. Discovery rule does not exist or you have no access to it.
zh-cn	不正确的动作条件自动发现规则. 自动发现规则不存在或您不能访问它.

en-us	Incorrect action condition discovery status.
zh-cn	错误的动作条件探索状态.

en-us	Incorrect action condition event type.
zh-cn	错误的动作条件时间类型.

en-us	Incorrect action condition host group. Host group does not exist or you have no access to it.
zh-cn	错误的动作条件主机群组. 主机群组不存在或您不能访问它.

en-us	Incorrect action condition host. Host does not exist or you have no access to it.
zh-cn	错误的动作条件主机. 主机不存在或您不能访问它.

en-us	Incorrect action condition port "%1$s".
zh-cn	错误的动作条件端口"%1$s".

en-us	Incorrect action condition proxy. Proxy does not exist or you have no access to it.
zh-cn	不正确的动作条件agent代理程序. agent代理程序不存在或您没有存取权.

en-us	Incorrect action condition template. Template does not exist or you have no access to it.
zh-cn	错误的动作条件模板. 模板不存在或您没有访问权.

en-us	Incorrect action condition trigger severity.
zh-cn	错误的操作条件触发器严重性.

en-us	Incorrect action condition trigger. Trigger does not exist or you have no access to it.
zh-cn	错误的动作条件触发器. 触发器不存在或您没有访问权.

en-us	Incorrect action condition type.
zh-cn	错误的动作条件类型.

en-us	Incorrect action operation command type.
zh-cn	错误的动作操作命令类型.

en-us	Incorrect action operation condition acknowledge type.
zh-cn	错误的动作操作条件确认类型.

en-us	Incorrect action operation condition type.
zh-cn	错误的动作操作条件类型.

en-us	Incorrect action operation escalation step values.
zh-cn	错误的动作操作升级步骤值.

en-us	Incorrect action operation host group. Host group does not exist or you have no access to this host group.
zh-cn	错误的动作操作主机群组. 主机群组不存在或您没有访问权限.

en-us	Incorrect action operation host. Host does not exist or you have no access to this host.
zh-cn	错误的动作操作主机. 主机不存在或您没有访问权限.

en-us	Incorrect action operationid.
zh-cn	错误的动作操作ID.

en-us	Incorrect action operation port "%s".
zh-cn	不正确的动作操作端口"%s"。

en-us	Incorrect action operation template. Template does not exist or you have no access to this template.
zh-cn	错误的模板操作。 模板不存在或您无权访问此模板。

en-us	Incorrect action operation type "%1$s" for event source "%2$s".
zh-cn	在事件源 "%2$s" 中有错误的动作类型 "%1$s" 

en-us	Incorrect action operation user group. User group does not exist or you have no access to this user group.
zh-cn	错误的动作操作用户群组. 用户群组不存在或您没有访问权.

en-us	Incorrect action operation user. User does not exist or you have no access to this user.
zh-cn	错误的动作操作用户. 用户不存在或您没有访问权.

en-us	Incorrect algorithm for service "%1$s".
zh-cn	服务"%1$s" 配置了错误的算法.

en-us	Incorrect API "%1$s".
zh-cn	不正确的API接口 "%1$s"

en-us	Incorrect arguments passed to function
zh-cn	函数传入了错误的参数

en-us	Incorrect arguments passed to function.
zh-cn	函数传入了错误的参数。

en-us	Incorrect arguments passed to method.
zh-cn	方法传入了错误的参数。

en-us	Incorrect authentication protocol for item "%1$s".
zh-cn	监控项"%1$s" 出现了错误的身份验证协议.

en-us	Incorrect bulk value for interface.
zh-cn	接口的值不正确

en-us	Incorrect calculate SLA value for service "%1$s".
zh-cn	服务"%1$s"出现了错误的计算SLA值.

en-us	Incorrect characters used for host name "%s".
zh-cn	错误的字符串用于主机名称"%s".

en-us	Incorrect characters used for proxy name "%1$s".
zh-cn	代理名"%1$s" 使用了错误的字符.

en-us	Incorrect characters used for template name "%1$s".
zh-cn	模板名称"%1$s"使用了不正确的名称.

en-us	Incorrect conditions for action "%1$s".
zh-cn	动作"%1$s"的条件不正确

en-us	Incorrect conditions for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的条件不正确.

en-us	Incorrect correlation ID.
zh-cn	错误的关联项ID。

en-us	Incorrect custom expression "%2$s" for action "%1$s": %3$s.
zh-cn	动作"%1$s": %3$s自定义的表达式"%2$s" 不正确.

en-us	Incorrect custom expression "%2$s" for correlation "%1$s": %3$s.
zh-cn	在关联项"%1$s": %3$s中使用了错误的表达式"%2$s"。

en-us	Incorrect custom expression "%2$s" for discovery rule "%1$s": %3$s.
zh-cn	自动发现规则"%1$s": %3$s自定义的表达式 "%2$s"不正确.

en-us	Incorrect data.
zh-cn	数据错误。

en-us	incorrect element count
zh-cn	错误的元素

en-us	Incorrect evaltype value.
zh-cn	评估类型的值不正确。

en-us	Incorrect event object "%1$s" (%2$s) for event source "%3$s" (%4$s), only the following objects are supported: %5$s.
zh-cn	错误的事件对象 "%1$s" (%2$s)对于事件源"%3$s" (%4$s),只有以下对象的支持:%5$s.

en-us	Incorrect eventobject value.
zh-cn	错误的事件对象值.

en-us	Incorrect eventsource value.
zh-cn	错误的事件源的值.

en-us	Incorrect field "%1$s" name or value in where statement for table "%2$s".
zh-cn	不正确的栏位名称"%1$s"或用于资料表"%2$s"的where描述式的值.

en-us	Incorrect fields for sysmap.
zh-cn	错误的sysmap字段.

en-us	Incorrect file upload.
zh-cn	错误的文件上传.

en-us	Incorrect filter condition formula ID for action "%1$s".
zh-cn	动作"%1$s"的过滤器条件计算式ID不正确.

en-us	Incorrect filter condition formula ID for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的条件计算式ID不正确.

en-us	Incorrect filter condition formula ID given for correlation "%1$s".
zh-cn	错误的过滤条件公式给出相关ID "%1$s" 。

en-us	Incorrect filter condition macro for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的过滤器条件宏变量不正确

en-us	Incorrect filter condition operator for action "%1$s".
zh-cn	动作"%1$s"过滤器条件行为不正确.

en-us	Incorrect filter condition operator for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的过滤器条件行为不正确

en-us	Incorrect filter condition type for action "%1$s".
zh-cn	动作"%1$s"的过滤器条件类型不正确

en-us	Incorrect function is used
zh-cn	使用了错误的函数

en-us	Incorrect graph ID "%1$s" provided for screen element.
zh-cn	聚合图形元素中使用了不正确的数据图ID"%1$s"

en-us	Incorrect graph prototype ID "%1$s" provided for screen element.
zh-cn	聚合图形元素中使用了不正确的数据图模板ID"%1$s"。

en-us	Incorrect "height" value for map "%1$s".
zh-cn	拓扑图 "%1$s" 高度值错误。

en-us	Incorrect host group.
zh-cn	错误的主机群组.

en-us	Incorrect host group ID "%1$s" provided for screen element.
zh-cn	聚合图形元素使用了不正确主机组ID "%1$s"。

en-us	Incorrect host ID "%1$s" provided for screen element.
zh-cn	聚合图形中使用了不正确的主机ID"%1$s"。

en-us	Incorrect image index.
zh-cn	错误的图片索引

en-us	Incorrect input parameters.
zh-cn	不正确的输入参数

en-us	Incorrect interface DNS parameter "%s" provided.
zh-cn	提供了错误的DNS参数"%s".

en-us	Incorrect interface port "%s" provided.
zh-cn	提供了错误的端口"%s".

en-us	Incorrect inventory field "%s".
zh-cn	错误的资产纪录栏位"%s".

en-us	Incorrect inventory mode in action operation.
zh-cn	要执行的动作库存方式是不正确的。

en-us	Incorrect item for axis value.
zh-cn	错误的项目轴线值.

en-us	Incorrect item ID "%1$s" provided for screen element.
zh-cn	聚合图形元素应用了不正确的监控项目ID "%1$s" 。

en-us	Incorrect item key "%1$s" provided for trigger expression on "%2$s".
zh-cn	提供错误的项目键值"%1$s"给"%2$s"上的触发器表达式.

en-us	Incorrect item prototype ID "%1$s" provided for screen element.
zh-cn	图表元素应用了不正确的监控项目模板ID"%1$s" 

en-us	Incorrect item value type
zh-cn	项目的数据类型不正确

en-us	Incorrect item value type "%1$s" provided for trigger function "%2$s".
zh-cn	提供错误的项目值类型"%1$s"给触发器函数"%2$s".

en-us	Incorrect list of items.
zh-cn	错误的监控项列表

en-us	Incorrect maintenance date
zh-cn	错误的维护日期

en-us	Incorrect maintenance - date must be between 1970.01.01 and 2038.01.18
zh-cn	错误的维护-日期必须在1970.01.01和2038.01.18之间

en-us	Incorrect maintenance day period
zh-cn	错误的维护期间 

en-us	Incorrect maintenance days of week
zh-cn	错误的周维护日数

en-us	Incorrect maintenance month period
zh-cn	错误的维护月期间

en-us	Incorrect maintenance period
zh-cn	错误的维护期间 

en-us	Incorrect maintenance period (minimum 5 minutes)
zh-cn	错误的维护期间(至少要5分钟)

en-us	Incorrect maintenance week period
zh-cn	错误的维护周期间

en-us	Incorrect map ID.
zh-cn	错误的拓扑图ID

en-us	Incorrect map ID "%1$s" provided for screen element.
zh-cn	图表元素中应用了不正确的拓扑图ID"%1$s"

en-us	Incorrect max columns provided for screen element.
zh-cn	聚合图形的最大列数不正确.

en-us	Incorrect media type ID.
zh-cn	错误的 媒介类型ID

en-us	Incorrect method "%1$s.%2$s".
zh-cn	不正确的方法 "%1$s.%2$s".

en-us	Incorrect object value.
zh-cn	错误的对象值.

en-us	Incorrect parameter for action "%1$s".
zh-cn	动作"%1$s" 使用了错误的参数.

en-us	Incorrect parameter for operations.
zh-cn	错误的操作参数.

en-us	Incorrect parameters for action update method "%1$s".
zh-cn	动作更新方法"%1$s"使用了不正确的参数.

en-us	Incorrect parameters for condition.
zh-cn	错误的条件参数.

en-us	Incorrect parameters for maintenance.
zh-cn	错误的维护参数.

en-us	Incorrect parent for service "%1$s".
zh-cn	错误的服务"%1$s"的上层

en-us	Incorrect parent service.
zh-cn	错误的上层服务.

en-us	Incorrect "permission" value "%1$s" in user groups for map "%2$s".
zh-cn	拓扑图 "%2$s" 用户组 "permission" 的值 "%1$s" 冲突

en-us	Incorrect "permission" value "%1$s" in user groups for screen "%2$s".
zh-cn	聚合图形 "%2$s" 用户组 "permission" 的值 "%1$s" 冲突

en-us	Incorrect "permission" value "%1$s" in users for map "%2$s".
zh-cn	拓扑图 "%2$s" 用户 "permission" 的值 "%1$s" 冲突

en-us	Incorrect "permission" value "%1$s" in users for screen "%2$s".
zh-cn	聚合图形 "%2$s" 权限值 "%1$s" 异常。

en-us	Incorrect port range.
zh-cn	错误的端口范围.

en-us	Incorrect privacy protocol for item "%1$s".
zh-cn	错误的隐私协议对于监控项"%1$s".

en-us	Incorrect "private" value "%1$s" for map "%2$s".
zh-cn	拓扑图 "%2$s" 的"private" “%1$s" 值错误。

en-us	Incorrect "private" value "%1$s" for screen "%2$s".
zh-cn	聚合图形 "%2$s" 的"private" 值 "%1$s" 异常。

en-us	Incorrect regular expression "%1$s": "%2$s"
zh-cn	不正确的正则表达式 "%1$s": "%2$s"

en-us	Incorrect resource type provided for screen item.
zh-cn	提供了不正确的资源类型给聚合图形项目.

en-us	Incorrect response received from Zabbix server "%1$s".
zh-cn	收到了来自于zabbix服务器"%1$s"的错误应答.

en-us	Incorrect screen ID.
zh-cn	不正确的聚合图形ID

en-us	Incorrect screen ID "%1$s" provided for screen element.
zh-cn	聚合图形应用了不正确的聚合图形ID "%1$s"

en-us	Incorrect screen provided for slide show.
zh-cn	用于聚合图形的不正确聚合图形。

en-us	Incorrect service end time.
zh-cn	错误的服务终止时间.

en-us	Incorrect service start time.
zh-cn	错误的服务开始时间.

en-us	Incorrect service time type.
zh-cn	错误的服务时间类型.

en-us	Incorrect SNMP community.
zh-cn	错误的SNMP community.

en-us	Incorrect SNMP OID.
zh-cn	错误的SNMP OID

en-us	Incorrect "soft" field value for dependency for service "%1$s".
zh-cn	在服务 "%1$s" 依赖了"soft"栏位的错误数据.

en-us	Incorrect sort order for service "%1$s".
zh-cn	服务"%1$s" 中的排序不正确。

en-us	Incorrect source value.
zh-cn	错误的源值.

en-us	Incorrect status for host "%1$s".
zh-cn	主机"%1$s"的状态值不正确.

en-us	Incorrect status for service "%1$s".
zh-cn	服务"%1$s"存在错误的状态.

en-us	Incorrect style provided for screen element.
zh-cn	指定的聚合图形元素样式不正确.

en-us	incorrect syntax near "%1$s"
zh-cn	"%1$s"附近语法错误

en-us	Incorrect templated web scenario step count.
zh-cn	模板Web方案步骤计数不正确。

en-us	Incorrect template screen ID.
zh-cn	模板的聚合图形ID错误。

en-us	Incorrect trigger expression
zh-cn	错误的触发器表达式

en-us	Incorrect trigger expression.
zh-cn	错误的触发器表达式.

en-us	Incorrect trigger expression. Host "%1$s" does not exist or you have no access to this host.
zh-cn	错误的触发器表达式. 主机 "%1$s"不存在或您不能存取此主机.

en-us	Incorrect trigger expression. Trigger expression elements should not belong to a template and a host simultaneously.
zh-cn	错误的触发器表达式. 触发器表达式组件不该同时属于一个模板和一个主机.

en-us	Incorrect trigger function "%1$s" provided in expression.
zh-cn	用了错误的触发器方程序"%1$s"于表达式中.

en-us	Incorrect trigger ID for service "%1$s".
zh-cn	服务"%1$s"存在错误的触发器 ID.

en-us	Incorrect trigger prototype expression. Host "%1$s" does not exist or you have no access to this host.
zh-cn	触发器的模板表达式错误。主机"%1$s"不存在或您没有权限访问它.

en-us	Incorrect trigger prototype expression. Trigger prototype expression elements should not belong to a template and a host simultaneously.
zh-cn	触发器模板表达式错误。触发器表达式元素不应该同时属于一个模板和一个主机.

en-us	Incorrect type of calculation for action "%1$s".
zh-cn	动作"%1$s"的计算类型不正确.

en-us	Incorrect type of calculation for correlation "%1$s".
zh-cn	"%1$s"的关联项计算类型错误。

en-us	Incorrect type of calculation for discovery rule "%1$s".
zh-cn	自动发现规则 "%1$s"的计算类型不正确.

en-us	Incorrect user group.
zh-cn	错误的用户群组.

en-us	Incorrect user group ID specified for map "%1$s".
zh-cn	拓扑图 "%1$s" 用户组ID错误。

en-us	Incorrect user group ID specified for screen "%1$s".
zh-cn	聚合图形 "%1$s" 用户组ID错误。

en-us	Incorrect user ID specified for map "%1$s".
zh-cn	拓扑图 "%1$s" 用户ID错误。

en-us	Incorrect user ID specified for screen "%1$s".
zh-cn	聚合图形 "%1$s" 用户ID错误。

en-us	Incorrect value "%1$s" for "%2$s" field.
zh-cn	字段 "%2$s"的值 "%1$s"不正确.

en-us	Incorrect value "%1$s" for "%2$s" field: must be between %3$s and %4$s.
zh-cn	字段 "%2$s"的值 "%1$s"不正确:必须在%3$s到%4$s之间

en-us	Incorrect value "%1$s" for float field "%2$s".
zh-cn	错误的值"%1$s"于浮点栏位"%2$s"中.

en-us	Incorrect value "%1$s" for int field "%2$s".
zh-cn	错误的值"%1$s"于整数栏位"%2$s"中.

en-us	Incorrect value "%1$s" for unsigned int field "%2$s".
zh-cn	错误的值"%1$s"于无正负的整数栏位"%2$s"中.

en-us	Incorrect value "%1$s" in field "%2$s" for correlation "%3$s".
zh-cn	在关联项中"%3$s"，"%2$s"使用了错误的值"%1$s"。

en-us	Incorrect value "%1$s" in field "%2$s" for media type "%3$s".
zh-cn	"%2$s" 中 媒体值 "%3$s" 的 "%1$s" 值错误。

en-us	Incorrect value for "%1$s" field.
zh-cn	"%1$s" 字段的值不正确。

en-us	Incorrect value for field "%1$s": %2$s.
zh-cn	字段 "%1$s": %2$s 值错误。

en-us	Incorrect value for field "%1$s": cannot be empty.
zh-cn	字段"%1$s"的值不正确:不能为空.

en-us	Incorrect value used for proxy status "%1$s".
zh-cn	错误的值用于代理服务器状态 "%1$s".

en-us	Incorrect value used for PSK field. It should consist of an even number of hexadecimal characters.
zh-cn	在PSK字段使用的值是不正确的。未配置为十六进制字符串。

en-us	Incorrect "width" value for map "%1$s".
zh-cn	拓扑图的宽度值 "%1$s" 错误。

en-us	Indonesian (id_ID)
zh-cn	印度尼西亚 (id_ID)

en-us	Info
zh-cn	信息

en-us	Information
zh-cn	信息

en-us	Information about a service. Returns integer with param as state, startup; string - with param as displayname, path, user; text - with param as description; Specifically for state: 0 - running, 1 - paused, 2 - start pending, 3 - pause pending, 4 - continue pending, 5 - stop pending, 6 - stopped, 7 - unknown, 255 - no such service; Specifically for startup: 0 - automatic, 1 - automatic delayed, 2 - manual, 3 - disabled, 4 - unknown
zh-cn	有关服务的信息。返回整数字段表示状态，启动状态；字符串 - 以字段作为显示名，路径，用户; 文本 - 使用字段作为描述； 状态码：0 - 运行，1 - 暂停，2 - 启动挂起，3 - 暂停挂起，4 - 继续挂起，5 - 停止挂起，6 - 停止，7 - 未知，255 - 没有这个服务；启动码：0 - 自动，1 - 自动延迟，2 - 手动, 3 - 禁用，4 - 未知

en-us	Inherited and host macros
zh-cn	继承以及主机 宏

en-us	Inherited and template macros
zh-cn	继承模板的宏

en-us	In maintenance
zh-cn	维修中

en-us	In progress
zh-cn	启用中

en-us	Insert
zh-cn	插入

en-us	Insert expression
zh-cn	插入表达式

en-us	Install
zh-cn	安装

en-us	Installation
zh-cn	安装

en-us	#### Installation  Please always read the installation manual for a particular module. It is recommended to install new modules one by one to catch failures easily.  Just before you install a module:  -   Make sure you have downloaded the module from a trusted source.     Installation of harmful code may lead to consequences, such as data     loss -   Different versions of the same module (same ID) can be installed in     parallel, but only a single version can be enabled at once  Steps to install a module:  -   Unpack your module within its own folder in the `modules` folder of     the Zabbix frontend -   Ensure that your module folder contains at least the manifest.json     file -   Navigate to [Module     administration](/manual/web_interface/frontend_sections/administration/general#modules)     and click the *Scan directory* button -   New module will appear in the list along with its version, author,     description and status -   Enable module by clicking on its status  Troubleshooting:  |Problem|Solution| |---------|----------------------------------------| |*Module did not appear in the list*|Make sure that the manifest.json file exists in `modules/your-module/` folder of the Zabbix frontend. If it does that means the module does not suit the current Zabbix version. If manifest.json file does not exist, you have probably unpacked in the wrong directory.| |*Frontend crashed*|The module code is not compatible with the current Zabbix version or server configuration. Please delete module files and reload the frontend. You'll see a notice that some modules are absent. Go to [Module administration](/manual/web_interface/frontend_sections/administration/general#modules) and click *Scan directory* again to remove non-existent modules from the database.| |*Error message about identical namespace, ID or actions appears*|New module tried to register a namespace, ID or actions which are already registered by other enabled modules. Disable the conflicting module (mentioned in error message) prior to enabling the new one.| |*Technical error messages appear*|Report errors to the developer of the module.|
zh-cn	 #### 安装  请始终阅读特定模块的安装手册。建议逐个安装新模块，以便更容易的找到故障。  在安装模块之前：  - 确保您已从受信任的来源下载了该模块。安装有害代码可能会导致后果，例如数据丢失 - 同一模块的不同版本（相同的ID）可以并行安装，但一次只能启用一个版本  安装模块的步骤：  - 将模块解压缩到Zabbix前端的"modules"文件夹中的自己的文件夹中 - 确保您的模块文件夹至少包含 manifest.json 文件 -   导航到 [Module administration](/manual/web_interface/frontend_sections/administration/general#modules)    并且单击 *Scan directory* 按钮 - 新模块将与其版本，作者，描述和状态一起出现在列表中 - 通过单击其状态启用模块  排错：  |问题|解决方案| |-------|--------| |*模块未出现在列表中*|确保 manifest.json 文件存在于 Zabbix 前端的 'modules/your-module/' 文件夹中。如果这样做，则意味着该模块不适合当前的Zabbix版本。如果 manifest.json 文件不存在，则可能是因为您解压到了错误的目录中。| |*前端崩溃*|模块代码与当前的Zabbix版本或服务器配置不兼容。请删除模块文件并重新加载前端。您将收到一条通知，指出某些模块不存在。转到 [Module administration](/manual/web_interface/frontend_sections/administration/general#modules) 然后再次单击 *Scan directory* 以从数据库中删除不存在的模块。| |*出现有关相同命名空间、ID 或操作的错误消息*|这是由于新模块尝试注册已由其他已启用模块注册的命名空间、ID 或操作。在启用新模块之前，禁用冲突的模块（在错误消息中提到的）。| |*出现技术错误消息*|向默块开发者报告错误|

en-us	Installer name
zh-cn	安装名称

en-us	Interface
zh-cn	接口

en-us	Interface is linked to item "%1$s" on "%2$s".
zh-cn	接口是链接到"%2$s"上的监控项"%1$s".

en-us	Interface is used by items that require this type of the interface.
zh-cn	接口用于需要这种接口类型的监控项.

en-us	Interface with DNS "%1$s" cannot have empty IP address.
zh-cn	DNS为"%1$s"的接口不能有空白的IP地址.

en-us	Interface with IP "%1$s" cannot have empty DNS name.
zh-cn	IP为"%1$s"的接口不能有空白的DNS名称.

en-us	Interface with IP "%1$s" cannot have empty DNS name while having "Use DNS" property on "%2$s".
zh-cn	当"%2$s"上有 "Use DNS"属性, IP为"%1$s"的接口不能有空白的DNS名称.

en-us	internal
zh-cn	事件源

en-us	Internal
zh-cn	认证

en-us	Internal
zh-cn	事件源

en-us	Internal
zh-cn	用户类型

en-us	Internal data storage period
zh-cn	内部数据存储期

en-us	Internal error.
zh-cn	内部错误.

en-us	Internal event and alert data storage period
zh-cn	内部事件和报警数据保留时长

en-us	Internal event and alert data storage period "%1$s".
zh-cn	内部时间以及报警的存储期 "%1$s" 。

en-us	Internal JSON-RPC error.
zh-cn	内部的JSON-RPC错误.

en-us	Internet Explorer
zh-cn	IE浏览器

en-us	Interval
zh-cn	间隔

en-us	Introduction of loadable plugins caused the following configuration parameter changes:  - *Plugins.\<PluginName>.Path* parameter has been moved to *Plugins.\<PluginName>.System.Path*. - *Plugins.\<PluginName>.Capacity* parameter, while still supported, has been deprecated, please use *Plugins.\<PluginName>.System.Capacity* instead.
zh-cn	外部插件的引入导致以下配置参数更改： - *Plugins.\<PluginName>.Path* 参数已移至 *Plugins.\<PluginName>.System.Path*。 - *Plugins.\<PluginName>.Capacity* 参数虽然仍受支持，但已被弃用，请改用 *Plugins.\<PluginName>.System.Capacity* 。

en-us	Invalid action condition: %1$s.
zh-cn	无效的动作条件：%1$s。

en-us	invalid address range "%1$s"
zh-cn	无效地址范围 "%1$s"

en-us	Invalid audit data storage period: %1$s.
zh-cn	审核资料储存期无效： %1$s。

en-us	Invalid auto-registration data storage period: %1$s.
zh-cn	自动注册数据存储期间无效：%1$s。

en-us	Invalid blinking on trigger status change: %1$s.
zh-cn	触发状态更改无效闪烁：%1$s。

en-us	invalid byte sequence in UTF-8
zh-cn	UTF-8中无效的字节排序

en-us	Invalid data storage period for services: %1$s.
zh-cn	服务的数据保留期不正确：%1$s.

en-us	Invalid date.
zh-cn	无效数据.

en-us	invalid delay
zh-cn	无效延迟

en-us	Invalid displaying of OK triggers: %1$s.
zh-cn	OK触发器无效显示： %1$s。

en-us	Invalid email address "%1$s".
zh-cn	无效 email 地址 "%1$s"。

en-us	Invalid email address for media type with ID "%1$s".
zh-cn	媒介类型 ID: "%1$s" 的 email 地址无效。

en-us	Invalid fifth parameter.
zh-cn	第五个参数无效。

en-us	Invalid first parameter.
zh-cn	第一个参数无效.

en-us	Invalid fourth parameter.
zh-cn	第四个参数无效.

en-us	Invalid history data storage period: %1$s.
zh-cn	%1$s 历史数据存储时间段无效。

en-us	invalid history storage period
zh-cn	无效的历史数据期间

en-us	invalid host group name
zh-cn	无效的主机群组名称

en-us	Invalid hostid for macro "%1$s".
zh-cn	宏 "%1$s" 存在无效的 hostid.

en-us	invalid host name
zh-cn	无效的主机名称

en-us	Invalid internal data storage period: %1$s.
zh-cn	内部存储期 %1$s 无效。

en-us	Invalid interval "%1$s".
zh-cn	无效的间隔 "%1$s".

en-us	Invalid IP address "%1$s".
zh-cn	不合法的IP地址"%1$s".

en-us	Invalid JSON. An error occurred on the server while parsing the JSON text.
zh-cn	无效的JSON. 当解析JSON文字时, 在服务器端发生了一个错误.

en-us	Invalid key "%1$s": %2$s.
zh-cn	不舍法的关键字 "%1$s": %2$s

en-us	Invalid key "%1$s" for discovery rule "%2$s" on "%3$s": %4$s.
zh-cn	"%3$s"：%4$s上的自动发现规则 "%2$s" 引用了不合法的关键字 "%1$s"。

en-us	Invalid key "%1$s" for item "%2$s" on "%3$s": %4$s.
zh-cn	"%3$s": %4$s上的监控项目 "%2$s"使用了不合法的关键字 "%1$s"

en-us	Invalid key "%1$s" for item prototype "%2$s" on "%3$s": %4$s.
zh-cn	"%3$s": %4$s上的监控项目模板 "%2$s" 使用了不合法的关键字 "%1$s"。

en-us	Invalid macro "%1$s": %2$s.
zh-cn	无效的宏"%1$s": %2$s.

en-us	Invalid method parameters.
zh-cn	无效的方法参数.

en-us	Invalid network discovery data storage period: %1$s.
zh-cn	网络发现数据存储期间无效：%1$s 。

en-us	Invalid number of parameters.
zh-cn	无效的参数个数.

en-us	Invalid parameter "%1$s": %2$s.
zh-cn	无效的参数 "%1$s": %2$s 。

en-us	Invalid params.
zh-cn	无效的参数.

en-us	Invalid refresh of unsupported items: %1$s
zh-cn	刷新不受支持的项目无效：%1$s

en-us	invalid regular expression
zh-cn	无效的正则表达式

en-us	Invalid Request.
zh-cn	无效的请求.

en-us	Invalid response code "%1$s".
zh-cn	无效的响应代码 "%1$s".

en-us	Invalid second parameter.
zh-cn	第二个参数无效.

en-us	Invalid tag "%1$s": %2$s.
zh-cn	标签无效 "%1$s": %2$s。

en-us	Invalid third parameter.
zh-cn	第三个参数无效.

en-us	Invalid time period.
zh-cn	无效的时间段

en-us	Invalid trends data storage period: %1$s.
zh-cn	趋势数据存储期限无效：%1$s 。

en-us	invalid trend storage period
zh-cn	无效的趋势存储期

en-us	Invalid trigger data storage period: %1$s.
zh-cn	触发器 %1$s 数据存储期间无效。

en-us	Invalid user sessions data storage period: %1$s.
zh-cn	无效的用户会话数据存储期：%1$s 。

en-us	Invalid view name given "%s". Allowed chars: "a-z" and ".".
zh-cn	所给的 "%s" 为无效的检视名称。可用的: "a-z" 和 "."。

en-us	Inventory
zh-cn	资产记录

en-us	Inventory disabled for host "%1$s".
zh-cn	主机"%1$s"的资产记录被禁用.

en-us	Inventory field
zh-cn	资产纪录栏位

en-us	Inventory mode
zh-cn	资产纪录模式

en-us	IP
zh-cn	IP地址

en-us	IP address
zh-cn	IP地址

en-us	IP and DNS cannot be empty for host interface.
zh-cn	主机接口的IP和DNS不能为空.

en-us	IPMI
zh-cn	IPMI

en-us	IPMI agent
zh-cn	IPMI客户端

en-us	IPMI authentication algorithm
zh-cn	IPMI认证算法

en-us	IPMI interfaces
zh-cn	IPMI接口

en-us	IPMI password
zh-cn	IPMI密码

en-us	IPMI privilege level
zh-cn	IPMI优先层级

en-us	IPMI scripts can be executed only by server.
zh-cn	IPMI脚本只能由服务器运行。

en-us	IPMI sensor
zh-cn	IPMI传感器

en-us	IPMI username
zh-cn	IPMI用户名

en-us	IP range
zh-cn	IP范围

en-us	IP range "%1$s" exceeds "%2$s" address limit
zh-cn	IP范围 "%1$s" 超出 "%2$s" 地址限制

en-us	iregexp() - Regular expression V matching last value in period T (non case-sensitive; 1 - match, 0 - no match)
zh-cn	iregexp() - 周期 T 内，最后的值与正则表达式 V 匹配（不区分大小写；1 - 匹配，0 - 不匹配）

en-us	is greater than or equals
zh-cn	大于等于

en-us	is less than or equals
zh-cn	小于等于

en-us	is not enclosed in {} or is malformed
zh-cn	不包含在{}或格式错误

en-us	Is online?
zh-cn	是否在线?

en-us	Issue
zh-cn	问题

en-us	Issuer
zh-cn	发行者

en-us	Italian (it_IT)
zh-cn	意大利语 (it_IT)

en-us	item
zh-cn	监控项

en-us	Item
zh-cn	监控项

en-us	Item "%1$s:%2$s" has invalid port: "%3$s".
zh-cn	监控项"%1$s:%2$s"有无效的端口: "%3$s".

en-us	Item "%1$s" already exists on "%2$s".
zh-cn	监控项"%1$s"已经存在于"%2$s".

en-us	Item "%1$s" already exists on "%2$s", inherited from another template.
zh-cn	键值为 "%1$s"的监控项已存在于 "%2$s", 继承自其他模板.

en-us	Item "%1$s" cannot populate a missing host inventory field number "%2$d". Choices are: from 0 (do not populate) to %3$d.
zh-cn	监控项"%1$s"不能填入一个不存在的主机资产纪录栏位号码"%2$d". 选择为: 从0(不填入)到%3$d.

en-us	Item "%1$s" does not exist on template "%2$s".
zh-cn	监控项"%1$s"不存在于模板"%2$s"中.

en-us	Item "%1$s" does not exist or you have no access to this item
zh-cn	项目 "%1$s" 不存在或您无权访问此项目

en-us	Item "%1$s" has master item and cannot be copied.
zh-cn	监控项 "%1$s" 有主监控项并且不能被复制。

en-us	Item "%1$s" on "%2$s": application "%3$s" does not exist.
zh-cn	"%2$s"上的监控项"%1$s" : 应用集"%3$s"不存在.

en-us	Item added
zh-cn	监控项已添加

en-us	Item copied
zh-cn	监控项复制

en-us	Item count
zh-cn	监控项数量

en-us	Item deleted
zh-cn	监控项已删除

en-us	Item disabled
zh-cn	监控项目被禁用

en-us	Item enabled
zh-cn	监控项目已启用

en-us	Item in "not supported" state
zh-cn	监控项在“不支持”的状态

en-us	item is disabled
zh-cn	监控项被禁用

en-us	Item not selected
zh-cn	项目未被选择

en-us	item pattern
zh-cn	监控项模式

en-us	Item pre-processing is missing parameters: %1$s
zh-cn	项目预处理缺少参数：%1$s

en-us	Item pre-processing is not allowed for discovery rules.
zh-cn	发现规则不允许进行项目预处理。

en-us	Item prototype
zh-cn	监控项原型

en-us	Item prototype "%1$s" already exists on "%2$s".
zh-cn	"%2$s"上的项目模板"%1$s"已经存在.

en-us	Item prototype "%1$s" already exists on "%2$s", inherited from another template.
zh-cn	监控项原型"%1$s"已经存在于"%2$s",继承自其它的模板.

en-us	Item prototype "%1$s" already exists on "%2$s", linked to another rule.
zh-cn	监控项原型 "%1$s" 已经在 "%2$s" 中存在，链接到另一个规则。

en-us	Item prototype added
zh-cn	项目模板已经添加

en-us	Item prototype deleted
zh-cn	项目模板已删除

en-us	Item prototypes
zh-cn	监控项原型

en-us	Item prototypes deleted
zh-cn	项目模板已删除

en-us	Item prototype updated
zh-cn	项目模板已更新

en-us	Item prototype with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的项目原型不可用。

en-us	Items
zh-cn	监控项

en-us	Items deleted
zh-cn	监控项已删除

en-us	Items list
zh-cn	监控项列表

en-us	Items location
zh-cn	监控项位置

en-us	Items updated
zh-cn	监控项已更新

en-us	Item updated
zh-cn	监控项已更新

en-us	Item uses host interface from non-parent host.
zh-cn	监控项使用来自非上层主机的主机接口.

en-us	Item uses incorrect interface type.
zh-cn	监控项使用错误的接口类型.

en-us	Item values
zh-cn	项目值

en-us	Item will not be refreshed. Please enter a correct update interval.
zh-cn	监控项将不会被刷新. 请输入正确的更新间隔.

en-us	Item will not be refreshed. Specified update interval requires having at least one either flexible or scheduling interval.
zh-cn	监控项不会刷新。指定的更新间隔要求至少具有一个灵活或调度间隔。

en-us	Item will not be refreshed. Update interval should be between 1s and 1d. Also Scheduled/Flexible intervals can be used.
zh-cn	监控项不会被刷新。更新间隔应该在 1s 到 1d 之间。还要指定调度/灵活间隔方式。

en-us	Item with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的项目不可用。

en-us	Item with key "%1$s" already exists on "%2$s".
zh-cn	键值为 "%1$s"的监控项已存在于"%2$s" .

en-us	Item with key "%1$s" already exists on "%2$s" as a discovery rule.
zh-cn	键值为 "%1$s"的监控项已存在于"%2$s" 为探索规则.

en-us	Item with key "%1$s" already exists on "%2$s" as an item.
zh-cn	键值为 "%1$s"的监控项已存在于"%2$s" 为监控项.

en-us	Item with key "%1$s" already exists on "%2$s" as an item created from item prototype.
zh-cn	键值为 "%1$s"的监控项已存在于"%2$s" 为创建自监控项原型的项目.

en-us	Item with key "%1$s" already exists on "%2$s" as an item prototype.
zh-cn	键值为 "%1$s"的监控项已存在于"%2$s" 为监控项原型.

en-us	Item with key "%1$s" already exists on "%2$s" as unknown item element.
zh-cn	键值为 "%1$s"的监控项已存在于"%2$s" 为未知的监控项组件.

en-us	It is not possible to filter by user password.
zh-cn	不能过滤用户密码.

en-us	It is not possible to search by user password.
zh-cn	不能查找用户密码.

en-us	Jabber
zh-cn	Jabber

en-us	Jabber identifier
zh-cn	Jabber 标识符

en-us	Jan
zh-cn	一月

en-us	January
zh-cn	一月

en-us	Japanese (ja_JP)
zh-cn	日语 (ja_JP)

en-us	JMX
zh-cn	JMX

en-us	JMX agent
zh-cn	JMX agent代理程序

en-us	JMX endpoint
zh-cn	JMX 端点

en-us	JMX interfaces
zh-cn	JMX接口

en-us	JSON data
zh-cn	JSON 数据

en-us	JSON Path
zh-cn	JSON 路径

en-us	JSON string is expected
zh-cn	预先的JSON字符串

en-us	Jul
zh-cn	七月

en-us	July
zh-cn	七月

en-us	Jun
zh-cn	六月

en-us	June
zh-cn	六月

en-us	Keep lost resources period
zh-cn	资源周期不足

en-us	Key
zh-cn	键值

en-us	Key "%1$s" does not match <grpmax|grpmin|grpsum|grpavg>["Host group(s)", "Item key", "<last|min|max|avg|sum|count>", "parameter"].
zh-cn	键值 "%1$s" 不符 <grpmax|grpmin|grpsum|grpavg>["Host group(s)", "Item key", "<last|min|max|avg|sum|count>", "parameter"].

en-us	key is empty
zh-cn	关键字为空

en-us	Key passphrase
zh-cn	键值通行短语

en-us	Keyword
zh-cn	关键字

en-us	Kiosk mode
zh-cn	Kiosk 模式

en-us	Korean (ko_KR)
zh-cn	韩语 (ko_KR)

en-us	Label
zh-cn	标签

en-us	Label location
zh-cn	标签位置

en-us	Language
zh-cn	语言

en-us	last
zh-cn	最新

en-us	last
zh-cn	最新

en-us	Last
zh-cn	末

en-us	Last %1$d day
zh-cn	还剩 %1$d 天

en-us	Last %1$d hour
zh-cn	还剩 %1$d 小时

en-us	Last %1$d minute
zh-cn	还剩 %1$d 分钟

en-us	Last %1$d month
zh-cn	还剩 %1$d 个月

en-us	Last %1$d second
zh-cn	还剩 %1$d 秒

en-us	Last %1$d year
zh-cn	还剩 %1$d 年

en-us	Last 24 hours
zh-cn	最近24小时

en-us	Last 30 days
zh-cn	最近30天

en-us	Last 365 days
zh-cn	最近365天

en-us	Last 7 days
zh-cn	最近7天

en-us	Last change
zh-cn	触发时间

en-us	Last change (descending)
zh-cn	最后改变(降序)

en-us	Last check
zh-cn	最近检查记录

en-us	Last hour graph
zh-cn	最近一小时

en-us	last() - Last (most recent) T value
zh-cn	last() - 最后（最近）的 T 值

en-us	Last month graph
zh-cn	上月图形

en-us	Last of
zh-cn	最后一个

en-us	Last seen (age)
zh-cn	最近出现(持续)

en-us	Last value
zh-cn	最新数据

en-us	Last week graph
zh-cn	上周图形

en-us	Latest data
zh-cn	最新数据

en-us	Latest values
zh-cn	最新值

en-us	Latvian (lv_LV)
zh-cn	拉脱维亚语(lv_LV)

en-us	LDAP
zh-cn	LDAP

en-us	LDAP authentication
zh-cn	LDAP认证

en-us	LDAP host
zh-cn	LDAP主机

en-us	LDAP is not configured
zh-cn	LDAP 没有配置

en-us	LDAP login successful
zh-cn	LDAP登录成功

en-us	LDAP settings
zh-cn	LDAP 设置

en-us	left
zh-cn	左

en-us	Left
zh-cn	左侧

en-us	Left trim
zh-cn	修整左边

en-us	Left Y
zh-cn	左侧 Y 轴

en-us	Legend
zh-cn	图例

en-us	Legend
zh-cn	图例

en-us	Legend
zh-cn	图例

en-us	Limit for search and filter results
zh-cn	搜索/过滤组件限制

en-us	Line
zh-cn	线

en-us	Line colour
zh-cn	线颜色

en-us	Line type
zh-cn	线类型

en-us	Line width
zh-cn	线高度

en-us	Link
zh-cn	链接

en-us	Linked map
zh-cn	拓扑图链接

en-us	Linked templates
zh-cn	链接的模板

en-us	Linked to
zh-cn	已链接到

en-us	Link indicators
zh-cn	链接指示器

en-us	Link new templates
zh-cn	链接指示器

en-us	Links
zh-cn	链接

en-us	Link selementid1 field is pointing to a nonexistent map selement ID "%1$s" for map "%2$s".
zh-cn	链接栏位selementid1是为拓扑图"%2$s"指向不存在的拓扑图 selement ID "%1$s".

en-us	Link selementid2 field is pointing to a nonexistent map selement ID "%1$s" for map "%2$s".
zh-cn	链接栏位selementid2是为拓扑图"%2$s"指向不存在的拓扑图 selement ID "%1$s".

en-us	Link templates
zh-cn	模板链接

en-us	Link to template
zh-cn	与模板关联

en-us	Link to templates
zh-cn	链接到模板

en-us	Listing of installed packages. Returns text
zh-cn	安装包列表。返回文本

en-us	Listing of MAC addresses. Returns string
zh-cn	MAC地址。返回字符串

en-us	Listing of PCI or USB devices. Returns text
zh-cn	PCI或者USB设备列表。返回文本

en-us	Listing of services. Returns 0 - if empty; text - list of services separated by a newline
zh-cn	列表服务。返回0表示空，如果是列表则是每行一个内容

en-us	List is empty
zh-cn	清单是空的

en-us	list of characters
zh-cn	字符列表

en-us	List of user group shares
zh-cn	用户组共享列表

en-us	List of user shares
zh-cn	用户共享列表

en-us	Lithuanian (lt_LT)
zh-cn	立陶宛 (lt_LT)

en-us	Loading time of full web page (in seconds). Returns float
zh-cn	全网页加载时间（秒）。返回浮点型

en-us	Local
zh-cn	本地

en-us	Local time
zh-cn	当地时间

en-us	Location
zh-cn	位置

en-us	Location latitude
zh-cn	位置纬度

en-us	Location longitude
zh-cn	位置经度

en-us	Log
zh-cn	日志

en-us	logeventid() - Event ID of last log entry matching regular expression T (1 - match, 0 - no match)
zh-cn	logeventid() - 与正则表达式 T 匹配的最后一个日志条目的事件 ID（1 - 匹配，0 - 不匹配）

en-us	Log file monitoring. Returns log
zh-cn	日志文件监控。返回日志

en-us	Log file monitoring with log rotation support. Returns log
zh-cn	日志文件监控与轮转服务。返回日志

en-us	Login
zh-cn	登录

en-us	Login failed.
zh-cn	登录失败！

en-us	Login name or password is incorrect.
zh-cn	登录名称或密码是错误的.

en-us	Logout
zh-cn	登出

en-us	logseverity() - Log severity of the last log entry
zh-cn	logseverity() - 最后一个日志条目的日志严重性

en-us	logsource() - Log source of the last log entry matching parameter T (1 - match, 0 - no match)
zh-cn	logsource() - 最后一个日志条目匹配参数 T 的日志源（1 - 匹配，0 - 不匹配）

en-us	Log time format
zh-cn	日志时间格式

en-us	Log unmatched SNMP traps
zh-cn	日志与SNMP采集器不符

en-us	Lost
zh-cn	失去

en-us	low-level discovery rule
zh-cn	底层发现规则

en-us	Low-level discovery rule in "not supported" state
zh-cn	低级发现规则在“不支持”状态

en-us	m
zh-cn	m

en-us	m
zh-cn	m

en-us	M
zh-cn	M

en-us	M
zh-cn	M

en-us	MAC address A
zh-cn	Mac 地址 A

en-us	MAC address B
zh-cn	Mac 地址 B

en-us	Macro
zh-cn	宏

en-us	Macro "%1$s" already exists.
zh-cn	宏"%1$s"已存在.

en-us	Macro "%1$s" already exists on "%2$s".
zh-cn	宏"%1$s"已存在于"%2$s".

en-us	Macro "%1$s" is not unique.
zh-cn	宏"%1$s"并非唯一.

en-us	macro is empty
zh-cn	宏是空的

en-us	macro(s)
zh-cn	宏(s)

en-us	Macros
zh-cn	宏

en-us	Macros updated
zh-cn	宏已更新

en-us	Macro with hostmacroid "%1$s" does not exist.
zh-cn	主机宏 ID 为"%1$s"的宏不存在.

en-us	Main filter
zh-cn	主过滤器

en-us	Main navigation
zh-cn	主导航栏

en-us	Maintenance
zh-cn	维护

en-us	MAINTENANCE
zh-cn	维护

en-us	Maintenance: %1$s
zh-cn	维护：%1$s

en-us	Maintenance "%1$s" already exists.
zh-cn	维护"%1$s" 已经存在.

en-us	Maintenance "Active since" value cannot be bigger than "Active till".
zh-cn	维护期间"Active since"值不能晚于 "Active till".

en-us	Maintenance added
zh-cn	维护已添加

en-us	Maintenance deleted
zh-cn	维护已删除

en-us	Maintenance period
zh-cn	维护周期

en-us	Maintenance period length
zh-cn	维护期间长度

en-us	Maintenance periods
zh-cn	维护期间

en-us	##### Maintenance periods  The maintenance period window is for scheduling time for a recurring or a one-time maintenance. The form is dynamic with available fields changing based on the *Period type* selected.  ![](../../assets/en/manual/maintenance/maintenance_period.png)  |Period type|Description| |---------|----------------------------------------| |*One time only*|Define the date and time, and the length of the maintenance period.| |*Daily*|*Every day(s)* - maintenance frequency: 1 (default) - every day, 2 - every two days, etc.<br>*At (hour:minute)* - time of the day when maintenance starts<br>*Maintenance period length* - for how long the maintenance will be active.| |*Weekly*|*Every week(s)* - maintenance frequency: 1 (default) - every day, 2 - every two days, etc.<br>*Day of week* - on which day the maintenance should take place.<br>*At (hour:minute)* - time of the day when maintenance starts<br>*Maintenance period length* - for how long the maintenance will be active.| |*Monthly*|*Month* - select all months during which the regular maintenance is carried out.<br>*Date*: **Day of month** - Select this option if the maintenance takes place on the same date each month (for example, every 1st day of the month). Then, select the required day in the new field that appears.<br>*Date*: **Day of week** - Select this option if the maintenance takes place only on certain days (for example, every first Monday of the month). Then, in the drop-down select the required week of the month (first, second, third, fourth, or last) and mark the checkboxes for maintenance day(s).<br>*At (hour:minute)* - time of the day when maintenance starts<br>*Maintenance period length* - for how long the maintenance will be active.|  When done, press *Add* to add the maintenance period to the *Periods* block.  Notes:  -   When *Every day/Every week* parameter is greater than 1, the     starting day or week is the day/week that the *Active since* time     falls on. For example:     -   with *Active since* set to January 1st at 12:00 and a one-hour         maintenance set for every two days at 11pm will result in the         first maintenance period starting on January 1st at 11pm, while         the second maintenance period will start on January 3rd at 11pm;     -   with the same *Active since* time and a one-hour maintenance set         for every two days at 1am, the first maintenance period will         start on January 3rd at 1am, while the second maintenance period         will start on January 5th at 1am. -   Daylight Saving Time (**DST**) changes do not affect how long the     maintenance will be.      - Let's say we have a two-hour maintenance that        usually starts at 1am and finishes at 3am:      -   If after one hour of maintenance (at 2am) a DST change happens          and current time changes from 2:00 to 3:00, the maintenance will          continue for one more hour till 4:00;      -   If after two hours of maintenance (at 3am) a DST change happens          and current time changes from 3:00 to 2:00, the maintenance will          stop because two hours have passed.     -   If a maintenance period is set to 1 day it usually starts at 12am       and finishes at 12am the next day:      -   Since Zabbix calculates days in hours, the actual period of the           maintenance is 24 hours.       - If current time changes forward one hour, the maintenance will           stop at 1am the next day.       - If current time changes back one hour, the maintenance will stop           at 11pm that day.     - If a maintenance period starts during the hour, skipped by DST change:      - The maintenance will not start.
zh-cn	##### 维护期间  维护期间窗口用于安排定期或一次性维护的时间。该表单是动态的，可用字段根据所选的*期间类型（Period type）*而变化。  ![](../../assets/en/manual/maintenance/maintenance_period.png)  |期间类型（Period type）|描述（Description）| |-----------|-----------| |*一次性（One time only）*|定义日期和时间，以及维护期的长度。| |*每日（Daily）*|*每天（Every day(s)）* - 维护频率：1（默认） - 每天，2 - 每两天等。<br>*于（时:分）（At (hour:minute)）* - 维护开始的一天中的时间<br>*维护期长度（Maintenance period length）* - 维护将持续多长时间。| |*每周（Weekly）*|*每周（Every week(s)）* - 维护频率：1（默认） - 每天，2 - 每两天等。 <br>*星期几（Day of week）* - 应该在哪一天进行维护。<br>*在（时:分）（At (hour:minute)）* - 维护开始的一天中的时间<br>*维护期长度（Maintenance period length）* - 维护将持续多长时间。| |*每月（Monthly）*|*月（Month）* - 选择进行定期维护的所有月份。<br>*日期（Date）*: **月的指定天（Day of month）** - 如果维护发生在每个月的同一日期（例如，每月的第一天），请选择此选项。然后，在出现的新字段中选择所需的日期。<br>*日期（Date）*: **星期几（Day of week）** - 如果仅在特定日期（例如，每月的第一个星期一）进行维护，请选择此选项。然后，在下拉列表中选择每月所需的一周（第一、第二、第三、第四或最后一周）并标记维护日的复选框。<br>*于（时:分）（At (hour:minute)）* - 一天中开始维护的时间<br>*维护期长度（Maintenance period length）* - 维护将持续多长时间。|  完成后，点击 *Add* 将维护期添加到 *期间（Periods）*块。  注意：  -   当 *Every day/Every week* 参数大于 1 时，起始日或周为 *Active since* 时间所在的日/周。例如：     -   将 *Active since* 设置为 1 月 1 日 12:00 且 每两天晚上 11 点设置一小时维护，将导致第一个维护期从 1 月 1 日晚上 11 点开始，而第二个维护期将从 1 月 3 日晚上 11 点开始;     -   在相同的 *Active since* 时间和每两天凌晨 1 点设置一小时维护的情况下，第一个维护期将从 1 月 3 日凌晨 1 点开始，而第二个维护期将从 1 月 5 日凌晨 1 点开始。  -   夏令时 (**DST**) 更改不会影响维护时间。假设我们有两个小时的维护，通常从凌晨 1 点开始，到凌晨 3 点结束：     -   如果在维护一小时后（凌晨 2 点）发生 DST 更改并且当前时间从 2:00 更改为 3:00，则维护将再持续一小时直到 4:00；     -   如果在维护两个小时后（凌晨 3 点）发生 DST 更改并且当前时间从 3:00 更改为 2:00，则维护将停止，因为两个小时已过。

en-us	Maintenance type
zh-cn	维护类型

en-us	Maintenance updated
zh-cn	维护已更新

en-us	Maintenance with data collection
zh-cn	进行数据收集的维护

en-us	Maintenance without data collection
zh-cn	不进行数据收集的维护

en-us	Mandatory parameter is missing.
zh-cn	维护参数不存在.

en-us	##### Manifest preparation  Each module is expected to have a manifest.json file with the following fields in JSON format:  |Parameter|Required|Type|Default|Description| |---------|---|----|--|-------------------| |manifest\_version|Yes|Double|\-|Manifest version of the module. Currently supported version is **1**.| |id|Yes|String|\-|Module ID. Only one module with given ID can be enabled at the same time.| |name|Yes|String|\-|Module name as displayed in the Administration section.| |version|Yes|String|\-|Module version as displayed in the Administration section.| |namespace|Yes|String|\-|PHP namespace for Module.php and action classes.| |author|No|String|""|Module author as displayed in the Administration section.| |url|No|String|""|Module URL as displayed in the Administration section.| |description|No|String|""|Module description as displayed in the Administration section.| |actions|No|Object|{}|Actions to register with this module. See Actions.| |config|No|Object|{}|Module configuration.|  For reference, please see an example of manifest.json in the [Reference](#reference) section.
zh-cn	 ##### 清单准备  每个模块都应该有一个 manifest.json 文件，其中包含以下 JSON 格式的字段：  |参数|必填|类型|默认值|描述| |---------|--------|----|-------|-----------| |manifest\_version|是|Double|\-|模块的清单版本。当前支持的版本为 **1**。| |id|是|String|\-|模块标识。只能同时启用一个具有给定 ID 的模块。| |name|是|String|\-|“管理”部分中显示的模块名称。| |version|是|String|\-|“管理”部分中显示的模块版本。| |namespace|是|String|\-|Module.php和操作类的 PHP 命名空间。| |author|否|String|""|“管理”部分中显示的模块作者。| |url|否|String|""|“管理”部分中显示的模块URL。| |description|否|String|""|“管理”部分中显示的模块描述。| |actions|否|Object|{}|注册此模块的操作。查看“动作”| |config|否|Object|{}|模块配置|  有关参考，请参阅 [Reference](#reference)部分中 manifest.json 的示例。

en-us	<manual>
zh-cn	<手册>

en-us	Manual
zh-cn	手动的

en-us	Manually closed
zh-cn	手动关闭

en-us	map
zh-cn	拓扑图

en-us	Map
zh-cn	拓扑图

en-us	Map "%1$s" already exists.
zh-cn	拓扑图"%1$s"已经存在。

en-us	Map "%1$s" is public and read-only sharing is disallowed.
zh-cn	拓扑图 "%1$s" 为公开只读不允许共享。

en-us	Map element
zh-cn	地图元素

en-us	Map element is missing parameters: %1$s
zh-cn	Map元素缺少参数：%1$s

en-us	Map element label location
zh-cn	拓扑元素标签位置

en-us	Map element label type
zh-cn	拓扑元素标签类型

en-us	Map label type
zh-cn	拓朴图标签类型

en-us	Map name cannot be empty.
zh-cn	地图名称不能为空

en-us	Map navigation tree
zh-cn	拓扑图导航树

en-us	Map owner cannot be empty.
zh-cn	地图的所有者不能为空。

en-us	Mapped to
zh-cn	映射到

en-us	Mappings
zh-cn	映射

en-us	Maps
zh-cn	拓扑图

en-us	Map shape
zh-cn	拓扑图形状

en-us	Map update failed.
zh-cn	拓扑图更新失败.

en-us	Map with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的地图不可用。

en-us	Mar
zh-cn	三月

en-us	March
zh-cn	三月

en-us	Mark elements on trigger status change
zh-cn	触发器状态上的标记组件改变

en-us	Mark others
zh-cn	标记其他

en-us	Mark selected
zh-cn	标记所选

en-us	Mask
zh-cn	掩码

en-us	Mass update
zh-cn	批量更新

en-us	Mass update elements
zh-cn	批量更新组件

en-us	Mass update shapes
zh-cn	批量更新形状

en-us	Master item
zh-cn	主要项

en-us	matches
zh-cn	匹配

en-us	max
zh-cn	最大

en-us	Max
zh-cn	最大

en-us	Max columns
zh-cn	最大列数

en-us	Max count of elements to show inside table cell
zh-cn	表格位中最多可展示的的组件数量.

en-us	Max count of elements to show inside table cell "%1$s".
zh-cn	表格位"%1$s"中最多可展示的的组件数量.

en-us	maximum dependent items count reached
zh-cn	达到最大依赖项数

en-us	maximum number of dependency levels reached
zh-cn	达到最大数量的依赖关系

en-us	Maximum number of opened files supported by OS. Returns integer
zh-cn	操作系统最大的文件打开数量。返回整数

en-us	Maximum number of processes supported by OS. Returns integer
zh-cn	操作系统最大的进程数。返回整数

en-us	Maximum time period to display is %1$s day.
zh-cn	将要显示的最大时间区间是%1$s天

en-us	Maximum total length of email address exceeded for media type with ID "%1$s".
zh-cn	email 地址最大长度超出媒体类型 ID: "%1$s"。

en-us	max() - Maximum value for period T
zh-cn	max() - 周期 T 内的最大值

en-us	May
zh-cn	五月

en-us	May
zh-cn	五月

en-us	m-d
zh-cn	m-d

en-us	MD2
zh-cn	MD2

en-us	MD5
zh-cn	MD5

en-us	MD5 checksum of file. Returns character string (MD5 hash of the file)
zh-cn	文件的MD5校验。返回字符串（该文件的MD5哈希值）

en-us	m-d H:i
zh-cn	m-d H:i

en-us	Media
zh-cn	报警媒介

en-us	Media type
zh-cn	报警媒介类型

en-us	Media type "%1$s" already exists.
zh-cn	媒体类型 "%1$s" 已经存在。

en-us	Media type added
zh-cn	报警媒介类型已添加

en-us	Media type deleted
zh-cn	示警媒介类型已删除

en-us	Media type disabled
zh-cn	消息介质类型已禁用

en-us	Media type enabled
zh-cn	消息介质类型已启用

en-us	Media type is missing parameters: %1$s
zh-cn	%1$s 媒体类型缺少参数。

en-us	Media types
zh-cn	报警媒介类型

en-us	Media types used by action "%s".
zh-cn	报警媒介类型用于动作"%s".

en-us	Media type updated
zh-cn	报警媒介类型已更新

en-us	Media type with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的媒体类型不可用。

en-us	Members
zh-cn	成员

en-us	Memory limit: %1$s
zh-cn	内存限制：%1$s

en-us	Memory size in bytes or in percentage from total. Returns integer for bytes; float for percentage
zh-cn	从字节或总百分比的内存大小。它返回一个整数值，如果字节，只要百分比返回浮点值。

en-us	Memory used by process in bytes. Returns integer
zh-cn	进程内存，以字节为单位。返回整数

en-us	Message
zh-cn	消息

en-us	Message/Command
zh-cn	信息/命令

en-us	Messages
zh-cn	消息

en-us	Message text limit
zh-cn	消息文字限制

en-us	Message timeout
zh-cn	消息超时

en-us	Messaging
zh-cn	正在发送消息

en-us	Method not found.
zh-cn	未发现方法.

en-us	Middle
zh-cn	居中

en-us	min
zh-cn	最小

en-us	Min
zh-cn	最小

en-us	minimum length is %1$s characters
zh-cn	最小长度为 %1$s 个字符

en-us	Minimum required limit on execution time of PHP scripts is %s (configuration option "max_execution_time").
zh-cn	所要求的最小PHP脚本执行时间是%s(配置项 "max_execution_time").

en-us	Minimum required limit on input parse time for PHP scripts is %s (configuration option "max_input_time").
zh-cn	所要求的PHP脚本最小解析时间是%s (配置项"max_input_time").

en-us	Minimum required PHP memory limit is %s (configuration option "memory_limit").
zh-cn	所需求的最小PHP内存限制是%s(配置项"memory_limit").

en-us	Minimum required PHP upload filesize is %s (configuration option "upload_max_filesize").
zh-cn	所需求的最小PHP上传文件大小是%s(配置项"upload_max_filesize").

en-us	Minimum required PHP version is %s.
zh-cn	所需的最低PHP版本是%s.

en-us	Minimum required size of PHP post is %s (configuration option "post_max_size").
zh-cn	所要求的最小PHP post大小是%s(配置项"post_max_size").

en-us	Minimum severity
zh-cn	最小的严重级别

en-us	Minimum time period to display is %1$s minute.
zh-cn	可显示最短的时间为 %1$s 分。

en-us	min() - Minimum value for period T
zh-cn	min() - 周期 T 内的最小值

en-us	Minutes
zh-cn	分

en-us	Missing data
zh-cn	缺少数据

en-us	Missing "gitemid" field for item.
zh-cn	项目丢失"gitemid"字段

en-us	Missing "itemid" field for item.
zh-cn	缺少"itemid" 的监控项栏位

en-us	Missing items for graph "%1$s".
zh-cn	缺少"%1$s"的图形监控项.

en-us	Missing items for graph prototype "%1$s".
zh-cn	缺少图原型项"%1$s".

en-us	Missing key "%1$s" for host "%2$s".
zh-cn	缺少主机"%2$s"的键值 "%1$s".

en-us	Missing "name" field for application prototype in item prototype "%1$s".
zh-cn	找不到应用项目原型 "name" 字段 "%1$s"。

en-us	Missing "name" field for graph.
zh-cn	缺少"名称"的图形栏位

en-us	Missing "name" field for graph prototype.
zh-cn	数据图模板缺失"name"字段

en-us	mm
zh-cn	mm

en-us	Mode
zh-cn	模式

en-us	Model
zh-cn	模型

en-us	Mon
zh-cn	一

en-us	Monday
zh-cn	周一

en-us	Monitored by
zh-cn	要监控什么

en-us	Monitored by proxy
zh-cn	由agent代理程序监测

en-us	Monitored host
zh-cn	已监测的主机

en-us	Monitoring
zh-cn	监测

en-us	Monospace
zh-cn	等宽字体

en-us	Month
zh-cn	月

en-us	Monthly
zh-cn	每月

en-us	More matches found...
zh-cn	更多匹配发现...

en-us	More than 10 minutes
zh-cn	10分钟以上

en-us	More than %1$d matches for %2$s found
zh-cn	已找到匹配 %2$s 的超过 %1$d 项

en-us	More than one graph with name "%1$s" within host.
zh-cn	于主机中多于一个名为"%1$s"的图形.

en-us	Mozilla Firefox
zh-cn	Mozilla Firefox

en-us	ms
zh-cn	毫秒

en-us	Multiple
zh-cn	多重

en-us	Multiple PROBLEM events
zh-cn	多重问题事件

en-us	must be a valid LDAP user
zh-cn	必需为一个正确的LDAP用户

en-us	must be between "%1$s" and "%2$s"
zh-cn	必须在 "%1$s" 和 "%2$s" 之间

en-us	must contain at least one low-level discovery macro
zh-cn	必须包含至少一个底层发现宏

en-us	Mute
zh-cn	静音

en-us	name
zh-cn	名字

en-us	Name
zh-cn	用户名第一部分

en-us	Name
zh-cn	名称

en-us	Name of the form field should not exceed 255 characters.
zh-cn	表单字段的名称不得超过255个字符。

en-us	Network discovery data storage period
zh-cn	网络发现数据存储期

en-us	Network discovery event and alert data storage period
zh-cn	网络自动发现事件和报警数据存储周期

en-us	Network discovery event and alert data storage period "%1$s".
zh-cn	网络发现事件和警报数据存储期限 "%1$s" 。

en-us	Network interface list (includes interface type, status, IPv4 address, description). Returns text
zh-cn	网络接口列表（包括接口类型，状态，IPv4地址，说明）。返回文本

en-us	Network map added
zh-cn	网络拓扑图已添加

en-us	Network map deleted
zh-cn	网络拓扑图已删除

en-us	Network maps
zh-cn	网络拓扑图

en-us	Network map updated
zh-cn	网络拓扑图已添加

en-us	Never
zh-cn	从未

en-us	new
zh-cn	新

en-us	new
zh-cn	新

en-us	New
zh-cn	新的

en-us	New application
zh-cn	新的应用集

en-us	New application prototype
zh-cn	新的应用程序原型

en-us	New condition
zh-cn	新的触发条件

en-us	New dashboard
zh-cn	新仪表盘

en-us	New element
zh-cn	新的组件

en-us	New event host group
zh-cn	新的主机组事件

en-us	New event tag value
zh-cn	新的事件标记值

en-us	New host group
zh-cn	新的主机群组

en-us	New operation
zh-cn	新的操作

en-us	New regular expression
zh-cn	新的正则表达式

en-us	New service time
zh-cn	新的服务时间

en-us	New triggers
zh-cn	新触发器

en-us	Next step
zh-cn	下一步

en-us	NNTP
zh-cn	NNTP

en-us	No
zh-cn	不

en-us	No "%1$s" given for correlation.
zh-cn	"%1$s" 没有返回关联项。

en-us	No "%1$s" given for correlation "%2$s".
zh-cn	"%1$s"没有返回关联项"%2$s"。

en-us	No "%1$s" given for graph.
zh-cn	图形没有"%1$s".

en-us	No "%1$s" given for graph prototype.
zh-cn	图形原型没有"%1$s".

en-us	No "%1$s" given for map.
zh-cn	"%1$s" 在拓扑图中未定义。

en-us	No "%1$s" given for media type.
zh-cn	无"%1$s" 给与媒体值

en-us	No "%1$s" given for screen.
zh-cn	聚合图形的"%1$s"未配置

en-us	No "%1$s" given for template screen.
zh-cn	聚合图形的 "%1$s"未配置

en-us	No "%2$s" given for a filter condition of action "%1$s".
zh-cn	动作"%1$s"的过滤器条件未配置 "%2$s" 

en-us	No "%2$s" given for a filter condition of discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的过滤器条件的"%2$s"未配置

en-us	No "%2$s" given for the filter of action "%1$s".
zh-cn	动作 "%1$s"的过滤器未配置"%2$s".

en-us	No "%2$s" given for the filter of discovery rule "%1$s".
zh-cn	自动发现规则 "%1$s"的过滤器未配置"%2$s".

en-us	No agent interfaces found.
zh-cn	代理接口没有发现

en-us	No applications found.
zh-cn	没有发现应用集

en-us	No authentication type specified for action operation command "%s".
zh-cn	没有指定给动作操作命令"%s"的认证类型.

en-us	No authentication user name specified.
zh-cn	没有指定的认证用户名称

en-us	No authentication user name specified for action operation command "%s".
zh-cn	没有指定给动作操作命令"%s"的认证用户名称.

en-us	No command specified for action operation.
zh-cn	没有指定给动作操作的命令.

en-us	No command type specified for action operation.
zh-cn	没有指定给动作操作的命令类型.

en-us	No conditions defined.
zh-cn	没有已定义的条件.

en-us	No condition type given for correlation "%1$s".
zh-cn	关联项 "%1$s" 没有条件类型

en-us	no data
zh-cn	没有数据

en-us	No data
zh-cn	无数据

en-us	No data.
zh-cn	没有数据。

en-us	No data collection
zh-cn	无数据收集

en-us	No data found.
zh-cn	未发现数据

en-us	nodata() - No data received during period of time T (1 - true, 0 - false)
zh-cn	nodata() - 在周期 T 内没有收到数据（1 - true，0 - false）

en-us	No default interface for "%1$s" type on "%2$s".
zh-cn	在"%2$s"上的"%1$s"类型无默认接口.

en-us	No details
zh-cn	没有细节

en-us	No discovery rule IDs given.
zh-cn	没有所称的自动发现规则ID

en-us	No encryption
zh-cn	非加密

en-us	No execution target specified for action operation command "%s".
zh-cn	没有指定给动作操作命令"%s"的执行目标.

en-us	No file was uploaded.
zh-cn	没有文件上传.

en-us	No graph ID provided for screen element.
zh-cn	没有提供图形ID给聚合图形组件.

en-us	No graph item with graphid "%s".
zh-cn	没有图形ID"%s"的图形项目.

en-us	No graph prototype ID provided for screen element.
zh-cn	没有图表元素指定的数据图模板ID.

en-us	No graphs added.
zh-cn	未添加数据图.

en-us	No host given for macro "%1$s".
zh-cn	没有所知的宏"%1$s"的主机.

en-us	No host group ID provided for screen element.
zh-cn	没有提供主机群组给聚合图形组件。

en-us	No host groups with groupid "%s".
zh-cn	没有含群组ID"%s"的主机群组.

en-us	No host IDs given.
zh-cn	没有所知的主机IDs

en-us	No host selected.
zh-cn	未选定主机.

en-us	No host with hostid "%s".
zh-cn	没有含主机ID"%s"的主机.

en-us	No icon for map element "%s".
zh-cn	没有对应组件"%s"的图标.

en-us	No image
zh-cn	没有图片

en-us	No interface found
zh-cn	没有找到接口

en-us	No interface found.
zh-cn	没有找到接口.

en-us	No interface provided for proxy "%s".
zh-cn	代理"%s" 没有提供接口.

en-us	No interfaces for host "%s".
zh-cn	主机"%s" 没有提供接口.

en-us	No inventory mode specified for action operation.
zh-cn	要执行的动作的库存模式没有被设定。

en-us	No IPMI interfaces found.
zh-cn	没有发现IPMI接口

en-us	No item ID provided for screen element.
zh-cn	聚合图形组件没有提供监控项 ID。

en-us	No item prototype ID provided for screen element.
zh-cn	聚合图形元素没有配置项目模板ID。

en-us	No items defined.
zh-cn	没有已定义的监控项.

en-us	No item with itemid="%1$s".
zh-cn	没有含监控项ID"%1$s"的监控项.

en-us	No JMX interfaces found.
zh-cn	没有发现JMX接口

en-us	No macros found.
zh-cn	未发现宏

en-us	No map ID provided for screen element.
zh-cn	没有提供拓扑图ID给聚合图形组件.

en-us	No maps added.
zh-cn	未添加拓扑图.

en-us	No matches found
zh-cn	没有找到匹配

en-us	Non-boolean flags are deprecated.
zh-cn	不推荐使用非布尔标志。

en-us	none
zh-cn	无

en-us	None
zh-cn	无

en-us	nonempty key and value pair expected
zh-cn	期望非空键和值对

en-us	No operation type given for correlation "%1$s".
zh-cn	关联项 "%1$s" 没有操作类型

en-us	No permissions for system access.
zh-cn	没有系统访问权限。

en-us	No permissions to referred object or it does not exist!
zh-cn	没有权限退回物件的或其不存在!

en-us	No private key file specified.
zh-cn	没有指定的私钥.

en-us	No private key file specified for action operation command "%s".
zh-cn	没有指定给动作操作命令"%s"的私钥.

en-us	(no proxy)
zh-cn	(无agent代理程序)

en-us	No proxy
zh-cn	没有agent代理程序

en-us	No public key file specified.
zh-cn	没有指定的公钥文件

en-us	No public key file specified for action operation command "%s".
zh-cn	没有指定给动作操作命令"%s"的公钥文件.

en-us	No recipients for action operation message.
zh-cn	没有动作操作信息的收受者。

en-us	No refresh
zh-cn	没有刷新

en-us	Normal
zh-cn	正常

en-us	Normal view
zh-cn	正常视图

en-us	Norwegian (nb_NO)
zh-cn	挪威（nb_NO）

en-us	No screen ID provided for screen element.
zh-cn	没有提供聚合图形ID给聚合图形组件.

en-us	No screens added.
zh-cn	未添加聚合图形.

en-us	No script specified for action operation command.
zh-cn	没有指定给动作操作命令的脚本。

en-us	No SNMP community specified.
zh-cn	没有发现指定的SNMP团体名

en-us	No SNMP interfaces found.
zh-cn	没有发现SNMP接口.

en-us	No SNMP OID specified.
zh-cn	没有发现指定的SNMP OID值.

en-us	Not Ack
zh-cn	非确认

en-us	Not allowed to set password for user "guest".
zh-cn	不允许设定用户"guest"的密码.

en-us	Not all templates are linked to "%s".
zh-cn	并非所有的模板都连接到"%s".

en-us	No target selected
zh-cn	没有选择目标

en-us	No target selected.
zh-cn	没有已选的目标

en-us	Not authorised.
zh-cn	没有认证.

en-us	Not available
zh-cn	不可用

en-us	Not classified
zh-cn	未分类

en-us	Note
zh-cn	备注

en-us	Notes
zh-cn	备注

en-us	Nothing
zh-cn	空无

en-us	Nothing to do.
zh-cn	无事需做

en-us	Notification report
zh-cn	警报汇总

en-us	Notifications
zh-cn	警报

en-us	Notify all involved
zh-cn	通知所有参与者

en-us	not in
zh-cn	非在

en-us	No triggers defined.
zh-cn	没有已定义的触发器.

en-us	No trigger with triggerid "%1$s".
zh-cn	没有含触发器ID"%1$s"的触发器.

en-us	not selected
zh-cn	非所选的

en-us	Not supported
zh-cn	不支持的

en-us	Not Templated items
zh-cn	非模板监控项

en-us	No URL provided for screen element.
zh-cn	没有提供URL给聚合图形组件。

en-us	Nov
zh-cn	十一

en-us	November
zh-cn	十一月

en-us	now() - Number of seconds since the Epoch
zh-cn	now() - UNIX 时间

en-us	NTLM
zh-cn	NTLM

en-us	number
zh-cn	数字

en-us	Number of CPUs. Returns integer
zh-cn	CPU 数量，返回整数

en-us	Number of enabled items on the host.
zh-cn	主机启用监控项的数量

en-us	Number of hosts (enabled/disabled/templates)
zh-cn	主机数量（已启用/已禁用/模板）

en-us	Number of items (enabled/disabled/not supported)
zh-cn	监控项数量（已启用/已禁用/不支持）

en-us	Number of items in proxy history that are not yet sent to the server
zh-cn	系统代理程序历史数据中未发送给服务端的监控项数量

en-us	Number of items in the queue which are delayed by from to to seconds, inclusive.
zh-cn	队列中延时秒数的项目的数量，包括.

en-us	Number of items in Zabbix database.
zh-cn	Zabbix 数据库中的监控项数量

en-us	Number of monitored hosts
zh-cn	已监控主机的数量

en-us	Number of out-of-window collisions. Returns integer
zh-cn	网络冲突数量。返回整型

en-us	Number of problems
zh-cn	问题数量

en-us	Number of problems and expand most critical one
zh-cn	问题的数量和扩大最关键的一个

en-us	Number of processor cores on VMware hypervisor, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor的处理器内核数量,<url>-VMware服务URL,<uuid>-VMware hypervisor主机名

en-us	Number of processors on VMware virtual machine, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机的处理器数量,<url>-VMware服务URL,<uuid>-VMware 虚拟机主机名

en-us	Number of processor threads on VMware hypervisor, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor的处理器线程数量,<url>-VMware服务URL,<uuid>-VMware hypervisor主机名

en-us	Number of rows
zh-cn	行数

en-us	Number of slides
zh-cn	幻灯片数量

en-us	Number of status changes
zh-cn	状态改变次数

en-us	Number of steps
zh-cn	步骤数量

en-us	Number of triggers (enabled/disabled [problem/ok])
zh-cn	触发器数量（已启用/已禁用 [问题/正常]）

en-us	Number of triggers in Zabbix database.
zh-cn	Zabbix 数据库中的触发器数量

en-us	Number of unsupported items in Zabbix database.
zh-cn	Zabbix 数据库中不支持的监控项数量。

en-us	Number of unsupported items on the host.
zh-cn	主机中不迟滞的监控项数量。

en-us	Number of users logged in. Returns integer
zh-cn	已登录的用户数量，返回整数

en-us	Number of users (online)
zh-cn	用户数(线上)

en-us	Number of values stored in table HISTORY.
zh-cn	数据库中HISTORY表中值的条数.

en-us	Number of values stored in table HISTORY_LOG.
zh-cn	数据库中HISTORY_LOG表中值的条数.

en-us	Number of values stored in table HISTORY_STR.
zh-cn	数据库中 HISTORY_STR表中值的条数.

en-us	Number of values stored in table HISTORY_TEXT.
zh-cn	数据库中 HISTORY_TEXT表中值的条数.

en-us	Number of values stored in table HISTORY_UINT.
zh-cn	数据库中 HISTORY_UINT 表中值的条数。

en-us	Number of values stored in table TRENDS.
zh-cn	数据库中TRENDS表中值的条数.

en-us	Number of values stored in table TRENDS_UINT.
zh-cn	数据库中TRENDS_UINT表中值的条数.

en-us	Number of virtual machines on VMware hypervisor, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor管理的虚拟机数量，<url>-VMware服务URL，<uuid>- VMware hypervisor主机名

en-us	Number or percentage of inodes. Returns integer for number; float for percentage
zh-cn	数或inode的百分比。返回数字，如果是浮点则是百分比

en-us	Numeral systems
zh-cn	数字系统

en-us	Numeric (float)
zh-cn	浮点数

en-us	Numeric (integer)
zh-cn	数字（整数）

en-us	Numeric (unsigned)
zh-cn	数字 (无正负)

en-us	Oct
zh-cn	十月

en-us	Octal to decimal
zh-cn	八进制转十进制

en-us	October
zh-cn	十月

en-us	OEM
zh-cn	OEM

en-us	of
zh-cn	其

en-us	off
zh-cn	关闭

en-us	Off
zh-cn	关

en-us	Ok
zh-cn	正常

en-us	OK
zh-cn	正常

en-us	OK event closes
zh-cn	事件成功关闭

en-us	OK event generation
zh-cn	事件成功迭代

en-us	Old event tag value
zh-cn	过去的时间标签值

en-us	on
zh-cn	于

en-us	On
zh-cn	开

en-us	Once
zh-cn	一次

en-us	One
zh-cn	壹

en-us	One of the objects is left without a host group.
zh-cn	其中的一个对象被留下没有主机组.

en-us	One-time downtime
zh-cn	单次停机

en-us	One time only
zh-cn	一次性

en-us	Only administrators can set map owner.
zh-cn	只有管理员才可以设置拓扑图的所有人。

en-us	Only administrators can set screen owner.
zh-cn	只有管理员才可以设置聚合图形的所有者。

en-us	Only administrators can set slide show owner.
zh-cn	只允许管理员设置幻灯片的所有者。

en-us	Only items assigned to enabled hosts are counted
zh-cn	只计算指派给启用的主机的监控项

en-us	Only one change step is allowed.
zh-cn	只允许一次更改步骤。

en-us	Only one check can be unique.
zh-cn	只有一个检查可为唯一.

en-us	Only selected problem
zh-cn	只选择问题

en-us	Only super admins can create correlations.
zh-cn	只有超级管理员才能创建关联项。

en-us	(Only super admins can create groups)
zh-cn	(只有超级管理员能创建群组)

en-us	Only Super Admins can create host groups.
zh-cn	只有超级管理员可以创建主机群组.

en-us	Only Super Admins can create media types.
zh-cn	只有超级管理员可以创建报警媒介类型.

en-us	Only Super Admins can create user groups.
zh-cn	只要超级用户才能创建用户组。

en-us	Only super admins can create value maps.
zh-cn	只有管理员才能创建拓扑图值

en-us	Only Super Admins can delete media types.
zh-cn	只有超级管理员可以删除报警媒介类型.

en-us	Only Super Admins can delete user groups.
zh-cn	只有超级管理员可以删除用户群组.

en-us	Only super admins can delete value maps.
zh-cn	只有管理员才能删除拓扑图的值

en-us	Only Super Admins can edit media types.
zh-cn	只有超级管理员可以编辑报警媒介类型.

en-us	Only super admins can set dashboard owner.
zh-cn	只有超级管理员才能设置仪表板所有者。

en-us	Only super admins can update correlations.
zh-cn	只有超级管理员才能更新关联项。

en-us	Only Super Admins can update user groups.
zh-cn	只有超级用户才能更新用户组。

en-us	Only super admins can update value maps.
zh-cn	只有管理员才能更新拓扑图值

en-us	Only the last 20%% of the indicator is displayed.
zh-cn	只可显示最近的20%%的指示器.

en-us	Only triggers assigned to enabled hosts and depending on enabled items are counted
zh-cn	只计算指派给启用的主机的和相依于启用的项目的触发器

en-us	Only Zabbix agent, SNMPv1, SNMPv2 and SNMPv3 checks can be made unique.
zh-cn	只有Zabbix代理, SNMPv1,SNMPv2 和 SNMPv3检查才是独特的.

en-us	On status change triggers blink for
zh-cn	于状态改变时, 触发器因此闪烁于

en-us	OOB IP address
zh-cn	带外 IP 地址

en-us	OOB router
zh-cn	带外路由器

en-us	OOB subnet mask
zh-cn	带外子网掩码

en-us	Opera
zh-cn	Opera

en-us	Operating system information. Returns string
zh-cn	操作系统信息。返回字符串

en-us	Operation cannot be performed due to unauthorized request.
zh-cn	由于未认证的请求, 操作无法完成.

en-us	Operation condition
zh-cn	操作的条件

en-us	Operation details
zh-cn	操作细节

en-us	Operation has no group to operate.
zh-cn	操作并无群组来操作.

en-us	Operation has no template to operate.
zh-cn	操作并无模板来操作.

en-us	Operations
zh-cn	操作

en-us	Operation "%s" already exists.
zh-cn	操作"%s"已存在.

en-us	Operation type
zh-cn	操作类型

en-us	Operator
zh-cn	操作者

en-us	Options
zh-cn	选项

en-us	Or
zh-cn	或

en-us	OR
zh-cn	OR

en-us	Original
zh-cn	原始的

en-us	OS
zh-cn	操作系统

en-us	OS (Full details)
zh-cn	操作系统(所有细节)

en-us	OS (Short)
zh-cn	操作系统( 简短)

en-us	other
zh-cn	其它

en-us	Other
zh-cn	其他

en-us	Other configuration parameters
zh-cn	其它配置参数

en-us	Other parameters
zh-cn	其他参数

en-us	Others
zh-cn	其它

en-us	Outgoing traffic statistics on network interface. Returns integer
zh-cn	上行流量统计。返回整数

en-us	output
zh-cn	输出

en-us	Overridden by
zh-cn	覆盖被

en-us	Override item history period
zh-cn	覆盖监控项历史期间

en-us	Override item trend period
zh-cn	覆盖监控项趋势期间

en-us	Overrides
zh-cn	覆盖

en-us	Overview
zh-cn	概览

en-us	Overview by proxy
zh-cn	依agent代理程序概览

en-us	#### Overview  In the *Administration → Scripts* section user-defined global scripts can be configured and maintained.  Global scripts, depending on the configured scope and also user permissions, are available for execution:  -   from the [host     menu](/manual/web_interface/frontend_sections/monitoring/dashboard#host_menu)     in various frontend locations (*Dashboard*, *Problems*, *Latest     data*, *Maps*, etc) -   from the [event     menu](/manual/web_interface/frontend_sections/monitoring/problems#event_menu) -   can be run as an action operation  The scripts are executed on Zabbix agent, Zabbix server (proxy) or Zabbix server only. See also [Command execution](/manual/appendix/command_execution).  Both on Zabbix agent and Zabbix proxy remote scripts are disabled by default. They can be enabled by:  -   For remote commands executed on Zabbix agent     - adding an AllowKey=system.run[<command>,\*] parameter for each allowed     command in agent configuration, \* stands for wait and nowait mode; -   For remote commands executed on Zabbix proxy     - **Warning: It is not required to enable remote commands on Zabbix proxy if remote commands are executed on Zabbix agent that is monitored by Zabbix proxy.** If, however, it is required to execute remote commands on Zabbix proxy,     set *EnableRemoteCommands* parameter to '1' in the proxy configuration.      A listing of existing scripts with their details is displayed.  ![](../../../../../assets/en/manual/web_interface/scripts.png){width="600"}  Displayed data:  |Column|Description| |------|-----------| |*Name*|Name of the script. Clicking on the script name opens the script [configuration form](scripts#configuring_a_global_script).| |*Scope*|Scope of the script - action operation, manual host action or manual event action. This setting determines where the script is available.| |*Used in actions*|Actions where the script is used are displayed.| |*Type*|Script type is displayed - *Webhook*, *Script*, *SSH*, *Telnet* or *IPMI* command.| |*Execute on*|It is displayed whether the script will be executed on Zabbix agent, Zabbix server (proxy) or Zabbix server only.| |*Commands*|All commands to be executed within the script are displayed.| |*User group*|The user group that the script is available to is displayed (or *All* for all user groups).| |*Host group*|The host group that the script is available for is displayed (or *All* for all host groups).| |*Host access*|The permission level for the host group is displayed - *Read* or *Write*. Only users with the required permission level will have access to executing the script.|  To configure a new script, click on the *Create script* button in the top right-hand corner.
zh-cn	#### 概述  在 *管理 → 脚本* 部分，可以配置和维护用户定义的全局脚本。  全局脚本，取决于配置的范围和用户权限，可用于执行：  - 从[主机菜单](/manual/web_interface/frontend_sections/monitoring/dashboard#host_menu) 中的各个前端位置（*仪表板*、*问题*、*最新数据*、*拓扑图*等） - 从[事件菜单](/manual/web_interface/frontend_sections/monitoring/problems#event_menu) - 可以作为动作操作运行  脚本仅在 Zabbix agent、Zabbix  server（proxy）或 Zabbix server上执行。另请参见 [命令执行](/manual/appendix/command_execution)。  默认情况下，Zabbix agent和 Zabbix proxy远程脚本都被禁用。它们可以通过以下方式启用：  - 在agent配置中添加 `AllowKey=system.run[*]` 参数； - 在proxy配置中将 EnableRemoteCommands 参数设置为“1”  将显示现有脚本及其详细信息的列表。  ![](../../../../../assets/en/manual/web_interface/scripts.png){width="600"}  显示数据：  |栏目|说明| |--------|------------| |*名称*|脚本的名称。单击脚本名称打开脚本[配置表单](scripts#configuring_a_global_script)。| |*范围*|脚本的范围 - 动作操作、手动主机动作或手动事件动作。此设置确定脚本可用的位置。| |*用于动作*|显示使用脚本的动作。| |*类型*|显示脚本类型 - *Webhook*、*Script*、*SSH*、*Telnet* 或 *IPMI* 命令。| |*执行在*|显示脚本是在Zabbix agent、Zabbix server（proxy）还是仅在Zabbix server上执行。| |*命令*|显示脚本中要执行的所有命令。| |*用户组*|显示脚本可用的用户组（或 *全部* 所有用户组）。| |*主机组*|显示脚本可用的主机组（或 *全部* 用于所有主机组）。| |*主机访问*|显示主机组的权限级别 - *读* 或 *写*。只有具有所需权限级别的用户才能执行脚本。|  要配置新脚本，请单击右上角的 *创建脚本* 按钮。

en-us	Owner
zh-cn	所有者

en-us	Page received incorrect data
zh-cn	页面接收到错误的数据

en-us	Parameter
zh-cn	参数

en-us	Parameter "%1$s" is deprecated.
zh-cn	参数 "%1$s" 已被弃用。

en-us	Parameters
zh-cn	参数

en-us	Parent discovery rules
zh-cn	上层探索规则

en-us	Parent graphs
zh-cn	父图表

en-us	Parent items
zh-cn	上层监控项

en-us	Parent service
zh-cn	上层服务

en-us	Parent triggers
zh-cn	上层触发器

en-us	Parent web scenarios
zh-cn	上层 web 场景

en-us	Parse
zh-cn	分析

en-us	Parse error
zh-cn	解析错误

en-us	Parse SQL error [%1$s] in [%2$s].
zh-cn	解析SQL错误[%1$s]于[%2$s]之中.

en-us	Passive
zh-cn	被动式

en-us	Password
zh-cn	密码

en-us	Password is not mandatory for non internal authentication type.
zh-cn	非内部身份验证类型的密码不是强制的。

en-us	Password (once again)
zh-cn	密码 (再次确认)

en-us	Password should not be empty
zh-cn	密码不能为空

en-us	Paste
zh-cn	粘贴

en-us	Paste without external links
zh-cn	粘贴无外部链接

en-us	path
zh-cn	路径

en-us	pattern
zh-cn	模式

en-us	Pause operations for suppressed problems
zh-cn	暂停操作以制止问题

en-us	Pause operations for suppressed problems
zh-cn	暂停操作以制止问题

en-us	Pause operations for suppressed problems
zh-cn	暂停操作以制止问题

en-us	Peak memory usage: %1$s
zh-cn	峰值内存使用量：%1$s

en-us	Percentage
zh-cn	百分比

en-us	Percentile line (left)
zh-cn	百分比线(左)

en-us	Percentile line (right)
zh-cn	百分比线(右)

en-us	percentile() - Percentile P of a period T
zh-cn	percentile() - 周期 T 内的百分位数 P

en-us	Performs a DNS query. Returns character string with the required type of information
zh-cn	执行DNS查询。返回字符串信息

en-us	Period
zh-cn	期间

en-us	Periods
zh-cn	期间

en-us	Period type
zh-cn	期间类型

en-us	Permissions
zh-cn	权限

en-us	Permissions can be assigned for user groups only.
zh-cn	权限只能被指派给用户群组

en-us	Persian (fa_IR)
zh-cn	波斯语 (fa_IR)

en-us	PHP bcmath
zh-cn	PHP bcmath

en-us	PHP bcmath extension missing (PHP configuration parameter --enable-bcmath).
zh-cn	PHP不支持bcmath扩展(PHP配置参数--enable-bcmath).

en-us	PHP ctype
zh-cn	PHP ctype

en-us	PHP ctype extension missing (PHP configuration parameter --enable-ctype).
zh-cn	PHP不支持ctype扩展(PHP配置参数--enable-ctype).

en-us	PHP databases support
zh-cn	PHP支持的资料库

en-us	PHP gd
zh-cn	PHP gd

en-us	PHP gd extension missing (PHP configuration parameter --with-gd).
zh-cn	PHP gd 扩展不支持(PHP配置参数--with-gd).

en-us	PHP gd FreeType support
zh-cn	支持PHP gd FreeType

en-us	PHP gd FreeType support missing.
zh-cn	PHP gd FreeType不支持

en-us	PHP gd JPEG image support missing.
zh-cn	PHP gd JPEG 图片格式不支持

en-us	PHP gd JPEG support
zh-cn	支持PHP gd JPEG

en-us	PHP gd PNG image support missing.
zh-cn	PHP gd PNG 图片格式不支持

en-us	PHP gd PNG support
zh-cn	支持PHP gd PNG

en-us	PHP gettext
zh-cn	PHP gettext

en-us	PHP gettext extension missing (PHP configuration parameter --with-gettext). Translations will not be available.
zh-cn	PHP gettext 扩展不支持(PHP配置参数--with-gettext).多语言支持不可用.

en-us	PHP LDAP
zh-cn	PHP（世界最好的语言） LDAP

en-us	PHP LDAP extension missing.
zh-cn	缺少PHP LDAP扩展。

en-us	PHP libxml
zh-cn	PHP libxml

en-us	PHP libxml extension missing.
zh-cn	PHP libxml 扩展不支持

en-us	PHP mbstring
zh-cn	PHP mbstring

en-us	PHP mbstring extension missing (PHP configuration parameter --enable-mbstring).
zh-cn	PHP mbstring 扩展不支持(PHP配置参数 --enable-mbstring).

en-us	PHP option "%1$s"
zh-cn	PHP选项"%1$s"

en-us	PHP option "%1$s" must be set to "%2$s"
zh-cn	PHP选项"%1$s"必须设置"%2$s"

en-us	PHP session
zh-cn	PHP session

en-us	PHP session auto start must be disabled (PHP directive "session.auto_start").
zh-cn	PHP session自动开启必须被禁止(PHP配置项 "session.auto_start").

en-us	PHP session extension missing (PHP configuration parameter --enable-session).
zh-cn	PHP session 扩展不支持（PHP配置参数 --enable-session）。

en-us	PHP sockets
zh-cn	PHP sockets

en-us	PHP sockets extension missing (PHP configuration parameter --enable-sockets).
zh-cn	PHP sockets 扩展不支持(PHP配置参数 --enable-sockets).

en-us	PHP string function overloading must be disabled.
zh-cn	PHP字符串函数重载必须被禁用. 

en-us	PHP version
zh-cn	PHP版本

en-us	PHP xmlreader
zh-cn	PHP xmlreader

en-us	PHP xmlreader extension missing.
zh-cn	PHP xmlreader 扩展不支持

en-us	PHP xmlwriter
zh-cn	PHP xmlwriter

en-us	PHP xmlwriter extension missing.
zh-cn	PHP xmlwriter 扩展不支持

en-us	Pie
zh-cn	Pie

en-us	Placing algorithm
zh-cn	置入演算法

en-us	Plain text
zh-cn	文本

en-us	Play
zh-cn	播放

en-us	Play sound
zh-cn	播放声音

en-us	Please check configuration parameters. If all is correct, press "%1$s" button, or "%2$s" button to change configuration parameters.
zh-cn	请检查配置参数。如果无误请按%1$s" ，如果需要修改请按 "%2$s" 

en-us	Please create database manually, and set the configuration parameters for connection to this database. Press "%1$s" button when done.
zh-cn	请手动创建数据并且完成一些必要的设置。完成后按"%1$s"来结束。

en-us	Please enter the host name or host IP address and port number of the Zabbix server, as well as the name of the installation (optional).
zh-cn	请输入主机名或主机IP地址和zabbix服务器的端口号，以及安装的名称（可选）。

en-us	Please select two elements
zh-cn	请选择两个组件

en-us	Points
zh-cn	点

en-us	Point size
zh-cn	点尺寸

en-us	Polish (pl_PL)
zh-cn	波兰(pl_PL)

en-us	POP
zh-cn	POP

en-us	Populates host inventory field
zh-cn	填入主机资产纪录栏位

en-us	Port
zh-cn	端口

en-us	Port cannot be empty for host interface.
zh-cn	主机接口的端口不能为空.

en-us	Port range
zh-cn	端口范围

en-us	Portuguese (pt_BR)
zh-cn	波兰语 (pt_BR)

en-us	Portuguese (pt_PT)
zh-cn	葡萄牙语 (pt_PT)

en-us	Post fields
zh-cn	发布字段

en-us	Post type
zh-cn	发布类型

en-us	Pre-installation summary
zh-cn	安装前汇总

en-us	Preprocessing
zh-cn	进程

en-us	Preprocessing steps
zh-cn	预定步骤

en-us	Preview
zh-cn	预览

en-us	Previous month
zh-cn	上一个月

en-us	Previous week
zh-cn	上一周

en-us	Previous year
zh-cn	去年

en-us	prev() - Previous value
zh-cn	prev() - 前一个值

en-us	Primary POC cell
zh-cn	主要的POC手机

en-us	Primary POC email
zh-cn	主要的POC email

en-us	Primary POC name
zh-cn	主要的POC名称

en-us	Primary POC notes
zh-cn	主要的POC注记

en-us	Primary POC phone A
zh-cn	主要的POC电话A

en-us	Primary POC phone B
zh-cn	主要的POC电话B

en-us	Primary POC screen name
zh-cn	主要的POC屏幕名称

en-us	Privacy passphrase
zh-cn	私钥

en-us	Privacy protocol
zh-cn	隐私协议

en-us	Private
zh-cn	Private（私人的）

en-us	Private key file
zh-cn	私钥文件

en-us	Privilege level
zh-cn	优先权层级

en-us	Problem
zh-cn	问题

en-us	PROBLEM
zh-cn	问题

en-us	Problem created
zh-cn	问题已创建

en-us	Problem display
zh-cn	问题显示

en-us	PROBLEM event generation mode
zh-cn	问题事件生成模式

en-us	Problem expression
zh-cn	问题表现形式

en-us	Problem hosts
zh-cn	问题主机

en-us	Problem, if all children have problems
zh-cn	问题, 如果所有的下层都有问题

en-us	Problem, if at least one child has a problem
zh-cn	问题, 如果至少一个下层有一个问题

en-us	Problem is not suppressed
zh-cn	问题没有被制止

en-us	Problem is suppressed
zh-cn	问题已被制止

en-us	Problem on
zh-cn	问题在

en-us	problem pattern
zh-cn	问题模式

en-us	Problem resolved
zh-cn	问题已解决

en-us	Problems
zh-cn	问题

en-us	Problems by severity
zh-cn	按严重性的问题

en-us	Problem time
zh-cn	问题时间

en-us	Process CPU utilisation percentage. Returns float
zh-cn	CPU进程百分比。返回浮点值

en-us	Properties
zh-cn	属性

en-us	Provided URL "%1$s" is invalid.
zh-cn	提供的 URL "%1$s" 无效。

en-us	Proxies
zh-cn	agent代理程序

en-us	Proxy
zh-cn	agent代理程序

en-us	Proxy "%1$s" for host "%2$s" does not exist.
zh-cn	主机"%2$s"的agent代理程序"%1$s"不存在.

en-us	Proxy "%1$s" is used by action "%2$s".
zh-cn	代理  "%1$s" 已被动作 "%2$s" 使用。

en-us	Proxy "%1$s" is used by discovery rule "%2$s".
zh-cn	agent代理程序"%1$s"是用在自动发现规则"%2$s"上.

en-us	Proxy added
zh-cn	agent代理程序已添加

en-us	Proxy address
zh-cn	代理地址

en-us	Proxy deleted
zh-cn	agent代理程序已删除

en-us	Proxy interface creation failed.
zh-cn	系统代理程序接口创建失败

en-us	Proxy interface update failed.
zh-cn	系统代理程序接口更新失败

en-us	Proxy mode
zh-cn	系统代理程序模式

en-us	Proxy name
zh-cn	agent代理程序名称

en-us	Proxy "%s" already exists.
zh-cn	agent代理程序"%s"已存在.

en-us	Proxy updated
zh-cn	agent代理程序已添加

en-us	PSK
zh-cn	共享密钥（PSK）

en-us	PSK identity
zh-cn	共享密钥一致性

en-us	PSK is too short. Minimum is %1$s hex-digits.
zh-cn	PSK太短。最小的值是 %1$s 的十六进制数字。

en-us	Public
zh-cn	公开

en-us	Public key
zh-cn	公钥

en-us	Public key file
zh-cn	公钥文件

en-us	Query fields
zh-cn	查询字段

en-us	Queue
zh-cn	队列

en-us	Queue of items to be updated
zh-cn	项目队列已被更新

en-us	Raw data
zh-cn	原始数据

en-us	Raw post
zh-cn	原始发布

en-us	Read
zh-cn	读

en-us	Read only
zh-cn	只读

en-us	Read-only
zh-cn	只读

en-us	Read-write
zh-cn	读写

en-us	Reason
zh-cn	理由

en-us	Received value
zh-cn	接收到的值

en-us	Recent problems
zh-cn	最近的问题

en-us	Recipient
zh-cn	接收者

en-us	Recipient (ascending)
zh-cn	接收者(升序)

en-us	Recipient (descending)
zh-cn	接收者(降序)

en-us	Recovery
zh-cn	恢复

en-us	Recovery expression
zh-cn	恢复表达式

en-us	Recovery expression syntax error.
zh-cn	恢复表达式语法错误。

en-us	Recovery operations
zh-cn	恢复操作

en-us	Recovery time
zh-cn	恢复时间

en-us	Rectangle
zh-cn	矩形

en-us	Refresh
zh-cn	刷新

en-us	refreshed every %1$s sec.
zh-cn	每%1$s秒刷新一次

en-us	Refresh interval
zh-cn	刷新间隔

en-us	Refresh interval multiplier
zh-cn	刷新间隔倍数

en-us	Refresh unsupported items
zh-cn	刷新不支持的项目

en-us	Refresh unsupported items "%1$s".
zh-cn	刷新不支持的项目 "%1$s" 。

en-us	regexp() - Regular expression V matching last value in period T (1 - match, 0 - no match)
zh-cn	regexp() - 在周期 T 内，将最后的值与正则表达式 V 匹配（1 - 匹配，0 - 不匹配）

en-us	Regular
zh-cn	常规

en-us	regular expression
zh-cn	正则表达式

en-us	Regular expression
zh-cn	正则表达式

en-us	Regular expression added
zh-cn	正则表达式已添加

en-us	Regular expression deleted
zh-cn	正则表达式已删除

en-us	Regular expression does not exist.
zh-cn	正则表达式不存在

en-us	Regular expression must be a string
zh-cn	正则表达式必须是一个字符串

en-us	Regular expressions
zh-cn	正则表达式

en-us	Regular expression "%s" already exists.
zh-cn	正则表达式"%s"已存在.

en-us	#### Regular expression support by location  |Location|<|Regular expression|Global regular expression|Comments| |--------|-|----|----|----------------| |**[Agent items](/manual/config/items/itemtypes/zabbix_agent)**|<|<|<|<| |<|eventlog\[\]|Yes|Yes|`regexp`, `severity`, `source`, `eventid` parameters| |^|log\[\]|^|^|`regexp` parameter| |^|log.count\[\]|^|^|^| |^|logrt\[\]|^|Yes/No|`regexp` parameter supports both, `file_regexp` parameter supports non-global expressions only| |^|logrt.count\[\]|^|^|^| |^|proc.cpu.util\[\]|^|No|`cmdline` parameter| |^|proc.mem\[\]|^|^|^| |^|proc.num\[\]|^|^|^| |^|sensor\[\]|^|^|`device` and `sensor` parameters on Linux 2.4| |^|system.hw.macaddr\[\]|^|^|`interface` parameter| |^|system.sw.packages\[\]|^|^|`package` parameter| |^|vfs.dir.count\[\]|^|^|`regex_incl`, `regex_excl`, `regex_excl_dir` parameters| |^|vfs.dir.size\[\]|^|^|`regex_incl`, `regex_excl`, `regex_excl_dir` parameters| |^|vfs.file.regexp\[\]|^|^|`regexp` parameter| |^|vfs.file.regmatch\[\]|^|^|^| |^|web.page.regexp\[\]|^|^|^| |**[SNMP traps](/manual/config/items/itemtypes/snmptrap)**|<|<|<|<| |<|snmptrap\[\]|Yes|Yes|`regexp` parameter| |**[Item value preprocessing](/manual/config/items/item#item_value_preprocessing)**|<|Yes|No|`pattern` parameter| |**[Functions for triggers/calculated items](/manual/appendix/functions)**|<|<|<|<| |<|count()|Yes|Yes|`pattern` parameter if `operator` parameter is *regexp* or *iregexp*| |<|countunique()|Yes|Yes|^| |<|find()|Yes|Yes|^| |^|logeventid()|Yes|Yes|`pattern` parameter| |^|logsource()|^|^|^| |**[Low-level discovery](/manual/discovery/low_level_discovery#discovery_rule_filter)**|<|<|<|<| |<|Filters|Yes|Yes|*Regular expression* field| |^|Overrides|Yes|No|In *matches*, *does not match* options for *Operation* conditions| |**[Action conditions](/manual/config/notifications/action/conditions)**|<|Yes|No|In *matches*, *does not match* options for *Host name* and *Host metadata* autoregistration conditions| |**[Web monitoring](/manual/web_monitoring#configuring_a_web_scenario)**|<|Yes|No|*Variables* with a **regex:** prefix<br>*Required string* field| |**[User macro context](/manual/config/macros/user_macros#user_macro_context)**|<|Yes|No|In macro context with a **regex:** prefix| |**[Macro functions](/manual/config/macros/macro_functions)**|<|<|<|<| |<|regsub()|Yes|No|`pattern` parameter| |^|iregsub()|^|^|^| |**[Icon mapping](/manual/web_interface/frontend_sections/administration/general#icon_mapping)**|<|Yes|Yes|*Expression* field| |**[Value mapping](/manual/config/items/mapping#configuration)**|<|Yes|No|*Value* field if mapping type is `regexp`|
zh-cn	#### 支持正则表达式的位置  |位置|<|正则表达式|全局正则表达式|注释| |--------|-|------------------|-------------------------|--------| |**[Agent 监控项](/manual/config/items/itemtypes/zabbix_agent)**|<|<|<|<| |<|eventlog\[\]|是|是|`regexp`, `severity`, `source`, `eventid` 参数| |^|log\[\]|^|^|`regexp` 参数| |^|log.count\[\]|^|^|^| |^|logrt\[\]|^|是/否|`regexp` 参数两者都支持，`file_regexp` 参数仅支持非全局表达式| |^|logrt.count\[\]|^|^|^| |^|proc.cpu.util\[\]|^|否|`cmdline` 参数| |^|proc.mem\[\]|^|^|^| |^|proc.num\[\]|^|^|^| |^|sensor\[\]|^|^|Linux 2.4的 `device` 和 `sensor` 参数 | |^|system.hw.macaddr\[\]|^|^|`interface` 参数| |^|system.sw.packages\[\]|^|^|`package` 参数| |^|vfs.dir.count\[\]|^|^|`regex_incl`, `regex_excl`, `regex_excl_dir` 参数| |^|vfs.dir.size\[\]|^|^|`regex_incl`, `regex_excl`, `regex_excl_dir` 参数| |^|vfs.file.regexp\[\]|^|^|`regexp` 参数| |^|vfs.file.regmatch\[\]|^|^|^| |^|web.page.regexp\[\]|^|^|^| |**[SNMP traps](/manual/config/items/itemtypes/snmptrap)**|<|<|<|<| |<|snmptrap\[\]|是|是|`regexp` 参数| |**[监控项值预处理](/manual/config/items/item#item_value_preprocessing)**|<|是|否|`pattern` 参数| |**[触发器函数/可计算监控项](/manual/appendix/functions)**|<|<|<|<| |<|count()|是|是|`pattern` 参数如果 `operator` 参数是 *regexp* 或 *iregexp*| |<|countunique()|是|是|^| |<|find()|是|是|^| |^|logeventid()|是|是|`pattern` 参数| |^|logsource()|^|^|^| |**[低级别自动发现](/manual/discovery/low_level_discovery#discovery_rule_filter)**|<|<|<|<| |<|Filters（过滤）|是|是|*正则表达式* 字段| |^|Overrides（覆盖）|是|否|在*Operation（操作）* 条件中 *matches（匹配）*、*does not match（不匹配）* 选项 | |**[动作条件](/manual/config/notifications/action/conditions)**|<|是|否|在 *Host name（主机名）* and *Host metadata（主机元数据）* 自动注册条件中 *matches（匹配）*、*does not match（不匹配）* 选项 | |**[Web 监控](/manual/web_monitoring#configuring_a_web_scenario)**|<|是|否|以 **regex:** 为前缀的变量 <br>*Required string（需要字符串）* 字段| |**[用户宏上下文](/manual/config/macros/user_macros#user_macro_context)**|<|是|否|在宏的上下文中带有 **regex:** 前缀| |**[宏函数](/manual/config/macros/macro_functions)**|<|<|<|<| |<|regsub()|是|否|`pattern` 参数| |^|iregsub()|^|^|^| |**[图标映射](/manual/web_interface/frontend_sections/administration/general#icon_mapping)**|<|是|是|*Expression* field| |**[值映射](/manual/config/items/mapping#configuration)**|<|是|否|*Value（值）* 字段如果值映射是`regexp`|

en-us	Regular expression updated
zh-cn	正则表达式已更新

en-us	Regular items
zh-cn	常规监控项

en-us	Remember me for 30 days
zh-cn	30天内记住我

en-us	remember selected
zh-cn	记住所选的

en-us	Remote command
zh-cn	远程命令

en-us	Remove
zh-cn	移除

en-us	Remove, %1$s
zh-cn	删除，%1$s

en-us	Removed, %1$s
zh-cn	已删除，%1$s

en-us	Remove domain name
zh-cn	删除域名

en-us	Remove from favourites
zh-cn	自常用的移除

en-us	Remove from host group
zh-cn	自主机群组移除

en-us	Remove from host groups
zh-cn	自主机群组移除

en-us	Remove host
zh-cn	移除主机

en-us	Remove host groups
zh-cn	删除主机群组

en-us	Replace
zh-cn	替换

en-us	Replace applications
zh-cn	替换应用程序

en-us	Replace dependencies
zh-cn	替换依赖关系

en-us	Replace host groups
zh-cn	替换主机群组

en-us	Replace tags
zh-cn	替换标记

en-us	Reports
zh-cn	报表

en-us	Request body
zh-cn	请求正文

en-us	Request body
zh-cn	请求正文

en-us	Request body
zh-cn	请求正文

en-us	Request body type
zh-cn	请求 body 类型

en-us	Request body type
zh-cn	请求 body 类型

en-us	Request body type
zh-cn	请求 body 类型

en-us	Request sent successfully
zh-cn	请求发送成功

en-us	Request type
zh-cn	请求类型

en-us	Required
zh-cn	要求的

en-us	Required host permissions
zh-cn	要求的主机权限

en-us	Required performance of the Zabbix server, in new values per second expected.
zh-cn	Zabbix服务器所需求的性能,每秒钟处理的新值数.

en-us	Required performance (vps)
zh-cn	要求的性能(vps)

en-us	Required server performance, new values per second
zh-cn	要求的主机性能, 每秒新值

en-us	Required status codes
zh-cn	要求的状态码

en-us	Required string
zh-cn	要求的字串

en-us	Reset
zh-cn	重设

en-us	Reset all fields to default values?
zh-cn	重设所有的栏位为默认值?

en-us	Reset confirmation
zh-cn	重设确认

en-us	Reset defaults
zh-cn	重设预设

en-us	Resolved
zh-cn	已解决

en-us	RESOLVED
zh-cn	已解决

en-us	Resolved by
zh-cn	处理方法

en-us	Resolved by correlation rule.
zh-cn	通过关联规则解析。

en-us	Resolved by correlation rule "%1$s".
zh-cn	通过关联规则解析"%1$s"。

en-us	Resolved by user "%1$s".
zh-cn	用户解决"%1$s"。

en-us	Resource
zh-cn	资源

en-us	Response code
zh-cn	响应代码

en-us	Response time
zh-cn	响应时间

en-us	Result
zh-cn	结果

en-us	Result is FALSE
zh-cn	结果为假

en-us	Result is TRUE
zh-cn	结果为真

en-us	Result type
zh-cn	结果类型

en-us	Retrieve mode
zh-cn	恢复模式

en-us	Retrieve only headers
zh-cn	仅获取头信息

en-us	Retrieving contents of a file. Returns text
zh-cn	搜索文件内容。返回文本

en-us	Retry
zh-cn	重试

en-us	Return a JSON object describing the MBean objects or their attributes. Can be used for LLD.
zh-cn	返回描述MBean对象或其属性的JSON对象。 可用于LLD。

en-us	Return first column of the first row of the SQL query result.
zh-cn	返回SQL查询结果的第一行的第一列中。

en-us	Returns a JSON object describing the host network interfaces configured in Zabbix. Can be used for LLD.
zh-cn	返回描述Zabbix中配置的主机网络接口的JSON对象。 可用于LLD。

en-us	Returns availability of a particular type of checks on the host. Value of this item corresponds to availability icons in the host list. Valid types are: agent, snmp, ipmi, jmx.
zh-cn	返回主机的普通类型检查的可用性。这个项目的值反映到主机列表的可用性图标上。有效的类型有:agent,snmp,ipmi,jmx.

en-us	Returns current maintenance status of the host.
zh-cn	返回主机当前的维护状态.

en-us	Returns ICMP ping response time in seconds. Example: 0.02
zh-cn	返回ICMP ping的响应时间单位秒.例如：0.02

en-us	Returns information associated with Zabbix Java gateway. Valid params are: ping, version.
zh-cn	返回与Zabbix Java应用网关相关联的信息。可用的参数有：ping,version.

en-us	Returns percentage of lost ICMP ping packets.
zh-cn	返回ICMP ping包丢失的百分数.

en-us	Return value of an attribute of MBean object.
zh-cn	返回值为MBean对象的属性。

en-us	right
zh-cn	正确

en-us	Right
zh-cn	右

en-us	Right trim
zh-cn	修整右边

en-us	Right Y
zh-cn	Right Y

en-us	Right Y
zh-cn	Right Y

en-us	Right Y
zh-cn	Right Y

en-us	RMCP+
zh-cn	RMCP+

en-us	Romanian (ro_RO)
zh-cn	罗马尼亚(ro_RO)

en-us	root
zh-cn	root

en-us	Row added
zh-cn	行已经添加

en-us	Row deleted
zh-cn	行已经删除

en-us	Rows
zh-cn	行

en-us	Row span
zh-cn	行宽度

en-us	Rows per page
zh-cn	每页行数

en-us	ruleid of dependent item and master item should match
zh-cn	依赖项和主监控项的 ruleid 应匹配

en-us	Rules
zh-cn	规则

en-us	Run commands
zh-cn	执行命令

en-us	Run custom commands on %1$s
zh-cn	在 %1$s 上运行自定义命令

en-us	Run global script
zh-cn	执行全局脚本

en-us	Run IPMI command
zh-cn	执行IPMI命令

en-us	Run remote commands on current host
zh-cn	于当前主机上执行远程命令

en-us	Run remote commands on host groups
zh-cn	于主机群组上执行远程命令

en-us	Run remote commands on hosts
zh-cn	于主机上执行远程命令

en-us	Run specified command on the host. Returns text result of the command; 1 - with mode as nowait (regardless of command result)
zh-cn	即在主机上指定的命令的执行。返回命令执行结果的文本值。如果指定NOWAIT的模式，这将返回执行命令的结果1。

en-us	Run SSH commands
zh-cn	执行SSH命令

en-us	Run TELNET commands
zh-cn	执行TELNET命令

en-us	Russian (ru_RU)
zh-cn	俄语 (ru_RU)

en-us	s
zh-cn	s

en-us	S
zh-cn	S

en-us	S
zh-cn	S

en-us	Safari
zh-cn	Safari

en-us	Sans-Serif
zh-cn	无衬线字体

en-us	Sat
zh-cn	六

en-us	Saturday
zh-cn	周六

en-us	Save changes
zh-cn	保存设置

en-us	Save it as "%1$s"
zh-cn	保存为 "%1$s"

en-us	Scenario
zh-cn	场景

en-us	Schedule
zh-cn	排程

en-us	Scheduled check
zh-cn	时刻表检查

en-us	Scheduling
zh-cn	调度

en-us	Scope
zh-cn	范围

en-us	Screen
zh-cn	聚合图形

en-us	Screen "%1$s" already exists.
zh-cn	聚合图形"%1$s"已存在.

en-us	Screen "%1$s" already exists on template "%2$s".
zh-cn	聚合图形"%1$s"已存在于模板"%2$s"中.

en-us	Screen "%1$s" cell X - %2$s Y - %3$s is already taken.
zh-cn	图表"%1$s" 单元格X-%2$s Y - %3$s已经使用.

en-us	Screen "%1$s" column span in cell X - %2$s Y - %3$s is incorrect.
zh-cn	图表 "%1$s"单元格X - %2$s Y - %3$s列合并不正确.

en-us	Screen "%1$s" column span in cell X - %2$s Y - %3$s is too big.
zh-cn	图表 "%1$s"单元格X - %2$s Y - %3$s太大.

en-us	Screen "%1$s" is public and read-only sharing is disallowed.
zh-cn	聚合图形 "%1$s" 只读，不能共享。

en-us	Screen "%1$s" row span in cell X - %2$s Y - %3$s is incorrect.
zh-cn	图表"%1$s"单元格X - %2$s Y - %3$s行合并不正确. 

en-us	Screen "%1$s" row span in cell X - %2$s Y - %3$s is too big.
zh-cn	图表"%1$s"单元格X - %2$s Y - %3$s行合并太大.

en-us	Screen added
zh-cn	聚合图形已添加

en-us	Screen deleted
zh-cn	聚合图形已删除

en-us	Screen name cannot be empty.
zh-cn	聚合图形名字不能为空。

en-us	Screen owner cannot be empty.
zh-cn	聚合图形所有者不能为空。

en-us	Screens
zh-cn	聚合图形

en-us	Screen updated
zh-cn	聚合图形已更新

en-us	Script
zh-cn	脚本

en-us	Script "%1$s" already exists.
zh-cn	脚本"%1$s"已经存在.

en-us	Script added
zh-cn	脚本已添加

en-us	Script deleted
zh-cn	脚本已删除

en-us	Script menu path "%1$s" already used in script name "%2$s".
zh-cn	脚本菜单路径"%1$s"已经应用于脚本名 "%2$s"

en-us	Script name
zh-cn	脚本名称

en-us	Script name "%1$s" already used in menu path for script "%2$s".
zh-cn	脚本名"%1$s"已经在脚本"%2$s"的菜单路径中使用.

en-us	Script parameters
zh-cn	脚本参数

en-us	Script parameters "%1$s" are missing the last new line feed for media type "%2$s".
zh-cn	脚本参数 "%1$s" 没有在上一个换行中找到对应 "%2$s" 的媒体类型。

en-us	Script profiler
zh-cn	脚本探查器

en-us	Scripts
zh-cn	脚本

en-us	Script updated
zh-cn	脚本已更新

en-us	Search
zh-cn	搜索

en-us	Search attribute
zh-cn	搜索属性

en-us	Search pattern is empty
zh-cn	查找式样为空

en-us	second
zh-cn	秒

en-us	Secondary POC cell
zh-cn	第二个POC手机号码

en-us	Secondary POC email
zh-cn	第二个POC email

en-us	Secondary POC name
zh-cn	第二个POC名称

en-us	Secondary POC notes
zh-cn	第二个POC注记

en-us	Secondary POC phone A
zh-cn	第二个POC电话A

en-us	Secondary POC phone B
zh-cn	第二个POC电话B

en-us	Secondary POC screen name
zh-cn	第二个POC聚合图形名称

en-us	second parameter is expected
zh-cn	预设的第二参数

en-us	Seconds
zh-cn	秒

en-us	Security level
zh-cn	安全级别

en-us	Security name
zh-cn	安全名称

en-us	Select
zh-cn	选择

en-us	selected
zh-cn	选择

en-us	Selected
zh-cn	选择的

en-us	Selected, %1$s in position %2$d of %3$d
zh-cn	已选择，%1$s 在 %2$d 位置的 %3$d

en-us	Selected, %1$s, read only, in position %2$d of %3$d
zh-cn	已选择，%1$s，只读，位于 %3$d 的位置 %2$d

en-us	Selected actions deleted
zh-cn	所选的动作已删除

en-us	Selected and all other problems of related triggers
zh-cn	已选择的和所有其他问题的关联触发器

en-us	Selected correlations deleted
zh-cn	删除选择的关联项

en-us	Selected elements
zh-cn	所选的组件

en-us	Selected items only
zh-cn	仅选择的监控项

en-us	Select prototype
zh-cn	选择原型

en-us	Select widget
zh-cn	选择构件

en-us	Send backward
zh-cn	往后发送

en-us	Send message
zh-cn	发送消息

en-us	Send message to user groups
zh-cn	发送消息给用户群组

en-us	Send message to users
zh-cn	发送消息给用户

en-us	Send only to
zh-cn	仅送到

en-us	Send to
zh-cn	收件人

en-us	Send to back
zh-cn	发回

en-us	Send to User groups
zh-cn	发送到用户群组

en-us	Send to Users
zh-cn	发送到用户

en-us	Sent
zh-cn	已送达

en-us	Sep
zh-cn	九月

en-us	Separated
zh-cn	分开的

en-us	September
zh-cn	九月

en-us	Serial number A
zh-cn	序列号A

en-us	Serial number B
zh-cn	序列号B

en-us	Serif
zh-cn	截线

en-us	Server
zh-cn	服务器

en-us	Server (proxy)
zh-cn	服务器（代理）

en-us	Server time
zh-cn	服务器时间

en-us	Service
zh-cn	服务

en-us	Service "%1$s" cannot be deleted, because it is dependent on another service.
zh-cn	服务"%1$s"不能被删除, 因为它依赖于另一个服务.

en-us	Service "%1$s" cannot be dependent on itself.
zh-cn	服务"%1$s"不能依赖于自己.

en-us	Service "%1$s" cannot be linked to a trigger and have children at the same time.
zh-cn	服务 "%1$s"不能被链接到一个触发器且同时有依赖的服务.

en-us	Service "%1$s" is already hardlinked to a different service.
zh-cn	服务"%1$s"已经硬链接到一个不同的服务.

en-us	Service availability report
zh-cn	服务可用性报告

en-us	Service cannot be parent and child at the same time.
zh-cn	服务不能同时为上层与下层

en-us	Service created
zh-cn	服务被创建

en-us	Service data storage period
zh-cn	服务数据存储期

en-us	Service data storage period "%1$s".
zh-cn	服务数据存储期 "%1$s" 。

en-us	Service deleted
zh-cn	服务已删除

en-us	Service deleted
zh-cn	服务已删除

en-us	Service dependencies
zh-cn	服务依赖

en-us	Service parent
zh-cn	Service 从属

en-us	Service port
zh-cn	服务端口

en-us	Services
zh-cn	服务

en-us	Services form a circular dependency.
zh-cn	服务形成了一个环.

en-us	Service start time must be less than end time.
zh-cn	服务的开始时间不能晚于截止时间.

en-us	Service times
zh-cn	服务次数

en-us	Service type
zh-cn	服务类型

en-us	Service updated
zh-cn	服务已更新

en-us	Session terminated, re-login, please.
zh-cn	会话已中断, 请重新登录.

en-us	Set custom time period
zh-cn	设置自定义时间段

en-us	Set host inventory mode
zh-cn	设置主机清单模式

en-us	Setting LDAP dereferencing mode failed.
zh-cn	设置 LDAP 解除引用模式失败。

en-us	Setting LDAP protocol failed.
zh-cn	设置 LDAP 协议失败。

en-us	Setting LDAP referrals to "Off" failed.
zh-cn	将 LDAP 引用设置为「关闭」失败。

en-us	Severity
zh-cn	严重性

en-us	Severity changed
zh-cn	严重性发生改变

en-us	Severity changes
zh-cn	严重性变化

en-us	Severity decreased
zh-cn	严重性下降

en-us	Severity (descending)
zh-cn	严重性(降序)

en-us	Severity increased
zh-cn	严重性提升

en-us	SHA
zh-cn	SHA

en-us	Shape
zh-cn	形

en-us	Sharing
zh-cn	分享

en-us	Sharing option "%1$s" is missing a value for map "%2$s".
zh-cn	共享选项 "%1$s" 没有在拓补图中指定值 "%2$s" 。

en-us	Sharing option "%1$s" is missing a value for screen "%2$s".
zh-cn	共享选项 "%1$s" 没有在聚合图形中指定值 "%2$s" 。

en-us	short description
zh-cn	简要描述

en-us	Shortened
zh-cn	缩短

en-us	should be empty
zh-cn	可能是空的

en-us	Show
zh-cn	查看

en-us	Show details
zh-cn	查看细节

en-us	Show hosts in maintenance
zh-cn	查看维修中主机

en-us	show icon mappings
zh-cn	展示图标映射

en-us	Show items without data
zh-cn	查看无资料项目

en-us	Show latest values
zh-cn	显示最新的值

en-us	Show legend
zh-cn	查看图例

en-us	Show lines
zh-cn	查看线条

en-us	Shown
zh-cn	已查看

en-us	Show problems
zh-cn	显示问题

en-us	Show selected
zh-cn	查看所选的

en-us	Show suppressed problems
zh-cn	显示处理的问题

en-us	Show tags
zh-cn	显示标签

en-us	Show text as HTML
zh-cn	查看HTML文字

en-us	Show timeline
zh-cn	显示时间线

en-us	Show triggers
zh-cn	查看触发器

en-us	Show unacknowledged only
zh-cn	仅显示未确认

en-us	Show unavailable maps
zh-cn	显示不可用的地图

en-us	Show value
zh-cn	查看值

en-us	show value mappings
zh-cn	展示值映射

en-us	Show warning if Zabbix server is down
zh-cn	当Zabbix服务器停机时显示警告

en-us	Show working time
zh-cn	查看工作时间

en-us	Sign in
zh-cn	登录

en-us	Sign in with HTTP
zh-cn	使用 HTTP 登录

en-us	Sign out
zh-cn	退出

en-us	Simple
zh-cn	简单

en-us	Simple change
zh-cn	简单更改

en-us	Simple check
zh-cn	简单检查

en-us	Simple graph
zh-cn	简单图形

en-us	Simple graph prototype
zh-cn	简单数据图模板

en-us	Single
zh-cn	单个

en-us	Site address A
zh-cn	场所地址A

en-us	Site address B
zh-cn	场所地址B

en-us	Site address C
zh-cn	场所地址C

en-us	Site city
zh-cn	场所城市

en-us	Site country
zh-cn	场所国家

en-us	Site notes
zh-cn	场所备注

en-us	Site rack location
zh-cn	场所机柜位置

en-us	Site state / province
zh-cn	场所州/省

en-us	Site ZIP / postal
zh-cn	地址邮政编码

en-us	Size
zh-cn	大小

en-us	Size of the response received from Zabbix server "%1$s" exceeds the allowed size of %2$s bytes. This value can be increased in the ZBX_SOCKET_BYTES_LIMIT constant in include/defines.inc.php.
zh-cn	Zabbix服务器"%1$s" 收到响应的大小字节超过允许的大小%2$s 。这个值通过在Zinclude / defines.inc.php文件中定义的ZBX_SOCKET_BYTES_LIMIT 变量来增加.

en-us	Skipped copying of graph "%1$s" to host "%2$s".
zh-cn	略过复制图片"%1$s"到主机"%2$s".

en-us	SLA
zh-cn	SLA

en-us	Slide
zh-cn	幻灯片

en-us	Slides
zh-cn	幻灯片

en-us	Slide show
zh-cn	幻灯片演示

en-us	Slide show "%1$s" already exists.
zh-cn	幻灯片播放"%1$s"已经存在.

en-us	Slide show "%1$s" is public and read-only sharing is disallowed.
zh-cn	幻灯片 "%1$s" 是公共只读，不能共享。

en-us	Slide show added
zh-cn	幻灯片演示已添加.

en-us	Slide show deleted
zh-cn	幻灯片演示已删除

en-us	Slide show must contain slides.
zh-cn	幻灯片演示必需包含简报片.

en-us	Slide show owner cannot be empty.
zh-cn	幻灯片所有者不能为空。

en-us	Slide shows
zh-cn	幻灯片演示

en-us	Slide show "%s" already exists.
zh-cn	幻灯片演示"%s"已存在.

en-us	Slide show updated
zh-cn	幻灯片演示已更新

en-us	Slovak (sk_SK)
zh-cn	斯洛伐克(sk_SK)

en-us	SMS
zh-cn	短信

en-us	SMTP
zh-cn	SMTP

en-us	SMTP email
zh-cn	SMTP电邮

en-us	SMTP helo
zh-cn	SMTP HELO

en-us	SMTP server
zh-cn	SMTP服务器

en-us	SMTP server port
zh-cn	SMTP服务器端口

en-us	"%s" must be between 1970.01.01 and 2038.01.18.
zh-cn	"%s" 必须在 1970.01.01 和 2038.01.18之间。

en-us	SNMP
zh-cn	SNMP

en-us	SNMP community
zh-cn	SNMP community

en-us	SNMP interfaces
zh-cn	SNMP接口

en-us	SNMP OID
zh-cn	SNMP OID

en-us	SNMP trap
zh-cn	SNMP trap

en-us	SNMP trap key is invalid.
zh-cn	SNMP采集键值是无效的

en-us	SNMPv1 agent
zh-cn	SNMPv1 客户端

en-us	SNMPv2 agent
zh-cn	SNMPv2 客户端

en-us	SNMPv3 agent
zh-cn	SNMPv3 客户端

en-us	Snooze
zh-cn	Snooze

en-us	Soft
zh-cn	软 

en-us	Software
zh-cn	软件

en-us	Software application A
zh-cn	软件应用程序A

en-us	Software application B
zh-cn	软件应用程序B

en-us	Software application C
zh-cn	软件应用程序C

en-us	Software application D
zh-cn	软件应用程序D

en-us	Software application E
zh-cn	软件应用程序E

en-us	Software architecture information. Returns string
zh-cn	软件架构信息。返回字符串

en-us	Software (Full details)
zh-cn	软件(全细节)

en-us	Sort entries by
zh-cn	排序对象以

en-us	Sorting by field "%1$s" not allowed.
zh-cn	依栏位"%1$s"排序是不允许的.

en-us	Sort order (0->999)
zh-cn	排序(0->999)

en-us	Sort triggers by
zh-cn	依此排序触发器:

en-us	Source
zh-cn	来源 

en-us	Source type
zh-cn	源类型

en-us	Spanish (es_ES)
zh-cn	西班牙语 (es_ES)

en-us	Specified script does not exist or you do not have rights on it for action operation command.
zh-cn	指定的脚本不存在或您没有对操作命令的权限.

en-us	Specify some filter condition to see the items.
zh-cn	指定过滤器条件以用于查看项目

en-us	Specify some filter condition to see the values.
zh-cn	指定过滤器条件以用于查看值

en-us	Speed
zh-cn	速度

en-us	SQL count: %1$s (selects: %2$s | executes: %3$s)
zh-cn	SQL count: %1$s (selects: %2$s | executes: %3$s)

en-us	SQL query
zh-cn	SQL查询

en-us	SQL statement execution has failed "%1$s"
zh-cn	SQL描述式执行已失败: "%1$s"

en-us	SQL statement execution has failed "%1$s".
zh-cn	SQL描述式执行已失败: "%1$s".

en-us	SSH
zh-cn	SSH

en-us	SSH agent
zh-cn	SSH 客户端

en-us	SSL certificate file
zh-cn	SSL证书文件

en-us	SSL key file
zh-cn	SSL秘钥文件

en-us	SSL key password
zh-cn	SSL秘钥密码

en-us	SSL/TLS
zh-cn	SSL/TLS

en-us	SSL verify host
zh-cn	SSL验证主机

en-us	SSL verify peer
zh-cn	SSL验证对端

en-us	Stacked
zh-cn	层积的

en-us	Staircase
zh-cn	楼梯

en-us	Standard items
zh-cn	标准检测器

en-us	Start in
zh-cn	开始于

en-us	Starting TLS failed.
zh-cn	启动 TLS 失败。

en-us	STARTTLS
zh-cn	STARTTLS(纯文本通信协议扩展)

en-us	Startup time of Zabbix server, Unix timestamp.
zh-cn	Zabbix服务器的启动时间，Unix时间截.

en-us	State
zh-cn	状态

en-us	Static
zh-cn	静态

en-us	Status
zh-cn	状态

en-us	Status (ascending)
zh-cn	状态(升序)

en-us	Status calculation
zh-cn	状态统计

en-us	Status calculation algorithm
zh-cn	状态计算算法

en-us	Status codes
zh-cn	状态码

en-us	Status (descending)
zh-cn	状态(降序)

en-us	Status disabled
zh-cn	状态已禁用

en-us	Status maintenance
zh-cn	状态 维护

en-us	Status of discovery
zh-cn	自动发现的状态

en-us	Status ok
zh-cn	状态 OK

en-us	Status only
zh-cn	只有状态

en-us	Status problem
zh-cn	状态 问题

en-us	Step
zh-cn	步骤

en-us	Step "%1$s" [%2$s of %3$s] failed: %4$s
zh-cn	步骤"%1$s" [%2$s之于%3$s] 失败: %4$s

en-us	Step duration
zh-cn	步骤持续时间

en-us	Step of web scenario
zh-cn	web 方案步骤

en-us	Steps
zh-cn	步骤

en-us	Step with name "%1$s" already exists.
zh-cn	名字为"%1$s"的步骤已经存在.

en-us	Stop
zh-cn	停止

en-us	Straight
zh-cn	Straight

en-us	str() - Find string V in last (most recent) value (1 - found, 0 - not found)
zh-cn	str() - 在最后（最近）值中找到字符串 V（1 - 找到，0 - 未找到）

en-us	strlen() - Length of last (most recent) T value in characters
zh-cn	strlen() - 最后一个（最近的）T 值的长度（以字符为单位）

en-us	Structured data
zh-cn	结构化数据

en-us	Style
zh-cn	风格

en-us	Subfilter
zh-cn	过滤器

en-us	Subject
zh-cn	主题

en-us	Subject
zh-cn	主体

en-us	Submap
zh-cn	子拓扑图

en-us	<sub-menu/sub-menu/...>script
zh-cn	<子菜单/子菜单/ ...>脚本

en-us	Sub navigation
zh-cn	子导航

en-us	Success Audit
zh-cn	成功审计

en-us	Success message
zh-cn	成功消息

en-us	Sum of incoming and outgoing traffic statistics on network interface. Returns integer
zh-cn	网络接口上传下载的流量总和。返回整数

en-us	sum() - Sum of values of a period T
zh-cn	sum() - 周期 T 内的值之和

en-us	Sun
zh-cn	日

en-us	Sunday
zh-cn	日

en-us	supplied credentials are not unique
zh-cn	提供的凭据不是唯一的

en-us	Support
zh-cn	支持

en-us	Suppressed till: %1$s
zh-cn	制止到：%1$s

en-us	Surname
zh-cn	姓氏

en-us	Swap in (from device into memory) statistics. Returns integer
zh-cn	在交换分区(swap)（从设备到内存）统计数据。返回整数

en-us	Swap out (from memory onto device) statistics. Returns integer
zh-cn	交换分区（从内存到设备）的统计数据。返回整数

en-us	Swap space size in bytes or in percentage from total. Returns integer for bytes; float for percentage
zh-cn	交换分区空间大小，字节或从总百分比。从字节返回整数;对于浮动比例

en-us	Swedish (sv_SE)
zh-cn	瑞士(sv_SE)

en-us	Switching authentication method will reset all except this session! Continue?
zh-cn	切换认证方法将重设除了此会话之外的所有会话!继续吗?

en-us	System boot time. Returns integer (Unix timestamp)
zh-cn	系统启动时间。返回时间戳

en-us	System default
zh-cn	系统默认

en-us	System error.
zh-cn	系统错误.

en-us	System error occurred. Please contact Zabbix administrator.
zh-cn	发生系统错误。请联系 Zabbix 管理员。

en-us	System host name. Returns string
zh-cn	系统主机名。返回字符串

en-us	System information
zh-cn	系统信息

en-us	System statistics. Returns integer or float
zh-cn	系统统计数据。返回整数值或者浮点值

en-us	System time. Returns integer with type as utc; string - with type as local
zh-cn	系统时间。返回的是UTC整数。是服务器本地的时间

en-us	System uptime in seconds. Returns integer
zh-cn	系统启动时间。返回整数

en-us	T
zh-cn	T

en-us	T
zh-cn	T

en-us	Table "%1$s" does not exist.
zh-cn	表"%1$s" 不存在.

en-us	Table "%1$s" doesn't have a field named "%2$s".
zh-cn	表"%1$s"不能有栏位名为"%2$s".

en-us	tag
zh-cn	标记

en-us	Tag
zh-cn	标签

en-us	Tag display priority
zh-cn	标签显示优先级

en-us	Tag filter
zh-cn	标签过滤器

en-us	Tag for matching
zh-cn	匹配标记

en-us	Tag name
zh-cn	标签名

en-us	Tags
zh-cn	标记

en-us	Tag value
zh-cn	标记值

en-us	Target
zh-cn	目标

en-us	Target list
zh-cn	目标列表

en-us	Target type
zh-cn	目标类型

en-us	TCP
zh-cn	TCP

en-us	Telnet
zh-cn	Telnet

en-us	TELNET agent
zh-cn	TELNET客户端

en-us	Template
zh-cn	模板

en-us	Template "%1$s" already exists.
zh-cn	模板 "%1$s" 已存在.

en-us	Template "%1$s" cannot be without host group.
zh-cn	模板 "%1$s" 不能没有主机组。

en-us	Template "%1$s" for host "%2$s" does not exist.
zh-cn	用于主机 "%2$s"的模板 "%1$s"不存在.

en-us	Template added
zh-cn	模板已添加

en-us	Template cannot be linked to another template more than once even through other templates.
zh-cn	模板不能重复链接到其它模板, 即使透过其它模板.

en-us	Template deleted
zh-cn	模板已删除

en-us	Templated items
zh-cn	模板的监控项

en-us	Template group
zh-cn	模板群组

en-us	template ID "%1$s" is passed %2$s times
zh-cn	模板ID"%1$s"已传送%2$s次

en-us	Template linkage
zh-cn	模板间的关联

en-us	Template macros
zh-cn	模板 宏

en-us	Template name
zh-cn	模版名称

en-us	Templates
zh-cn	模板

en-us	Templates "%1$s" unlinked from hosts "%2$s".
zh-cn	模板"%1$s"自主机"%2$s"断连.

en-us	Template screen "%1$s" already exists.
zh-cn	模板图表"%1$s"已经存在.

en-us	Template screens
zh-cn	模板聚合图形

en-us	Template trigger
zh-cn	模板触发器

en-us	Template updated
zh-cn	模板已更新

en-us	Template value
zh-cn	模板值

en-us	Template with the same name "%1$s" already exists.
zh-cn	拥有相同名称 "%1$s"的模板已经存在.

en-us	Template with the same name "%s" already exists.
zh-cn	含有相同名称"%1$s"的模板已链接到主机.

en-us	Template with the same visible name "%1$s" already exists.
zh-cn	拥有相同显示名称"%1$s"的模板已经存在.

en-us	Template with the same visible name "%s" already exists.
zh-cn	含有相同可视名称"%1$s"的模板已链接到主机.

en-us	Test
zh-cn	测试

en-us	Test authentication
zh-cn	测试认证

en-us	Test confirmation
zh-cn	测试确认

en-us	Test data
zh-cn	测试数据

en-us	Test expressions
zh-cn	测试表达式

en-us	Test string
zh-cn	测试字符串

en-us	Text
zh-cn	文本

en-us	The "%1$s.%2$s" method must be called without the "auth" parameter.
zh-cn	"%1$s.%2$s"方法只能被以不带 "auth"进行调用.

en-us	The application is not discovered anymore and will be deleted in %1$s (on %2$s at %3$s).
zh-cn	该应用程序不再被发现，并且会被删除 %1$s (在 %2$s 和 %3$s).

en-us	The application is not discovered anymore and will be deleted the next time discovery rule is processed.
zh-cn	该应用程序不再被发现，并在下一次发现规则处理时删除。

en-us	The host group is not discovered anymore and will be deleted in %1$s (on %2$s at %3$s).
zh-cn	被发现的主机组丢失它将在%1$s (on %2$s at %3$s)被删除.

en-us	The host group is not discovered anymore and will be deleted the next time discovery rule is processed.
zh-cn	被发现的主机组丢失它将在下次自动发现规则执行时被删除.

en-us	The host is not discovered anymore and will be deleted in %1$s (on %2$s at %3$s).
zh-cn	被发现的主机丢失它将于%1$s (on %2$s at %3$s)后被删除.

en-us	The host is not discovered anymore and will be deleted the next time discovery rule is processed.
zh-cn	被发现的主机丢失它将在下次自动发现规则执行时被删除.

en-us	The image is used in icon map %1$s.
zh-cn	图片被应用于图标映射%1$s上.

en-us	The image is used in map %1$s.
zh-cn	图片被应用于拓扑图 %1$s上.

en-us	The item is not discovered anymore and will be deleted in %1$s (on %2$s at %3$s).
zh-cn	已无法自动发现此项目了, 将删除于%1$s (在%2$s在%3$s).

en-us	The item is not discovered anymore and will be deleted the next time discovery rule is processed.
zh-cn	被发现的监控项目丢失它将在下次自动发现规则执行时被删除.

en-us	Theme
zh-cn	主题

en-us	The number of processes. Returns integer
zh-cn	进程数。返回整数

en-us	the parameter "%1$s" is missing
zh-cn	找不到参数 "%1$s"

en-us	The received JSON is not a valid JSON-RPC Request.
zh-cn	接收到的JSON不是一个有效的JSON-RPC请求.

en-us	The requested remote-procedure does not exist / is not available
zh-cn	请求的远程程序不存在/不可用

en-us	the tag "%1$s" is missing
zh-cn	标签 "%1$s" 丢失

en-us	The web scenario application belongs to a different host than the web scenario host.
zh-cn	web 场景应用属于一个不同的主机而不是 web 场景主机.

en-us	The X coordinate of screen element located at X - %1$s and Y - %2$s of screen "%3$s" is too big.
zh-cn	图表"%3$s"上的位于X坐标为%1$s坐标为%2$s的图表元素的X坐标值太大.

en-us	The Y coordinate of screen element located at X - %1$s and Y - %2$s of screen "%3$s" is too big.
zh-cn	图表"%3$s"上的位于X坐标为%1$s坐标为%2$s的图表元素的Y坐标值太大.

en-us	third
zh-cn	第三

en-us	This day last week
zh-cn	上周的这一天

en-us	This field is automatically populated by item "%s".
zh-cn	这栏位是由项目"%s"自动填入的.

en-us	This month
zh-cn	本月

en-us	This month so far
zh-cn	这个月到目前为止

en-us	This screen column is not empty. Delete it?
zh-cn	这聚合图形-列不是空白. 删除它?

en-us	This screen row is not empty. Delete it?
zh-cn	这聚合图形-行不是空白. 删除它?

en-us	This week
zh-cn	本周

en-us	This week so far
zh-cn	本周到目前为止

en-us	This year
zh-cn	本年

en-us	This year so far
zh-cn	今年到目前为止

en-us	Threshold
zh-cn	阀值

en-us	Thu
zh-cn	四

en-us	Thursday
zh-cn	周四

en-us	Till
zh-cn	直到

en-us	Time
zh-cn	时间

en-us	Time a particular Zabbix process or a group of processes (identified by <type> and <mode>) spent in <state> in percentage.
zh-cn	乘以一个特定的 Zabbix 进程或一组进程（由 <type> 和 <mode> 标识）花费在 <state> 中的百分比。

en-us	Time a particular Zabbix process or a group of processes (identified by <type> and <mode>) spent in <state> in percentage.
zh-cn	乘以一个特定的 Zabbix 进程或一组进程（由 <type> 和 <mode> 标识）花费在 <state> 中的百分比。

en-us	Time a particular Zabbix process or a group of processes (identified by <type> and <mode>) spent in <state> in percentage.
zh-cn	乘以一个特定的 Zabbix 进程或一组进程（由 <type> 和 <mode> 标识）花费在 <state> 中的百分比。

en-us	Time (ascending)
zh-cn	时间(升序)

en-us	time() - Current time
zh-cn	time() - 当前时间

en-us	Time (descending)
zh-cn	时间(降序)

en-us	timeleft() - Time to reach threshold estimated based on period T
zh-cn	timeleft() - 基于周期 T 内达到阈值的时间估计

en-us	Time of proxy last access. Name - proxy name. Param - lastaccess. Unix timestamp.
zh-cn	代理节点上次访问的时间.Name-代理节点名称.Para-最后访问.Unix时间截.

en-us	Timeout
zh-cn	超时

en-us	Time period
zh-cn	时间期间

en-us	#### Time period selector  Take note of the time period selector above the graph. It allows to select often required periods with one mouse click.  Note that such options as *Today*, *This week*, *This month*, *This year* display the whole period, including the hours/days in the future. *Today so far*, in contrast, only displays the hours passed.  Once a period is selected, it can be moved back and forth in time by clicking on the ![](../../../../../assets/en/manual/config/visualization/left_arrow.png) ![](../../../../../assets/en/manual/config/visualization/right_arrow.png) arrow buttons. The *Zoom out* button allows to zoom out the period two times or by 50% in each direction. Zoom out is also possible by double-clicking in the graphs. The whole time period selector can be collapsed by clicking on the tab label containing the selected period string.  The *From/To* fields display the selected period in either:  -   absolute time syntax in format `Y-m-d H:i:s` -   relative time syntax, e.g.: `now-1d`  A date in **relative** format can contain one or several mathematical operations (- or +), e.g. `now-1d` or `now-1d-2h+5m`. For relative time the following abbreviations are supported:  -   now -   s (seconds) -   m (minutes) -   h (hours) -   d (days) -   w (weeks) -   M (months) -   y (years)  **Precision** is supported in the time filter (e. g., an expression like `now-1d/M`).  Details of precision:  |Precision|From|To| |---------|----|--| |*m*|Y-m-d H:m:00|Y-m-d H:m:59| |*h*|Y-m-d H:00:00|Y-m-d H:59:59| |*d*|Y-m-d 00:00:00|Y-m-d 23:59:59| |*w*|Monday of the week 00:00:00|Sunday of the week 23:59:59| |*M*|First day of the month 00:00:00|Last day of the month 23:59:59| |*y*|1st of January of the year 00:00:00|31st of December of the year 23:59:59|  For example:  |From|To|Selected period| |----|--|---------------| |`now/d`|`now/d`|00:00-23:59 today| |`now/d`|`now/d+1d`|00:00 today - 23:59 tomorrow| |`now/w`|`now/w`|Monday 00:00:00 - Sunday 23:59:59 this week| |`now-1y/w`|`now-1y/w`|the week of Monday 00:00:00 - Sunday 23:59:59 one year ago|  ##### Date picker  It is possible to pick a specific start/end date by clicking on the calendar icon next to the *From/To* fields. In this case, the date picker pop up will open.  ![](../../../../../assets/en/manual/config/date_picker.png){width="200"}  Within the date picker, it is possible to navigate between the blocks of year/month/date using Tab and Shift+Tab. Keyboard arrows or arrow buttons allow to select the desired value. Pressing Enter (or clicking on the desired value) activates the choice.  Another way of controlling the displayed time is to highlight an area in the graph with the left mouse button. The graph will zoom into the highlighted area once you release the left mouse button.  In case no time value is specified or field is left blank, time value will be set to "00:00:00". This doesn't apply to today's date selection: in that case time will be set to current value.
zh-cn	#### 时间段选择器  请注意图表上方的时间段选择器。它允许一键选择经常需要的时间段。  请注意，*今天*、*本周*、*本月*、*本年* 显示整个期间，包括未来的小时/天。*今天到目前为止*，相比之下，只显示过去的小时数。  一旦选择了一个周期，它可以在时间上来回移动点击![](../../../../../assets/en/manual/config/visualization/left_arrow.png)![](../../../../../assets/en/manual/config/visualization/right_arrow.png)箭头按钮。 *缩小*按钮允许缩小第二个周期次或在每个方向上增加 50%。缩小也可以通过双击图表。整个时间段选择器可以是通过单击包含所选期间的选项卡标签折叠。  *From/To* 字段以以下任一方式显示所选期间：  - 格式为“Y-m-d H:i:s”的绝对时间语法 - 相对时间语法，例如：`now-1d`  相对格式的日期可以包含一个或多个数学操作（- 或 +），例如`now-1d` 或`now-1d-2h+5m`。对于相对时间支持以下缩写：  -   现在 - s（秒） - 米（分钟） - h（小时） - d（天） - w（周） - M（月） - y（年）  可以通过单击选择特定的开始/结束日期*From/To* 字段旁边的日历图标。在这种情况下，日期选择器弹出窗口将打开。  ![](../../../../../assets/en/manual/config/date_picker.png){width="200"}  在日期选择器中，可以在使用 Tab 和 Shift+Tab 的年/月/日。键盘箭头或箭头按钮允许选择所需的值。按 Enter 键（或单击所需的值）激活选择。  控制显示时间的另一种方法是突出显示用鼠标左键绘制图形。图表将放大到松开鼠标左键后突出显示的区域。  如果未指定时间值或字段留空，则时间值将设置为“00:00:00”。这不适用于今天的日期选择：在这种情况下，时间将设置为当前值。

en-us	time shift
zh-cn	时间偏移

en-us	Time shift
zh-cn	间隔(秒)

en-us	Timestamp
zh-cn	时间戳

en-us	Time type
zh-cn	时间类型

en-us	Time zone for PHP is not set (configuration parameter "date.timezone").
zh-cn	PHP的时区未设置(配置参数"date.timezone").

en-us	To
zh-cn	到

en-us	Today
zh-cn	今天

en-us	Today so far
zh-cn	今天到目前为止

en-us	Top
zh-cn	顶部

en-us	To set a host interface select a single item type for all items
zh-cn	要设定一个主机接口, 选择一个单一的监控项类型给所有的监控项

en-us	Total
zh-cn	合计

en-us	TOTAL
zh-cn	总合

en-us	Total Elasticsearch time: %1$s
zh-cn	总共 Elasticsearch 时间：%1$s

en-us	Total SQL time: %1$s
zh-cn	总SQL时间：%1$s

en-us	Total time: %1$s
zh-cn	总时间：%1$s

en-us	Transaction has not been closed. Aborting...
zh-cn	交易尚未被关闭. 放弃中...

en-us	Transform SQL query result into a JSON object for low-level discovery.
zh-cn	将转换后的SQL查询到低级别的发现JSON对象的执行结果。

en-us	Transparency
zh-cn	透明度

en-us	Transport error.
zh-cn	传输错误.

en-us	Treat as 0
zh-cn	视为 0

en-us	Trend data storage period
zh-cn	趋势数据存储时间

en-us	Trend data storage period "%1$s".
zh-cn	趋势数据存储期 "%1$s"。

en-us	Trends
zh-cn	趋势

en-us	Trend storage period
zh-cn	趋势存储时间

en-us	trigger
zh-cn	触发器

en-us	Trigger
zh-cn	触发器

en-us	Trigger "%1$s" already exists on "%2$s".
zh-cn	触发器"%1$s"已存在于"%2$s".

en-us	Trigger "%1$s" belongs to templates with different linkages.
zh-cn	触发器"%1$s"属于不同的联系，以模板。

en-us	Trigger "%1$s" depends on trigger "%2$s", which does not exist.
zh-cn	触发器"%1$s"相依于一个不存在的触发器"%2$s".

en-us	Trigger added
zh-cn	触发器已添加

en-us	Trigger cannot be dependent on a trigger that is inherited from it.
zh-cn	触发器不能依赖从它继承的一个触发器.

en-us	Trigger copied
zh-cn	触发器复制

en-us	Trigger data storage period
zh-cn	触发器数据存储期

en-us	Trigger deleted
zh-cn	触发器已删除

en-us	Trigger description
zh-cn	触发器描述

en-us	Trigger details
zh-cn	触发器详情

en-us	Trigger disabled
zh-cn	触发器已禁用

en-us	Trigger displaying options
zh-cn	触发器显示选项

en-us	trigger does not allow manual closing
zh-cn	触发器不允许手动关闭

en-us	Trigger enabled
zh-cn	触发器已启用

en-us	Trigger event and alert data storage period
zh-cn	触发器事件和报警数据存储周期

en-us	Trigger event and alert data storage period "%1$s".
zh-cn	触发事件和警报数据存储期限 "%1$s" 。

en-us	Trigger has items from template "%1$s" that is not linked to host.
zh-cn	触发器有项目来自于模板"%1$s"其并未链接到主机.

en-us	Trigger info
zh-cn	触发器信息

en-us	Trigger in template "%1$s" has dependency with trigger in template "%2$s".
zh-cn	模板"%1$s"中的触发器依赖模板"%2$s"中的触发器

en-us	Trigger in "unknown" state
zh-cn	触发器在"未知"状态

en-us	Trigger label type
zh-cn	触发器标签类型

en-us	Trigger name
zh-cn	触发器名称

en-us	Trigger overview
zh-cn	触发器概览

en-us	Trigger prototype
zh-cn	触发器类型

en-us	Trigger prototype "%1$s" already exists on "%2$s".
zh-cn	在"%2$s"中触发器原型模板"%1$s"重复。

en-us	Trigger prototype "%1$s" belongs to templates with different linkages.
zh-cn	触发器原型模板"%1$s"属于不同的联系，以模板。

en-us	Trigger prototype "%1$s" contains item prototypes from multiple discovery rules.
zh-cn	触发器模板"%1$s"中包含了来自多个自动发现规则的项目模板.

en-us	Trigger prototype "%1$s" depends on trigger "%2$s", which does not exist.
zh-cn	触发器模板 "%1$s" 依赖于触发器 "%2$s" ,但它不存在。

en-us	Trigger prototype "%1$s" must contain at least one item prototype.
zh-cn	触发器模板 "%1$s"必须至少包含一个项目模板.

en-us	Trigger prototype added
zh-cn	触发器模板已添加

en-us	Trigger prototype cannot be dependent on a trigger that is inherited from it.
zh-cn	原型的触发将不能够依靠从自己继承了触发。

en-us	trigger prototype cannot be moved to another template or host
zh-cn	触发器原型无法移动到另外一个模板或者主机

en-us	Trigger prototype deleted
zh-cn	触发器模板已删除

en-us	Trigger prototypes
zh-cn	触发器类型

en-us	Trigger prototypes deleted
zh-cn	触发器模板已删除

en-us	Trigger prototypes updated
zh-cn	触发器模板已更新

en-us	Trigger prototype updated
zh-cn	触发器模板已更新

en-us	Triggers
zh-cn	触发器

en-us	Triggers deleted
zh-cn	触发器已删除

en-us	Trigger severities
zh-cn	触发器设置

en-us	Trigger severity
zh-cn	触发器示警度

en-us	Trigger status "OK"
zh-cn	触发器状态 "OK"

en-us	Trigger status "Problem"
zh-cn	触发器状态"Problem"

en-us	Triggers top 100
zh-cn	触发器 Top 100

en-us	Trigger updated
zh-cn	触发器已更新

en-us	trigger with linkages cannot be moved to another template or host
zh-cn	触发器原型以及关联项无法移动到另外一个模板或者主机

en-us	Trim
zh-cn	修整

en-us	TRUE
zh-cn	真

en-us	Try to read inaccessible property "%s".
zh-cn	尝试读取不能存取的属性"%s".

en-us	Tue
zh-cn	二

en-us	Tuesday
zh-cn	周二

en-us	Turkish (tr_TR)
zh-cn	土耳其语 (tr_TR)

en-us	Two items ("%1$s" and "%2$s") cannot populate one host inventory field "%3$s", this would lead to a conflict.
zh-cn	两个项目 ("%1$s"和"%2$s")不能填入一个主机资产纪录栏位"%3$s", 这会造成冲突.

en-us	Two map elements should be selected
zh-cn	应选择两个拓扑元素

en-us	Type
zh-cn	类型

en-us	Type (ascending)
zh-cn	类型(升序)

en-us	Type (descending)
zh-cn	类型(降序)

en-us	Type (Full details)
zh-cn	类型(全细节)

en-us	type here to search
zh-cn	在此输入搜索

en-us	Type of calculation
zh-cn	计算方式

en-us	Type of information
zh-cn	信息类型

en-us	Type of information must be "Numeric (unsigned)" or "Numeric (float)" for aggregate items.
zh-cn	信息的类型必须是“数字（符号）”或“数字（浮点）”为总项目。

en-us	Type (OK)
zh-cn	类型(OK)

en-us	Types
zh-cn	类型 

en-us	Ukrainian (uk_UA)
zh-cn	乌克兰语 (uk_UA)

en-us	Unable to create the configuration file.
zh-cn	无法创建配置文件。

en-us	Unable to overwrite the existing configuration file.
zh-cn	无法覆盖已经存在的配置文件。

en-us	Unable to select configuration.
zh-cn	不能选择配置.

en-us	Unable to upload file because "file_uploads" is disabled.
zh-cn	不能上传文件因为 "文件上传"被禁止.

en-us	Unacknowledged
zh-cn	未确认的

en-us	Unacknowledged only
zh-cn	仅未确认的

en-us	Unacknowledged PROBLEM events
zh-cn	未确认的Problem事件

en-us	Unacknowledged RESOLVED events
zh-cn	未确认的 RESOLVED 事件

en-us	Unblock
zh-cn	解锁

en-us	Unblock selected users?
zh-cn	解除锁定所选的用户?

en-us	unexpected end of key
zh-cn	非期望的关键字结束

en-us	unexpected end of macro
zh-cn	宏的结束是不正确

en-us	unexpected parameter "%1$s"
zh-cn	"%1$s" 参数异常

en-us	unexpected tag "%1$s"
zh-cn	标签 "%1$s" 异常

en-us	unexpected text "%1$s"
zh-cn	异常的文本 "%1$s"

en-us	unexpected value "%1$s"
zh-cn	"%1$s" 值异常

en-us	Units
zh-cn	单位

en-us	unknown
zh-cn	未知的

en-us	Unknown
zh-cn	未知的

en-us	UNKNOWN
zh-cn	未知的

en-us	Unknown action
zh-cn	未知的操作

en-us	Unknown error
zh-cn	未知错误

en-us	Unknown function.
zh-cn	未知的函数.

en-us	Unknown host item, no such item in selected host
zh-cn	未知的主机监控项, 在所选的主机中没有这样的监控项

en-us	Unknown host, no such host present in system
zh-cn	未知的主机, 在系统中没有出现这样的主机.

en-us	Unknown interface type.
zh-cn	未知的接口类型.

en-us	Unknown resource
zh-cn	未知的资源

en-us	Unknown step failed: %1$s
zh-cn	未知的步骤错误： %1$s

en-us	Unknown value type
zh-cn	未知的值类型

en-us	Unlimited
zh-cn	无限

en-us	Unlink
zh-cn	取消链接

en-us	Unlink and clear
zh-cn	取消链接并清理

en-us	Unlinked: Application "%1$s" on "%2$s".
zh-cn	断开链接: 应用程序"%1$s"于"%2$s".

en-us	Unlinked: Discovery rule "%1$s" on "%2$s".
zh-cn	未链接的: 探索规则"%1$s"于"%2$s".

en-us	Unlinked: Host prototype "%1$s" on "%2$s".
zh-cn	取消关联:"%2$s"上的主机模板"%1$s".

en-us	Unlinked: Item "%1$s" on "%2$s".
zh-cn	断开连接："%2$s"上的监控项"%1$s"。

en-us	Unlinked: Item prototype "%1$s" on "%2$s".
zh-cn	断开连接："%2$s"上的监控项原型"%1$s"。

en-us	Unlinked: Web scenario "%1$s" on "%2$s".
zh-cn	不能被链接:"%2$s" 上的 Web 场景 "%1$s".

en-us	Unlink from template
zh-cn	自模板断开连接

en-us	Unlink from templates
zh-cn	自模板断开链接

en-us	Unmute
zh-cn	取消静音

en-us	Unsupported import file extension "%1$s".
zh-cn	未支持的导入文件扩展名"%1$s".

en-us	Unsupported import format "%1$s".
zh-cn	未支持的导入格式"%1$s".

en-us	Unsupported parameter "%2$s" for a filter condition of action "%1$s".
zh-cn	动作"%1$s"的过滤器条件不支持参数"%2$s"

en-us	Unsupported parameter "%2$s" for a filter condition of discovery rule "%1$s".
zh-cn	自动发现规则 "%1$s"的过滤器条件不支持参数"%2$s"

en-us	Unsupported parameter "%2$s" for the filter of action "%1$s".
zh-cn	动作"%1$s"的过滤器不支持参数"%2$s".

en-us	Unsupported parameter "%2$s" for the filter of discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的过滤器不支持参数"%2$s".

en-us	unsupported version number
zh-cn	这个版本已经不被支持

en-us	Up
zh-cn	上

en-us	Up
zh-cn	上

en-us	Update
zh-cn	更新

en-us	Updated
zh-cn	更新

en-us	Updated: %s
zh-cn	已更新: %s

en-us	Updated status of host "%1$s".
zh-cn	已更新主机 "%1$s" 的状态。

en-us	Update existing
zh-cn	更新现有的

en-us	Update interval
zh-cn	更新间隔

en-us	Update operations
zh-cn	更新操作

en-us	Update problem
zh-cn	更新问题

en-us	Upload
zh-cn	上传

en-us	Upper level maps
zh-cn	上层拓扑图

en-us	Uptime
zh-cn	在线时间

en-us	Uptime/Downtime
zh-cn	在线/不在线

en-us	Uptime of Zabbix server process in seconds.
zh-cn	Zabbix服务器进程的在线时间单位秒.

en-us	URL
zh-cn	URL

en-us	URL A
zh-cn	URL A

en-us	URL (after login)
zh-cn	URL (登录后)

en-us	URL B
zh-cn	URL B

en-us	URL C
zh-cn	URL C

en-us	URL is not properly encoded.
zh-cn	网址未正确编码。

en-us	URL name should be unique for map "%1$s".
zh-cn	URL名称应该是拓扑图 "%1$s" 中唯一的。

en-us	URL parameter cannot be array.
zh-cn	URL 参数不能为数组.

en-us	URL parameter name is empty.
zh-cn	URL 参数名为空.

en-us	URLs
zh-cn	URLs

en-us	URL should have both "name" and "url" fields for map "%1$s".
zh-cn	拓扑图 "%1$s" URL、名称为必填项。

en-us	USA (160 characters)
zh-cn	USA (160 字符)

en-us	Use bulk requests
zh-cn	使用大量请求

en-us	Use custom event status colours
zh-cn	使用自定义事件状态颜色

en-us	Used in actions
zh-cn	用于动作中

en-us	Used in items
zh-cn	用于监控项

en-us	Use if severity
zh-cn	如果存在严重性则使用

en-us	User
zh-cn	用户

en-us	User "%1$s" cannot be without user group.
zh-cn	用户 "%1$s" 不能没有用户组。

en-us	User "%1$s" is dashboard "%2$s" owner.
zh-cn	用户 "%1$s" 是仪表板 "%2$s" 所有者。

en-us	User "%1$s" is map "%2$s" owner.
zh-cn	拓扑图"%2$s"的所有者为"%1$s"。

en-us	User "%1$s" is screen "%2$s" owner.
zh-cn	聚合图 "%2$s" 形的所有者为 "%1$s"。

en-us	User "%1$s" is slide show "%2$s" owner.
zh-cn	幻灯片 "%2$s"的所有者为"%1$s"。

en-us	User "%1$s" is used in "%2$s" action.
zh-cn	用户 "%1$s" 用于 "%2$s" 操作。

en-us	User action
zh-cn	用户动作

en-us	User added
zh-cn	添加用户

en-us	User agent string
zh-cn	用户代理字符串

en-us	User cannot add himself to a disabled group or a group with disabled GUI access.
zh-cn	用户不能将自己加进一个取消的群组或已关闭图形接口访问权的群组.

en-us	User cannot change their user type.
zh-cn	用户无法更改其用户类型。

en-us	User can't change type for himself
zh-cn	用户不能自行改变类型

en-us	#### User-configured ciphersuites  The built-in ciphersuite selection criteria can be overridden with user-configured ciphersuites.  ::: noteimportant User-configured ciphersuites is a feature intended for advanced users who understand TLS ciphersuites, their security and consequences of mistakes, and who are comfortable with TLS troubleshooting. :::  The built-in ciphersuite selection criteria can be overridden using the following parameters:  |Override scope|Parameter|Value|Description| |--------|--------|-------------------|-------------------| |Ciphersuite selection for certificates|TLSCipherCert13|Valid OpenSSL 1.1.1 [cipher strings](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) for TLS 1.3 protocol (their values are passed to the OpenSSL function SSL\_CTX\_set\_ciphersuites()).|Certificate-based ciphersuite selection criteria for TLS 1.3<br><br>Only OpenSSL 1.1.1 or newer.| |^|TLSCipherCert|Valid OpenSSL [cipher strings](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) for TLS 1.2 or valid GnuTLS [priority strings](https://gnutls.org/manual/html_node/Priority-Strings.html). Their values are passed to the SSL\_CTX\_set\_cipher\_list() or gnutls\_priority\_init() functions, respectively.|Certificate-based ciphersuite selection criteria for TLS 1.2/1.3 (GnuTLS), TLS 1.2 (OpenSSL)| |Ciphersuite selection for PSK|TLSCipherPSK13|Valid OpenSSL 1.1.1 [cipher strings](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) for TLS 1.3 protocol (their values are passed to the OpenSSL function SSL\_CTX\_set\_ciphersuites()).|PSK-based ciphersuite selection criteria for TLS 1.3<br><br>Only OpenSSL 1.1.1 or newer.| |^|TLSCipherPSK|Valid OpenSSL [cipher strings](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) for TLS 1.2 or valid GnuTLS [priority strings](https://gnutls.org/manual/html_node/Priority-Strings.html). Their values are passed to the SSL\_CTX\_set\_cipher\_list() or gnutls\_priority\_init() functions, respectively.|PSK-based ciphersuite selection criteria for TLS 1.2/1.3 (GnuTLS), TLS 1.2 (OpenSSL)| |Combined ciphersuite list for certificate and PSK|TLSCipherAll13|Valid OpenSSL 1.1.1 [cipher strings](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) for TLS 1.3 protocol (their values are passed to the OpenSSL function SSL\_CTX\_set\_ciphersuites()).|Ciphersuite selection criteria for TLS 1.3<br><br>Only OpenSSL 1.1.1 or newer.| |^|TLSCipherAll|Valid OpenSSL [cipher strings](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) for TLS 1.2 or valid GnuTLS [priority strings](https://gnutls.org/manual/html_node/Priority-Strings.html). Their values are passed to the SSL\_CTX\_set\_cipher\_list() or gnutls\_priority\_init() functions, respectively.|Ciphersuite selection criteria for TLS 1.2/1.3 (GnuTLS), TLS 1.2 (OpenSSL)|  To override the ciphersuite selection in [zabbix\_get](/manpages/zabbix_get) and [zabbix\_sender](/manpages/zabbix_sender) utilities - use the command-line parameters:  -   `--tls-cipher13` -   `--tls-cipher`  The new parameters are optional. If a parameter is not specified, the internal default value is used. If a parameter is defined it cannot be empty.  If the setting of a TLSCipher\* value in the crypto library fails then the server, proxy or agent will not start and an error is logged.  It is important to understand when each parameter is applicable.
zh-cn	####  用户配置密码套件  内置的密码套件选择标准可以被用户配置的密码套件覆盖。  ::: noteimportant 用户配置的密码套件是针对了解TLS密码套件、其安全性和错误后果以及熟悉TLS故障排除的高级用户的特性。 :::  内置的密码套件选择标准可以使用以下参数覆盖:  |覆盖范围|参数|值|描述| |--------------|---------|-----|-----------| |证书的密码套件选择|TLSCipherCert13|有效 OpenSSL 1.1.1 [cipher strings](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) 对于TLS 1.3协议(它们的值被传递到OpenSSL函数SSL\_CTX\_set\_ciphersuites())。|TLS 1.3的基于证书的加密套件选择标准<br><br>仅支持OpenSSL 1.1.1及以上版本。| |^|TLSCipherCert|针对TLS 1.2的有效OpenSSL[密码字符串](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) 或有效的GnuTLS[优先级字符串](https://gnutls.org/manual/html_node/Priority-Strings.html)。它们的值分别传递给SSL\_CTX\_set\_cipher\_list()或gnutls\_priority\_init()函数。|针对TLS 1.2/1.3 (GnuTLS)、TLS 1.2 (OpenSSL)的基于证书的密码套件选择标准。| |Ciphersuite selection for PSK|TLSCipherPSK13|有效的OpenSSL 1.1.1[密码字符串](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html) 对于TLS 1.3协议(它们的值被传递到OpenSSL函数SSL\_CTX\_set\_ciphersuites())。|基于psk的TLS 1.3加密套件选择标准<br><br>仅支持OpenSSL 1.1.1及以上版本。| |^|TLSCipherPSK|对于TLS 1.2有效的OpenSSL[密码字符串](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html)或有效的GnuTLS[优先级字符串](https://gnutls.org/manual/html_node/Priority-Strings.html)。它们的值分别传递给SSL\_CTX\_set\_cipher\_list()或gnutls\_priority\_init()函数。|基于psk的TLS 1.2/1.3 (GnuTLS)、TLS 1.2 (OpenSSL)加密套件选择标准。| |Combined ciphersuite list for certificate and PSK|TLSCipherAll13|TLS 1.3协议的有效的OpenSSL 1.1.1[密码字符串](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html)(它们的值被传递到OpenSSL函数SSL\_CTX\_set\_ciphersuites())。|TLS 1.3<br><br>仅支持OpenSSL 1.1.1及以上版本。| |^|TLSCipherAll|对于TLS 1.2有效的OpenSSL[密码字符串](https://www.openssl.org/docs/man1.1.1/man1/ciphers.html)或有效的GnuTLS[优先级字符串](https://gnutls.org/manual/html_node/Priority-Strings.html)。它们的值分别传递给SSL\_CTX\_set\_cipher\_list()或gnutls\_priority\_init()函数。|针对TLS 1.2/1.3 (GnuTLS)、TLS 1.2 (OpenSSL)的加密套件选择标准.|  在[zabbix\_get](/manpages/zabbix_get)和[zabbix\_sender](/manpages/zabbix_sender)工具中覆盖密码套件选择 - 使用命令行参数:  -   `--tls-cipher13` -   `--tls-cipher`  新参数为可选参数。 如果没有指定参数，则使用内部的默认值。 如果参数已定义，则它不能为空。  如果加密库中的tlsciphher \*值设置失败，则server、proxy或agent将无法启动，并记录一个错误。  理解每个参数何时适用是很重要的。

en-us	User deleted
zh-cn	用户已删除

en-us	User group
zh-cn	用户群组

en-us	User group "%1$s" already exists.
zh-cn	用户组"%1$s"已存在.

en-us	User group "%1$s" is used in "%2$s" action.
zh-cn	用户组 "%1$s" 用于 "%2$s" 操作。

en-us	User group "%1$s" is used in configuration for database down messages.
zh-cn	用户组"%1$s"为接收数据库宕机信息而使用.

en-us	User group "%1$s" is used in script "%2$s".
zh-cn	用户群组"%1$s"被用于脚本"%2$s".

en-us	User group disabled
zh-cn	用户组已禁用

en-us	User group enabled
zh-cn	用户组已启用

en-us	User group for database down message
zh-cn	用于资料库断线信息的用户群组

en-us	User group for database down message "%1$s".
zh-cn	用户组被用于接收数据库宕机信息"%1$s".

en-us	User groups
zh-cn	用户群组

en-us	User group sharing is missing parameters: %1$s for map "%2$s".
zh-cn	拓扑图 "%2$s" 用户组共享找不到参数 %1$s

en-us	User group sharing is missing parameters: %1$s for screen "%2$s".
zh-cn	聚合图形 "%2$s" 用户组共享找不到参数 %1$s

en-us	User group with ID "%1$s" is not available.
zh-cn	ID为"%1$s" 的用户组不可用。

en-us	User is not allowed to delete himself.
zh-cn	用户是不允许删除自己

en-us	User macro missing parameters: %1$s
zh-cn	用户宏缺少参数： %1$s

en-us	User menu
zh-cn	用户菜单

en-us	Username
zh-cn	用户名称

en-us	User name
zh-cn	用户名称

en-us	Username and password
zh-cn	用户名和密码

en-us	User password
zh-cn	用户密码

en-us	User profile
zh-cn	用户基本资料

en-us	User/Recipient
zh-cn	用户/接受者

en-us	Users
zh-cn	用户

en-us	User session data storage period
zh-cn	用户会话数据存储时间

en-us	User session data storage period "%1$s".
zh-cn	用户会话数据存储期间 "%1$s"。

en-us	User sessions
zh-cn	用户会话

en-us	User sharing is missing parameters: %1$s for map "%2$s".
zh-cn	拓扑图 "%2$s" 用户共享缺少参数 %1$s 

en-us	User sharing is missing parameters: %1$s for screen "%2$s".
zh-cn	聚合图形 "%2$s" 用户共享缺少参数 %1$s 。

en-us	Users unblocked
zh-cn	未被锁定的用户

en-us	User type
zh-cn	用户类型

en-us	User updated
zh-cn	用户已更新

en-us	User with alias "%s" already exists.
zh-cn	使用别名"%s"的用户已存在.

en-us	User with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的用户不可用。

en-us	##### utf8mb4 support for MySQL  utf8mb4 encoding with utf8mb4\_bin collation is now supported for Zabbix installations with the MySQL/MariaDB database.  Previously only utf8 encoding was supported, which with MySQL stands for utf8mb3 encoding and thus supports only a subset of proper UTF-8 characters. In the new version utf8mb4 support has been added with support for the [full](https://dev.mysql.com/doc/refman/8.0/en/charset-unicode-utf8mb4.html) UTF-8 character set. Old installations using utf8mb3 are kept intact and may continue using that encoding.  See also instructions on executing [utf8mb4 conversion](/manual/appendix/install/db_charset_coll) post-upgrade to 6.0.
zh-cn	##### 对 MySQL 的 utf8mb4 支持  使用 MySQL/MariaDB 数据库的 Zabbix 安装现在支持使用 utf8mb4\_bin 排序规则的 utf8mb4 编码。  以前只支持 utf8 编码，MySQL 代表 utf8mb3 编码，因此只支持正确 UTF-8 字符的子集。在新版本中，增加了对 utf8mb4 的支持，并支持 [完整的](https://dev.mysql.com/doc/refman/8.0/en/charset-unicode-utf8mb4.html) UTF-8 字符集。使用 utf8mb3 的旧安装保持不变，并且可以继续使用该编码。

en-us	value
zh-cn	值

en-us	Value
zh-cn	ֵ值

en-us	value %1$s already exists
zh-cn	值 %1$s 已存在

en-us	Value "%1$s" is invalid for parameter "grid_align". Choices are: "%2$s" and "%3$s"
zh-cn	参数"grid_align"的值"%1$s"是无效的. 可用的是: "%2$s"和"%3$s"

en-us	Value "%1$s" is invalid for parameter "grid_show". Choices are: "%2$s".
zh-cn	参数 "grid_show "的值 "%1$s"是无效的. 可用的是: "%2$s"

en-us	Value "%1$s" is invalid for parameter "grid_show". Choices are: "%2$s" and "%3$s".
zh-cn	参数 "grid_show "的值 "%1$s "是无效的. 可用的是: "%2$s "和 "%3$s".

en-us	Value "%1$s" is too long for field "%2$s" - %3$d characters. Allowed length is %4$d characters.
zh-cn	栏位"%2$s"的值"%1$s"太长 - %3$d字元. 容许的长度是%4$d字符.

en-us	value "%1$s" not found
zh-cn	值 "%1$s" 未找到

en-us	Value "%2$s" of "%1$s" has incorrect decimal format.
zh-cn	"%1$s"的值"%2$s"为非正确的数字格式.

en-us	Value "%2$s" of "%1$s" has too many digits after the decimal point: it cannot have more than %3$s digits.
zh-cn	"%1$s"的值"%2$s"小数点后面有太多的数字：小数点后面不能有超过%3$s个数字.

en-us	Value "%2$s" of "%1$s" has too many digits before the decimal point: it cannot have more than %3$s digits.
zh-cn	"%1$s"的值"%2$s"小数点前面有太多的数字：小数点前面不能有超过%3$s个数字。

en-us	Value "%2$s" of "%1$s" is too long: it cannot have more than %3$s digits before the decimal point and more than %4$s digits after the decimal point.
zh-cn	"%1$s"的值"%2$s"太长：值的小数点前面不能有超过%3$s个数字且小数点后面不能有超过%4$s个数字.

en-us	Value cache effectiveness. Valid parameters are: requests, hits and misses.
zh-cn	数值缓存无效。合法的参数有:requests, hits and misses.

en-us	Value cache statistics. Valid modes are: total, free, pfree, used and pused.
zh-cn	数值缓存统计。合法的mode参数有：total, free, pfree, used and pused.

en-us	value is too long
zh-cn	值过长

en-us	Value map
zh-cn	值映射

en-us	Value map "%1$s" already exists.
zh-cn	值映射 "%1$s"已存在.

en-us	Value map added
zh-cn	值映射已添加

en-us	Value map deleted
zh-cn	值对应已删除

en-us	Value mapping
zh-cn	值映射

en-us	Value mappings
zh-cn	映射值

en-us	Value mappings for value maps will be updated!
zh-cn	拓扑图映射值已更新！

en-us	Value map updated
zh-cn	值映射已更新

en-us	value must be one of %1$s
zh-cn	值必须是 %1$s 之一

en-us	Value: no data
zh-cn	值: 无数据

en-us	Value of any Windows performance counter. Returns integer, float, string or text (depending on the request)
zh-cn	所有Windows计数器值。返回 整形、浮点、字符串、文本

en-us	Values
zh-cn	值

en-us	Values without names are not allowed in form fields.
zh-cn	在表单字段中不允许空的值。

en-us	Variables
zh-cn	变量

en-us	Various information about specific process(es). Returns float
zh-cn	具体处理的各个信息。返回浮点数

en-us	Vendor
zh-cn	提供者

en-us	Verbose
zh-cn	冗余

en-us	Version of Zabbix agent. Returns string
zh-cn	zabbix客户端（agent）的版本。返回字符串

en-us	Vertical
zh-cn	垂直的

en-us	Vertical align
zh-cn	纵向对齐

en-us	via
zh-cn	通过

en-us	Vietnamese (vi_VN)
zh-cn	越南(vi_VN)

en-us	View as
zh-cn	以视图

en-us	View is not rendered.
zh-cn	视图未能形成.

en-us	Virtual space size in bytes or in percentage from total. Returns integer for bytes; float for percentage
zh-cn	虚拟空间大小（以字节计）或百分比（总计）。 返回整型字节; 浮点百分比

en-us	Visible name
zh-cn	可见的名称

en-us	Visible name cannot be empty if host name is missing.
zh-cn	如果缺少主机名称, 可见的名称不能为空.

en-us	VMware cache statistics. Valid modes are: total, free, pfree, used and pused.
zh-cn	VMware缓存统计.可用的mode有:total, free, pfree, used and pused.

en-us	VMware cluster status, <url> - VMware service URL, <name> - VMware cluster name
zh-cn	VMware集群状态, <url> - VMware 服务 URL, <name> - VMware 集群名称

en-us	VMware datastore capacity statistics in bytes or in percentage from total. Returns integer for bytes; float for percentage
zh-cn	VMware数据存储容量统计信息，以字节为单位，以百分比表示。 返回整形; 浮点百分比

en-us	VMware hypervisor ballooned memory size, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware 虚拟机澎涨内存大小, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机名

en-us	VMware hypervisor BIOS uuid, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor BIOS uuid,<url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor cluster name, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 集群名,<url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor datastore read statistics, <url> - VMware service URL, <uuid> - VMware hypervisor host name, <datastore> - datastore name, <mode> - latency
zh-cn	VMware hypervisor 数据池读统计,<url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名, <datastore> - 数据池名 ,<mode> - latency

en-us	VMware hypervisor datastore write statistics, <url> - VMware service URL, <uuid> - VMware hypervisor host name, <datastore> - datastore name, <mode> - latency
zh-cn	VMware hypervisor 数据池写统计,<url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名, <datastore> - 数据池名 ,<mode> - latency

en-us	VMware hypervisor model, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 型号; <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor name, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 名称, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor network input statistics, <url> - VMware service URL, <uuid> - VMware hypervisor host name, <mode> - bps
zh-cn	VMware hypervisor 网络进流量统计, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名, <mode> - bps

en-us	VMware hypervisor network output statistics, <url> - VMware service URL, <uuid> - VMware hypervisor host name, <mode> - bps
zh-cn	VMware hypervisor 网络输出流量统计, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名, <mode> - bps

en-us	VMware hypervisor performance counter, <url> - VMware service URL, <uuid> - VMware hypervisor host name, <path> - performance counter path, <instance> - performance counter instance
zh-cn	VMware hypervisor性能计数器,<url>-VMware服务URL,<uuid>-VMware hypervisor主机名,<path>-性能计数器路径,<instance>-性能计数器实例

en-us	VMware hypervisor processor frequency, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 处理器频率, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor processor model, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 处理器型号, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor processor usage in Hz, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 处理器使用率单位Hz, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor status, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 状态, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor total memory size, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 总内存大小, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor uptime, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 在线时间, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor used memory size, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 已使用内存大小, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor vendor name, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 供应商名, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware hypervisor version, <url> - VMware service URL, <uuid> - VMware hypervisor host name
zh-cn	VMware hypervisor 版本, <url> - VMware 服务 URL, <uuid> - VMware hypervisor 主机名

en-us	VMware service full name, <url> - VMware service URL
zh-cn	VMware 服务完整名, <url> - VMware 服务 URL

en-us	VMware service version, <url> - VMware service URL
zh-cn	VMware 服务版本, <url> - VMware 服务 URL

en-us	VMware virtual machine ballooned memory size, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机澎涨内存大小, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机名

en-us	VMware virtual machine committed storage space, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机已经使用的存储空间, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机名

en-us	VMware virtual machine compressed memory size, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware虚拟机压缩内存大小, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机名

en-us	VMware virtual machine disk device read statistics, <url> - VMware service URL, <uuid> - VMware virtual machine host name, <instance> - disk device instance, <mode> - bps/ops - bytes/operations per second
zh-cn	VMware 虚拟机磁盘设备读统计, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名, <instance> - 磁盘设备, <mode> - bps/ops - bytes/operations per second

en-us	VMware virtual machine disk device write statistics, <url> - VMware service URL, <uuid> - VMware virtual machine host name, <instance> - disk device instance, <mode> - bps/ops - bytes/operations per second
zh-cn	VMware 虚拟机磁盘设备写统计, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名, <instance> - 磁盘设备, <mode> - bps/ops - bytes/operations per second

en-us	VMware virtual machine file system statistics, <url> - VMware service URL, <uuid> - VMware virtual machine host name, <fsname> - file system name, <mode> - total/free/used/pfree/pused
zh-cn	VMware 虚拟机文件系统统计, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名, <fsname> - 文件系统名, <mode> - total/free/used/pfree/pused

en-us	VMware virtual machine guest memory usage, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机内存使用率, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine host memory usage, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机宿主机内存使用率, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine hypervisor name, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机hypervisor 名,<url> - VMware 服务 URL,<uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine name, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机名, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine network interface input statistics, <url> - VMware service URL, <uuid> - VMware virtual machine host name, <instance> - network interface instance, <mode> - bps/pps - bytes/packets per second
zh-cn	VMware 虚拟机网络接口进入流量统计, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名, <instance> - 网络接口名称, <mode> - bps/pps - bytes/packets per second

en-us	VMware virtual machine network interface output statistics, <url> - VMware service URL, <uuid> - VMware virtual machine host name, <instance> - network interface instance, <mode> - bps/pps - bytes/packets per second
zh-cn	虚拟机网络接口流出流量统计, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名, <instance> - 网络接口名称, <mode> - bps/pps - bytes/packets per second

en-us	VMware virtual machine performance counter, <url> - VMware service URL, <uuid> - VMware virtual machine host name, <path> - performance counter path, <instance> - performance counter instance
zh-cn	VMware虚拟机性能计数器,<url>-VMware服务URL,<uuid>-VMware 虚拟机主机名,<path>-性能计数器路径,<instance>-性能计数器实例

en-us	VMware virtual machine power state, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机电源状态, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine private memory size, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机私有内存大小, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine processor ready time ms, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware虚拟机处理器准备时间ms，<url> - VMware服务URL，<uuid> - VMware虚拟机主机名

en-us	VMware virtual machine processor usage in Hz, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机处理器使用率，单位Hz, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine shared memory size, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机共享内存大小, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine swapped memory size, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机交换分区大小, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine total memory size, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机总内存大小, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine uncommitted storage space, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机的未提交存储空间(uncommitted storage space), <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine unshared storage space, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机非共享存储空间, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	VMware virtual machine uptime, <url> - VMware service URL, <uuid> - VMware virtual machine host name
zh-cn	VMware 虚拟机在线时间, <url> - VMware 服务 URL, <uuid> - VMware 虚拟机主机名

en-us	W
zh-cn	W

en-us	Warning
zh-cn	警告

en-us	Warning
zh-cn	设置

en-us	We are sorry, the maximum possible number of elements to remember has been reached.
zh-cn	很抱歉, 已经到了最大的组件数量.

en-us	Web
zh-cn	Web监测

en-us	Web monitoring
zh-cn	Web监测

en-us	Web scenario
zh-cn	Web 场景

en-us	Web scenario "%1$s" already exists.
zh-cn	Web 场景 "%1$s" 已经存在.

en-us	Web scenario "%1$s" already exists on host "%2$s".
zh-cn	Web 场景 "%1$s" 已经存在在主机 "%2$s".

en-us	Web scenario "%1$s" on "%2$s": application "%3$s" does not exist.
zh-cn	Web 脚本"%1$s"在"%2$s":应用"%3$s"不存在。

en-us	Web scenario added
zh-cn	Web 场景已添加

en-us	Web scenario deleted
zh-cn	Web 场景被被删除

en-us	Web scenario disabled
zh-cn	Web 场景被禁用

en-us	Web scenario enabled
zh-cn	Web 场景已启用

en-us	Web scenarios
zh-cn	Web 场景

en-us	Web scenario updated
zh-cn	Web 场景已更新

en-us	Wed
zh-cn	三

en-us	Wednesday
zh-cn	周三

en-us	Weekly
zh-cn	每周

en-us	Welcome
zh-cn	欢迎

en-us	Welcome to
zh-cn	欢迎来到

en-us	When active
zh-cn	当启用时

en-us	Width
zh-cn	宽

en-us	With data collection
zh-cn	有数据收集

en-us	Without problems
zh-cn	正常设备

en-us	Without triggers
zh-cn	无触发器

en-us	With problems
zh-cn	异常设备

en-us	With triggers
zh-cn	有触发器

en-us	Wizard
zh-cn	Wizard

en-us	Working time
zh-cn	工作时间

en-us	Working time "%1$s".
zh-cn	工作时间"%1$s".

en-us	Write
zh-cn	写

en-us	wrong discovery rule type
zh-cn	错误的发现规则类型

en-us	Wrong fields for dependency for service "%1$s".
zh-cn	错误的服务"%1$s"其依赖关系栏位.

en-us	Wrong fields for host "%1$s".
zh-cn	错误的主机栏位"%1$s".

en-us	Wrong fields for macro "%1$s".
zh-cn	错误的宏栏位"%1$s".

en-us	Wrong fields for map link.
zh-cn	错误的图像连接栏位.

en-us	Wrong fields for service "%1$s".
zh-cn	错误的服务栏位"%1$s".

en-us	Wrong fields for time for service "%1$s".
zh-cn	错误的服务"%1$s"其时间栏位.

en-us	wrong item type
zh-cn	错误的监控项类型

en-us	[Wrong value for day: "%s" ]
zh-cn	[错误的日计数: "%s" ]

en-us	[Wrong value for month: "%s" ]
zh-cn	[错误的月计数: "%s" ]

en-us	Wrong value for url field.
zh-cn	url 栏值错误。

en-us	X
zh-cn	X

en-us	X1
zh-cn	X1

en-us	X2
zh-cn	X2

en-us	X-Axis
zh-cn	X轴

en-us	XML data
zh-cn	XML 数据

en-us	XML is empty
zh-cn	XML空

en-us	XML XPath
zh-cn	XML XPath

en-us	y
zh-cn	y

en-us	Y
zh-cn	Y

en-us	Y1
zh-cn	Y1

en-us	Y2
zh-cn	Y2

en-us	Y-axis
zh-cn	Y轴

en-us	Y axis MAX value
zh-cn	纵轴最大值

en-us	Y axis MAX value must be greater than Y axis MIN value.
zh-cn	Y axis MAX value must be greater than Y axis MIN value.

en-us	Y axis MIN value
zh-cn	纵轴Y最小值MIN

en-us	Y axis side
zh-cn	纵轴Y侧

en-us	Year
zh-cn	年

en-us	Yearly
zh-cn	每年

en-us	Yes
zh-cn	是

en-us	Yesterday
zh-cn	昨天

en-us	Y-m-d
zh-cn	Y/m/d

en-us	Y-m-d H:i
zh-cn	Y/m/d H:i:s

en-us	Y-m-d H:i:s
zh-cn	Y-m-d H:i:s

en-us	You are logged in as "%1$s".
zh-cn	"%1$s" 欢迎登入.

en-us	You are not able to choose some of the languages, because locales for them are not installed on the web server.
zh-cn	您无法选择某些语言, 因为这些语言并未安装在web服务器上。

en-us	You are not logged in
zh-cn	您还没有登录。

en-us	You can not switch hosts for current selection.
zh-cn	您无法为目前的选择切换主机.

en-us	You did not specify host for operation.
zh-cn	您没有指定主机来操作.

en-us	You did not specify host group for operation.
zh-cn	您没有指定主机群组来操作.

en-us	You did not specify targets for action operation command "%s".
zh-cn	您没有指定目标为动作操作的命令"%s".

en-us	You did not specify targets for action operation global script "%s".
zh-cn	您没有指定目标为动作操作的全域脚本"%s".

en-us	You do not have permissions to create users.
zh-cn	您没有权限来创建用户.

en-us	You do not have permission to perform this operation.
zh-cn	您没有权限来完成此操作.

en-us	You have no permissions to access this page.
zh-cn	你没有权限来访问这个页面.

en-us	You have unsaved changes.
zh-cn	您有未保存的更改。

en-us	You must login to view this page.
zh-cn	您必需登录才能浏览此页面.

en-us	Your database is not working properly. Please wait a few minutes and try to repeat this action. If the problem still persists, please contact system administrator. The problem might be caused by long running transaction or row level lock accomplished by your database management system.
zh-cn	您的数据库无法正常工作。请等待几分钟，然后尝试重复此操作。如果问题仍然存在，请与系统管理员联系。该问题可能是数据库管理系统由于长期运行的事务或行级锁定引起的。

en-us	YYYY-MM-DD hh:mm
zh-cn	YYYY-MM-DD hh:mm

en-us	YYYY-MM-DDThh:mm:ssZ
zh-cn	YYYY-MM-DDThh:mm:ssZ

en-us	Zabbix
zh-cn	Zabbix

en-us	ZABBIX
zh-cn	Zabbix

en-us	Zabbix Admin
zh-cn	管理员

en-us	Zabbix agent
zh-cn	Zabbix 客户端

en-us	Zabbix agent (active)
zh-cn	Zabbix客户端(主动式)

en-us	Zabbix aggregate
zh-cn	Zabbix整合

en-us	Zabbix has received an incorrect request.
zh-cn	Zabbix已接收到一个错误的请求.

en-us	Zabbix internal
zh-cn	Zabbix内部

en-us	Zabbix internal authentication
zh-cn	Zabbix内部认证

en-us	Zabbix login form
zh-cn	Zabbix 登录表单

en-us	Zabbix server
zh-cn	zabbix服务器

en-us	Zabbix server details
zh-cn	zabbix 服务器 详细信息

en-us	Zabbix server is not running: the information displayed may not be current.
zh-cn	Zabbix server is not running: the information displayed may not be current.

en-us	Zabbix server is running
zh-cn	Zabbix服务器端运行中

en-us	Zabbix server is running check interval "%1$s".
zh-cn	Zabbix主机正运行检查间隔"%1$s".

en-us	Zabbix server name
zh-cn	Zabbix主机名称

en-us	Zabbix server port
zh-cn	Zabbix主机端口

en-us	Zabbix server (proxy)
zh-cn	Zabbix server (代理)

en-us	Zabbix server "%s" can not be reached. Possible reasons: 1. Incorrect server IP/DNS in the "zabbix.conf.php"; 2. Incorrect network configuration. 
zh-cn	无法连到Zabbix服务器"%s"。可能的原因是： 1. "zabbix.conf.php" 中 IP/DNS 设置错误； 2. 错误的网络配置。 

en-us	Zabbix Share
zh-cn	zabbix 共享

en-us	Zabbix Super Admin
zh-cn	超级管理员

en-us	Zabbix Technical Support
zh-cn	Zabbix 技术支持

en-us	Zabbix trapper
zh-cn	Zabbix采集器

en-us	Zabbix User
zh-cn	用户

en-us	Zoom out
zh-cn	缩小

en-us	(0 - infinitely)
zh-cn	(0 - 无穷大)

en-us	0 or 1
zh-cn	0 或 1

en-us	(0 - use action default)
zh-cn	(0 - 使用默认)

en-us	0 - use default port
zh-cn	0 - 使用默认端口

en-us	100 busiest triggers
zh-cn	触发器TOP100

en-us	10 seconds
zh-cn	10秒

en-us	%1$d characters exceeds maximum length of %2$d characters
zh-cn	%1$d 个字符超出了 %2$d 个字符的最大长度

en-us	%1$d day
zh-cn	%1$d 天

en-us	%1$d matches for %2$s found
zh-cn	%1$d 匹配找到的 %2$s

en-us	%1$d of %3$d%2$s problem is shown
zh-cn	%1$d of %3$d%2$s 问题显示

en-us	%1$d problems selected.
zh-cn	%1$d 个问题被选择。

en-us	1 minute
zh-cn	1分

en-us	(%1$s %2$s)
zh-cn	(%1$s %2$s)

en-us	%1$s action
zh-cn	%1$s 动作

en-us	%1$s characters
zh-cn	%1$s 个字符

en-us	%1$s characters remaining
zh-cn	剩余%1$s 个字符

en-us	%1$s event
zh-cn	%1$s 事件

en-us	%1$s host in maintenance
zh-cn	%1$s 主机在维护中

en-us	"%1$s" instead "%2$s"
zh-cn	"%1$s" 替代 "%2$s"

en-us	"%1$s" is expected
zh-cn	"%1$s" 预计

en-us	%1$s item
zh-cn	%1$s 项目

en-us	%1$s Item
zh-cn	%1$s 监控项

en-us	%1$s [Line: %2$s | Column: %3$s]
zh-cn	%1$s [线: %2$s | 列: %3$s]

en-us	%1$s message
zh-cn	%1$s 消息

en-us	%1$s minute
zh-cn	%1$s 分

en-us	"%1$s" must be between 1970.01.01 and 2038.01.18.
zh-cn	"%1$s" 必须是在 1970.01.01 与 2038.01.18之间.

en-us	%1$s of %2$s element in problem state
zh-cn	处于问题状态的 %2$s 元素的 %1$s

en-us	%1$s preselected, use down,up arrow keys and enter to select
zh-cn	选择了 %1$s 项，您可以使用向上和向下箭头键以及回车键进行选择

en-us	%1$s problem
zh-cn	问题发生在 %1$s

en-us	%1$s problem in total
zh-cn	异常问题总计 %1$s

en-us	%1$s, read only
zh-cn	%1$s, 只读

en-us	%1$s retry left
zh-cn	剩余%1$s 重试次数

en-us	%1$s second
zh-cn	%1$s 秒

en-us	%1$s, selected
zh-cn	%1$s, 选择

en-us	%1$s, Severity, %2$s
zh-cn	%1$s, 严重性, %2$s

en-us	%1$s - thrown by module located at %2$s.
zh-cn	%1$s - 异常模块位于 %2$s。

en-us	%1$s unacknowledged problem
zh-cn	%1$s 未知的问题

en-us	"%1$s" value must be less than or equal to "%2$s" value
zh-cn	"%1$s" 的值必须小于或等于 "%2$s" 的值

en-us	%1$s widget
zh-cn	小构件 %1$s 

en-us	%1$s (year %2$s)
zh-cn	%1$s (年 %2$s)

en-us	30 seconds
zh-cn	30秒

en-us	3D view
zh-cn	3D 视图

en-us	%4$s failed login attempt logged. Last failed attempt was from %1$s on %2$s at %3$s.
zh-cn	发生了 %4$s 次失败的登陆尝试。最后一次失败的登陆尝试发生在 %2$s 日 %3$s 客户端IP地址是 %1$s 。  连续发生了 %4$s 次失败的登陆尝试。最后一次失败的登陆尝试发生在 %2$s 日 %3$s 客户端IP地址是 %1$s 。

en-us	500 latest values
zh-cn	最近500个值

en-us	5 minutes
zh-cn	5分

en-us	5 seconds
zh-cn	5秒

en-us	a boolean is expected
zh-cn	预先设定的布尔值

en-us	abschange() - Absolute difference between last and previous value
zh-cn	abschange() - 后一个值与前一个值变动的绝对值。

en-us	Acceptable SLA
zh-cn	可接受的SLA

en-us	Access denied
zh-cn	访问拒绝

en-us	Access denied!
zh-cn	访问拒绝!

en-us	a character string is expected
zh-cn	请在字符串中指定

en-us	Ack
zh-cn	确认

en-us	Acknowledge
zh-cn	确认

en-us	Acknowledged
zh-cn	已确认

en-us	Acknowledged PROBLEM events
zh-cn	已确认问题事件

en-us	Acknowledged RESOLVED events
zh-cn	确认已解决的事件

en-us	Action
zh-cn	动作

en-us	Action "%1$s" already exists.
zh-cn	动作 "%1$s" 已经存在。

en-us	Action "%1$s" no operations defined.
zh-cn	动作 "%1$s" 没有定义操作。

en-us	Action added
zh-cn	动作已添加

en-us	Action deleted
zh-cn	动作已删除

en-us	Action disabled
zh-cn	激活 禁用激活 禁用

en-us	Action enabled
zh-cn	激活 启用激活 启用

en-us	Action log
zh-cn	动作日志

en-us	Actions
zh-cn	动作

en-us	Action updated
zh-cn	动作已更新

en-us	Active
zh-cn	启用中

en-us	Active
zh-cn	主动式

en-us	Active since
zh-cn	启用自从

en-us	Active till
zh-cn	启用直到

en-us	Add
zh-cn	添加

en-us	Add a new widget
zh-cn	添加新构件

en-us	Add child
zh-cn	添加子节点

en-us	Add child element
zh-cn	添加子节点元素

en-us	Added, %1$s
zh-cn	%1$s，已添加

en-us	Add host
zh-cn	添加主机

en-us	Add (message type limit reached)
zh-cn	添加（已达消息类型限制）

en-us	Add missing
zh-cn	添加缺失的

en-us	Add multiple maps
zh-cn	添加多个拓扑图

en-us	Add new data set
zh-cn	添加新数据集

en-us	Add new interface
zh-cn	添加新的接口

en-us	Add new override
zh-cn	添加新的覆盖

en-us	ADD OVERRIDE
zh-cn	添加覆盖

en-us	Add prototype
zh-cn	添加原型

en-us	Add submaps
zh-cn	添加子图

en-us	Add to favourites
zh-cn	添加到常用

en-us	Add to host group
zh-cn	添加到主机群组

en-us	Add to host groups
zh-cn	添加到主机群组

en-us	Add widget
zh-cn	添加构件

en-us	Admin
zh-cn	管理者

en-us	Administration
zh-cn	管理

en-us	Advanced labels
zh-cn	高级标签

en-us	AES
zh-cn	AES

en-us	affects only filtered data
zh-cn	只影响过滤后的数据

en-us	a floating point value is expected
zh-cn	需用浮点值

en-us	Age
zh-cn	持续时间

en-us	Age less than
zh-cn	持续时间小于

en-us	Age less than %1$s
zh-cn	存在时间小于 %1$s

en-us	agent
zh-cn	agent代理程序

en-us	Agent
zh-cn	客户端

en-us	Agent availability check. Returns nothing - unavailable; 1 - available
zh-cn	客户端可达性检查。返回 nothing - 不可达；1 - 可达

en-us	Agent encryption
zh-cn	agent 加密

en-us	Agent host name. Returns string
zh-cn	客户端主机名。返回字符串

en-us	Agent interfaces
zh-cn	agent代理程序的接口

en-us	Agent variant check. Returns 1 - for Zabbix agent; 2 - for Zabbix agent 2
zh-cn	Agent类型检查。返回1 - Zabbix agent；2 - Zabbix agent2

en-us	Aggregate
zh-cn	聚合

en-us	Aggregation function
zh-cn	聚合函数

en-us	Aggregation interval
zh-cn	聚合时间区间

en-us	a hexadecimal colour code (6 symbols) is expected
zh-cn	期望十六进制颜色代码（6个符号）

en-us	Alert message
zh-cn	告警消息

en-us	Alias
zh-cn	别名

en-us	Align map elements
zh-cn	对齐拓扑元素

en-us	all
zh-cn	所有

en-us	All
zh-cn	所有

en-us	All dashboards
zh-cn	添加仪表盘

en-us	All groups
zh-cn	所有组

en-us	All hosts
zh-cn	所有主机

en-us	All links should have "Name" and "URL" specified
zh-cn	所有的链接应含 特定的名称和URL

en-us	All maps
zh-cn	所有地图

en-us	all media
zh-cn	所有介质

en-us	Allowed hosts
zh-cn	允许的主机

en-us	Allow manual close
zh-cn	允许手动关闭

en-us	All problems
zh-cn	所有问题

en-us	All problems if tag values match
zh-cn	所有问题如果标签值匹配

en-us	All screens
zh-cn	所有 聚合图形

en-us	All slide shows
zh-cn	所有 IDE 展示

en-us	All tags
zh-cn	所有标签

en-us	All templates
zh-cn	所有模板

en-us	a low-level discovery macro is expected
zh-cn	需用一个自动发现宏

en-us	Alternatively, you can install it manually:
zh-cn	另外，您也可以手动安装:

en-us	an array is expected
zh-cn	请在阵列中指定

en-us	an array or a character string is expected
zh-cn	预设一个数组或一个字符串

en-us	an array or object is expected
zh-cn	应为数组或对象

en-us	And
zh-cn	和（同时满足）

en-us	AND
zh-cn	与

en-us	And/Or
zh-cn	与/或（默认）

en-us	an empty string is expected
zh-cn	请指定一个空字符串

en-us	an even number of hexadecimal characters is expected
zh-cn	预设会出现偶数个十六进制字符

en-us	an explicit time is expected
zh-cn	需要一个明确的时间

en-us	an integer is expected
zh-cn	应为整数

en-us	a number has too many fractional digits
zh-cn	数字的小数位太多

en-us	a number is expected
zh-cn	预先设定的数字

en-us	a number is too large
zh-cn	数字过大

en-us	a numeric value is expected
zh-cn	一个数值预计

en-us	an unsigned integer is expected
zh-cn	应为无符号整数

en-us	Any
zh-cn	任何

en-us	Any character string included
zh-cn	包括任何字符串

en-us	Application
zh-cn	应用集

en-us	Application "%1$s" already exists.
zh-cn	应用集 "%1$s" 已存在.

en-us	Application added
zh-cn	应用集已添加

en-us	Application deleted
zh-cn	分类已删除

en-us	Application error.
zh-cn	应用集 错误.

en-us	Application prototypes
zh-cn	应用集原型

en-us	Applications
zh-cn	应用集

en-us	Application updated
zh-cn	应用集已更新

en-us	Application with applicationid "%1$s" does not exist.
zh-cn	应用程序ID "%1$s" 不存在。

en-us	Application with ID "%1$s" is not available on "%2$s".
zh-cn	ID为 "%1$s"的应用集不在 "%2$s" 之中.

en-us	Apply
zh-cn	应用

en-us	Apply permissions and tag filters to all subgroups
zh-cn	应用权限和标签过滤器到所有分组

en-us	Approaching
zh-cn	接近中

en-us	Apr
zh-cn	四月

en-us	April
zh-cn	四月

en-us	Area size
zh-cn	区域大小

en-us	Area type
zh-cn	区域类型

en-us	a relative time is expected
zh-cn	预计相对时间

en-us	Are you sure you want perform this action?
zh-cn	您确定要执行这个动作吗?

en-us	Are you sure you want to delete
zh-cn	您确定要删除吗

en-us	Are you sure, you want to leave this page?
zh-cn	你是否确定要离开这个页面？

en-us	Arithmetic
zh-cn	算法

en-us	as Blue
zh-cn	成蓝

en-us	ascending
zh-cn	上一层

en-us	as Green
zh-cn	成绿

en-us	As is
zh-cn	不变

en-us	As plain text
zh-cn	纯文字

en-us	as Red
zh-cn	成红

en-us	Assertions
zh-cn	断言

en-us	Asset tag
zh-cn	资产标签

en-us	a string, number or null value is expected
zh-cn	应为字符串、数字或空值

en-us	At %1$s:%2$s %3$s of every week
zh-cn	每周的 %1$s:%2$s %3$s每 %4$s 周的 %1$s:%2$s %3$s

en-us	At %1$s:%2$s every day
zh-cn	每天 %1$s:%2$s每 %3$s 天 %1$s:%2$s

en-us	At %1$s:%2$s on %3$s %4$s of every %5$s
zh-cn	在 %1$s:%2$s 的 %3$s %4$s 的每个 %5$s

en-us	At %1$s:%2$s on day %3$s of every %4$s
zh-cn	在 %1$s:%2$s 的天 %3$s 的每个 %4$s

en-us	At (hour:minute)
zh-cn	于(时:分)

en-us	a time is expected
zh-cn	a 预计时间

en-us	a time period is expected
zh-cn	预设时间段

en-us	a time range is expected
zh-cn	预计时间范围

en-us	a time unit is expected
zh-cn	预设时间单位

en-us	At least one action is mandatory.
zh-cn	至少必须执行一项操作。

en-us	At least one host group or host must be selected.
zh-cn	至少选择一个主机群组或主机。

en-us	At least one maintenance period must be created.
zh-cn	必须创建至少一个维护期间.

en-us	At least one of MySQL, PostgreSQL or Oracle should be supported.
zh-cn	应该至少支持MySQL，PostgreSQL或Oracle中的一种。

en-us	At least one operation must be selected.
zh-cn	必须至少选择一项操作。

en-us	At least one operation must exist.
zh-cn	必须至少设置一个执行内容。

en-us	at least one override option must be specified
zh-cn	至少选定一个覆盖选项

en-us	At least one update operation or message is mandatory
zh-cn	至少需要选择一个更新操作或消息

en-us	At least one update operation or message must exist.
zh-cn	至少需要一个更新内容或消息。

en-us	At least one user or user group must be selected.
zh-cn	您必须至少选择一个用户或用户组。

en-us	Attempt interval
zh-cn	尝试间隔

en-us	Attempts
zh-cn	尝试次数

en-us	Audit
zh-cn	审计

en-us	Audit data storage period "%1$s".
zh-cn	审计数据存储期 "%1$s" 。

en-us	Audit log
zh-cn	审计日志

en-us	Aug
zh-cn	八月

en-us	August
zh-cn	八月

en-us	a user macro is expected
zh-cn	预设用户宏

en-us	Authentication
zh-cn	认证

en-us	Authentication algorithm
zh-cn	认证算法

en-us	Authentication failed: %1$s.
zh-cn	验证失败: %1$s

en-us	Authentication method
zh-cn	认证方法

en-us	Authentication method changed
zh-cn	身份验证已经变更

en-us	Authentication passphrase
zh-cn	验证口令

en-us	Authentication protocol
zh-cn	验证协议

en-us	Authentication settings updated
zh-cn	验证设置已更新

en-us	AuthN requests
zh-cn	AuthN 请求

en-us	Author
zh-cn	作者

en-us	Auto
zh-cn	自动

en-us	Auto-login
zh-cn	自动登录

en-us	Auto-login and auto-logout options cannot be enabled together.
zh-cn	自动登录和自动注销功能不能同时使用。

en-us	Auto-logout
zh-cn	自动注销

en-us	Automatic
zh-cn	自动地

en-us	Automatic icon mapping
zh-cn	自动的图标映射

en-us	Automatic icon selection
zh-cn	自动的图标选择

en-us	autoregistered host
zh-cn	自动注册主机

en-us	autoregistration
zh-cn	自动注册

en-us	Autoregistration
zh-cn	自动注册

en-us	Autoregistration actions
zh-cn	自动注册动作

en-us	Autoregistration data storage period
zh-cn	自动注册数据存储周期

en-us	Autoregistration event and alert data storage period "%1$s".
zh-cn	自动注册事件和报警数据存储期 "%1$s"。

en-us	Availability
zh-cn	可用性

en-us	Availability report
zh-cn	可用性报表

en-us	Available
zh-cn	可用

en-us	Average
zh-cn	一般严重

en-us	avg
zh-cn	平均

en-us	avg() - Average value of a period T
zh-cn	avg() - 周期 T 内的平均值

en-us	Axes
zh-cn	坐标轴

en-us	Back
zh-cn	返回

en-us	Background
zh-cn	背景

en-us	Background colour
zh-cn	背景色

en-us	Background image
zh-cn	背景图片

en-us	band() - Bitwise AND of last (most recent) T value and mask
zh-cn	band() - 将最近的 T 值和掩码进行按位与运算

en-us	Bar
zh-cn	柱状图

en-us	Base colour
zh-cn	基色

en-us	Base DN
zh-cn	基于 DN

en-us	Basic
zh-cn	基础的

en-us	Bind DN
zh-cn	绑定 DN

en-us	Bind password
zh-cn	绑定密码

en-us	blinking
zh-cn	闪烁

en-us	Blocked
zh-cn	锁定的

en-us	Blue
zh-cn	蓝

en-us	Body
zh-cn	内容

en-us	Body and headers
zh-cn	body 和 headers

en-us	Bold line
zh-cn	粗线

en-us	Boolean to decimal
zh-cn	布尔值到十进制

en-us	Border
zh-cn	边

en-us	Border colour
zh-cn	边框颜色

en-us	Border type
zh-cn	边框类型

en-us	Border width
zh-cn	边框宽度

en-us	Both passwords must be equal.
zh-cn	两次密码必须相同。

en-us	both username and password should be either present or empty
zh-cn	用户名和密码都应该存在或为空

en-us	Bottom
zh-cn	底部

en-us	Bring forward
zh-cn	向上一层

en-us	Bring to front
zh-cn	移到上一层

en-us	Bulgarian (bg_BG)
zh-cn	保加利亚语 (bg_BG)

en-us	By host
zh-cn	按主机

en-us	By trigger template
zh-cn	按触发器模板

en-us	calculated
zh-cn	计算的

en-us	Calculated
zh-cn	可计算的

en-us	Calculate SLA, acceptable SLA (in %)
zh-cn	计算SLA, 可接受的SAL(%计)

en-us	Calculates the average value, based on the various parameters supplied. Zabbix server collects aggregate information by doing direct database queries.
zh-cn	根据提供的各种参数计算平均值。Zabbix服务器通过在数据库直接执行查询来收集聚合信息。

en-us	Calculates the maximum value, based on the various parameters supplied. Zabbix server collects aggregate information by doing direct database queries.
zh-cn	根据提供的各种参数计算最大值。Zabbix服务器通过在数据库直接执行查询来收集聚合信息。

en-us	Calculates the minimum value, based on the various parameters supplied. Zabbix server collects aggregate information by doing direct database queries.
zh-cn	根据提供的各种参数计算最小值。Zabbix服务器通过在数据库直接执行查询来收集聚合信息。

en-us	Calculates the sum of values, based on the various parameters supplied. Zabbix server collects aggregate information by doing direct database queries.
zh-cn	根据提供的各种参数计算总计值。 Zabbix服务器通过在数据库直接执行查询来收集聚合信息。

en-us	Calendar
zh-cn	日历

en-us	Callback
zh-cn	回调

en-us	Cancel
zh-cn	取消

en-us	Cannot add action
zh-cn	无法添加操作

en-us	Cannot add a discovered application "%1$s" to a web scenario.
zh-cn	不能添加一个已发现的应用集 "%1$s" 到 web 场景。

en-us	Cannot add a non-numeric item "%1$s" to graph "%2$s".
zh-cn	不能添加一个非数字监控项 "%1$s" 到图表 "%2$s".

en-us	Cannot add a non-numeric item "%1$s" to graph prototype "%2$s".
zh-cn	不可以添加一个非数值型的监控项目 "%1$s"到数据图模板"%2$s".

en-us	Cannot add application
zh-cn	无法添加应用集

en-us	Cannot add correlation
zh-cn	无法添加关联

en-us	Cannot add correlation condition
zh-cn	无法添加关联条件

en-us	Cannot add dependency from a host to a template.
zh-cn	无法添加自主机到模板的依赖

en-us	Cannot add dependency from trigger "%1$s:%2$s" to non existing trigger "%3$s:%4$s".
zh-cn	无法自触发器"%1$s:%2$s" 添加依赖到不存在的触发器"%3$s:%4$s".

en-us	Cannot add discovery rule
zh-cn	无法添加自动自动发现的规则

en-us	Cannot add graph
zh-cn	无法添加图表

en-us	Cannot add graph prototype
zh-cn	无法添加图形原型

en-us	Cannot add group
zh-cn	无法添加群组

en-us	Cannot add host
zh-cn	无法添加主机

en-us	Cannot add host prototype
zh-cn	无法添加主机原型

en-us	Cannot add image
zh-cn	无法添加图片

en-us	Cannot add item
zh-cn	无法添加监控项

en-us	Cannot add item "%1$s" from "%2$s" to application "%3$s" from "%4$s".
zh-cn	无法添加监控项目"%1$s"从"%2$s"到分类 "%3$s" 从"%4$s".

en-us	Cannot add item prototype
zh-cn	不能添加监控项原型

en-us	Cannot add items.
zh-cn	不能添加监控项.

en-us	Cannot add maintenance
zh-cn	无法添加维护

en-us	Cannot add map element of the map "%1$s" due to circular reference.
zh-cn	由于循环引用所以无法添加拓扑元素到拓扑图 "%1$s"。

en-us	Cannot add media type
zh-cn	无法添加报警媒介类型

en-us	Cannot add module: %1$s.
zh-cn	不能添加模块：%1$s。

en-us	Cannot add more than one item with type "Graph sum" on graph "%1$s".
zh-cn	无法添加超过一个 "图形总计" 类型的监控项于图形 "%1$s"上.

en-us	Cannot add more than one item with type "Graph sum" on graph prototype "%1$s".
zh-cn	不可以在数据图模板"%1$s"上添加超过一个"Graph sum"类型的监控项目.

en-us	Cannot add network map
zh-cn	无法添加网络拓扑图

en-us	Cannot add new application "%1$s".
zh-cn	不能添加新的应用 "%1$s".

en-us	Cannot add proxy
zh-cn	无法添加agent代理程序

en-us	Cannot add regular expression
zh-cn	无法添加正则表达式

en-us	Cannot add screen
zh-cn	无法添加聚合图形

en-us	Cannot add script
zh-cn	无法添加脚本

en-us	Cannot add service
zh-cn	无法添加服务

en-us	Cannot add slide show
zh-cn	无法添加幻灯片演示

en-us	Cannot add submaps. Max depth reached.
zh-cn	无法添加子图，已经是最大的深度了。

en-us	Cannot add template
zh-cn	无法添加模板

en-us	Cannot add trigger
zh-cn	无法添加触发器

en-us	Cannot add trigger prototype
zh-cn	无法添加触发器模板

en-us	Cannot add user
zh-cn	无法添加用户

en-us	Cannot add user group
zh-cn	不能添加用户组

en-us	Cannot add value map
zh-cn	无法添加值映射

en-us	Cannot add web scenario
zh-cn	不能添加web场景

en-us	Cannot add widget: not enough free space on the dashboard.
zh-cn	不能添加小构建：仪表板上没有足够的空余空间

en-us	Cannot add widgets in kiosk mode
zh-cn	在 kiosk 模式下无法添加 widgets

en-us	cannot be changed
zh-cn	不能变更

en-us	cannot be empty
zh-cn	不能为空

en-us	Can not be removed
zh-cn	无法被删除

en-us	Cannot bind anonymously to LDAP server.
zh-cn	无法绑定到匿名 LDAP 服务器。

en-us	Cannot bind to LDAP server.
zh-cn	无法绑定到 LDAP 服务器。

en-us	Cannot clear history
zh-cn	无法清除历史

en-us	Cannot clear history: at least one of the selected items doesn't belong to any monitored host
zh-cn	无法清除历史记录：至少有一项所选项目不属于任何受监控的主机

en-us	Cannot clone graph prototypes.
zh-cn	无法克隆图形原型

en-us	Cannot clone host prototypes.
zh-cn	无法克隆主机原型。

en-us	Cannot clone item prototypes.
zh-cn	无法克隆监控项原型

en-us	Cannot clone trigger prototypes.
zh-cn	无法克隆触发器原型

en-us	Cannot close problem: %1$s.
zh-cn	无法关闭问题: %1$s.

en-us	Cannot connect to LDAP server.
zh-cn	无法连接到 LDAP 服务器。

en-us	Cannot connect to the database.
zh-cn	不能连接到数据库。

en-us	Cannot convert POST data:
zh-cn	无法转换 POST 数据：

en-us	cannot convert to JSON, result value too long
zh-cn	无法转换到 JSON，结果值太长

en-us	Cannot copy graph
zh-cn	无法复制图表

en-us	Cannot copy item
zh-cn	无法复制监控项

en-us	Cannot copy trigger
zh-cn	无法复制触发器

en-us	Cannot copy trigger "%1$s:%2$s", because it has multiple hosts in the expression.
zh-cn	无法复制触发器 "%1$s:%2$s", 因为在其表达式中有多个主机.

en-us	Cannot create a host prototype on a discovered host "%1$s".
zh-cn	在自动发现的主机"%1$s"上不能创建主机模板

en-us	Cannot create another database connection.
zh-cn	无法创建其他的数据库连接.

en-us	Cannot create circular dependencies.
zh-cn	不能创建环形的依赖关系。

en-us	Cannot create dependency on trigger itself.
zh-cn	不能创建触发器本身的依赖.

en-us	Cannot create dependency on trigger prototype itself.
zh-cn	无法创建触发器原形的依赖。

en-us	Cannot create discovery rule
zh-cn	无法创建自动发现规则

en-us	Cannot create icon map
zh-cn	无法创建图标映射

en-us	Cannot create new application, web scenario is already assigned to application.
zh-cn	无法创建新的应用集, web 场景已分配给应用集.

en-us	Cannot create the configuration file.
zh-cn	无法创建配置文件。

en-us	Cannot create widget: %1$s.
zh-cn	不能创建构件: %1$s 。

en-us	Cannot delete action
zh-cn	无法删除动作

en-us	Cannot delete application
zh-cn	无法删除分类

en-us	Cannot delete correlation
zh-cn	无法删除关联

en-us	Cannot delete dashboard
zh-cn	无法删除仪表盘

en-us	Cannot delete dependency
zh-cn	无法删除依赖关系

en-us	Cannot delete discovered application "%1$s".
zh-cn	不能删除已发现的应用集 "%1$s".

en-us	Cannot delete discovery rule
zh-cn	无法删除自动发现规则

en-us	Cannot delete discovery rules
zh-cn	无法删除自动发现规则

en-us	Cannot delete graph
zh-cn	无法删除图形

en-us	Cannot delete graph prototype
zh-cn	无法删除图表原型

en-us	Cannot delete graph prototypes
zh-cn	无法删除数据图模板

en-us	Cannot delete graphs
zh-cn	无法删除图形

en-us	Cannot delete group
zh-cn	无法删除组

en-us	Cannot delete host
zh-cn	无法删除主机

en-us	Cannot delete host because maintenance "%1$s" must contain at least one host or host group.
zh-cn	无法删除主机因为维护 "%1$s" 必须包含至少一个主机或一个主机群组。无法删除所选主机因为维护 "%1$s" 必须包含至少一个主机或一个主机群组。

en-us	Cannot delete host group because maintenance "%1$s" must contain at least one host or host group.
zh-cn	无法删除主机群组因为维护 "%1$s" 必须包含至少一个主机或一个主机群组。无法删除所选主机群组因为维护 "%1$s" 必须包含至少一个主机或一个主机群组。

en-us	Cannot delete host prototypes
zh-cn	无法删除主机原型

en-us	Cannot delete icon map
zh-cn	无法删除图标映射

en-us	Cannot delete image
zh-cn	无法删除图片

en-us	Cannot delete interface for discovered host "%1$s".
zh-cn	无法删除自动发现主机"%1$s"的接口。

en-us	Cannot delete inventory.
zh-cn	无法删除资产纪录.

en-us	Cannot delete item
zh-cn	无法删除监控项

en-us	Cannot delete item prototype
zh-cn	无法删除监控项目模板

en-us	Cannot delete item prototypes
zh-cn	无法删除监控项目模板

en-us	Cannot delete items
zh-cn	无法删除监控项

en-us	Cannot delete maintenance
zh-cn	无法删除维护

en-us	Cannot delete media type
zh-cn	无法删除示警媒介类型

en-us	Cannot delete module: %1$s.
zh-cn	无法删除模块：%1$s。

en-us	Cannot delete network map
zh-cn	无法删除网络拓扑图

en-us	Cannot delete proxy
zh-cn	无法删除agent代理程序

en-us	Cannot delete regular expression
zh-cn	无法删除正则表达式 

en-us	Cannot delete screen
zh-cn	无法删除聚合图形

en-us	Cannot delete script
zh-cn	无法删除脚本

en-us	Cannot delete scripts. Script "%1$s" is used in action operation "%2$s".
zh-cn	无法删除脚本. 脚本 "%1$s" 用于动作操作 "%2$s"。

en-us	Cannot delete selected actions
zh-cn	无法删除所选的动作

en-us	Cannot delete selected correlations
zh-cn	无法删除选择的关联项

en-us	Cannot delete service
zh-cn	无法删除服务

en-us	Cannot delete slide show
zh-cn	无法删除幻灯片演示

en-us	Cannot delete template
zh-cn	无法删除模板

en-us	Cannot delete templated application.
zh-cn	无法删除模板的应用集.

en-us	Cannot delete templated graph.
zh-cn	无法删除模板的图表。

en-us	Cannot delete templated graph prototype.
zh-cn	无法删除模板的图表原型。

en-us	Cannot delete templated host prototype.
zh-cn	无法删除模板的主机原型。

en-us	Cannot delete templated item.
zh-cn	无法删除模板的监控项.

en-us	Cannot delete templated item prototype.
zh-cn	无法删除模板的监控项原型。

en-us	Cannot delete templated items.
zh-cn	无法删除模板监控项.

en-us	Cannot delete templated trigger "%1$s:%2$s".
zh-cn	无法删除模板的触发器 "%1$s:%2$s".

en-us	Cannot delete templated trigger prototype "%1$s:%2$s".
zh-cn	无法删除模板的触发器原型 "%1$s:%2$s"。

en-us	Cannot delete templated web scenario "%1$s".
zh-cn	无法删除模板的 web 场景 "%1$s".

en-us	Cannot delete trigger
zh-cn	无法删除触发器

en-us	Cannot delete trigger prototype
zh-cn	无法删除触发器原型

en-us	Cannot delete trigger prototypes
zh-cn	无法删除触发器原型

en-us	Cannot delete triggers
zh-cn	无法删除触发器

en-us	Cannot delete user
zh-cn	无法删除用户

en-us	Cannot delete user group
zh-cn	无法删除用户组

en-us	Cannot delete value map
zh-cn	无法删除值对应

en-us	Cannot delete web scenario
zh-cn	无法删除 web 场景

en-us	Cannot delete Zabbix internal user "%1$s", try disabling that user.
zh-cn	无法删除Zabbix内部用户 "%1$s", 试试停用这个用户.

en-us	Cannot disable action
zh-cn	无法禁用动作

en-us	Cannot disable correlation
zh-cn	无法停用关联项

en-us	Cannot disable discovery rule
zh-cn	无法禁用自动发现规则

en-us	Cannot disable host
zh-cn	无法禁用主机

en-us	Cannot disable item
zh-cn	无法禁监控项目

en-us	Cannot disable media type
zh-cn	无法禁用消息介质类型

en-us	Cannot disable module: %1$s.
zh-cn	无法禁用模块: %1$s。

en-us	Cannot disable trigger
zh-cn	无法禁用触发器

en-us	Cannot disable web scenario
zh-cn	无法禁用 web 场景

en-us	Cannot display item queue.
zh-cn	无法显示监控项队列.

en-us	Cannot display more than one item with type "Graph sum".
zh-cn	不可以显示超过一个 "Graph sum"类型的监控项目

en-us	Cannot enable action
zh-cn	无法启用动作

en-us	Cannot enable correlation
zh-cn	无法启用关联项

en-us	Cannot enable discovery rule
zh-cn	无法启用自动发现规则

en-us	Cannot enable host
zh-cn	无法启用主机

en-us	Cannot enable item
zh-cn	无法启用监控项目

en-us	Cannot enable media type
zh-cn	无法启用消息介质类型

en-us	Cannot enable module: %1$s.
zh-cn	无法启用模块: %1$s。

en-us	Cannot enable trigger
zh-cn	无法启用触发器

en-us	Cannot enable web scenario
zh-cn	无法启用Web场景

en-us	Cannot evaluate expression
zh-cn	无法计算表达式

en-us	Cannot execute script
zh-cn	无法执行脚本

en-us	Cannot expand macros.
zh-cn	无法扩展宏.

en-us	Cannot find background image "%1$s" used in map "%2$s".
zh-cn	无法找到用在聚合图形 "%2$s" 中的群组 "%1$s".

en-us	Cannot find graph "%1$s" used in screen "%2$s".
zh-cn	无法找到图表 "%1$s" 用于聚合图形 "%2$s".

en-us	Cannot find group "%1$s" used in map "%2$s".
zh-cn	无法找到群组 "%1$s" 用于地图 "%2$s".

en-us	Cannot find group "%1$s" used in screen "%2$s".
zh-cn	无法找到群组 "%1$s" 用于聚合图形 "%2$s".

en-us	Cannot find host "%1$s" used in map "%2$s".
zh-cn	无法找到主机 "%1$s" 用于地图 "%2$s".

en-us	Cannot find host "%1$s" used in screen "%2$s".
zh-cn	无法找到主机 "%1$s" 用于聚合图形 "%2$s".

en-us	Cannot find host group "%1$s" for host prototype "%2$s" of discovery rule "%3$s" on "%4$s".
zh-cn	在 "%4$s"上无法针对自动发现规则 "%3$s"上的"%2$s"主机模板找到主机组 "%1$s"

en-us	Cannot find host interface on "%1$s" for item key "%2$s".
zh-cn	在 "%1$s" 找不到用于监控项 key"%2$s" 的主机接口.

en-us	Cannot find icon "%1$s" used in map "%2$s".
zh-cn	无法找到图标 "%1$s" 用于地图 "%2$s".

en-us	Cannot find icon map "%1$s" used in map "%2$s".
zh-cn	无法找到地图图标 "%1$s" 用于地图 "%2$s".

en-us	Cannot find interface "%1$s" used for discovery rule "%2$s" on "%3$s".
zh-cn	在主机 "%3$s" 上，无法找到可用于发现规则 "%2$s" 的 "%1$s" 接口。

en-us	Cannot find interface "%1$s" used for item "%2$s" on "%3$s".
zh-cn	在主机"%3$s"上，未能找到可用于监控项 "%2$s" 的 "%1$s" 接口。

en-us	Cannot find interface "%1$s" used for item prototype "%2$s" of discovery rule "%3$s" on "%4$s".
zh-cn	在 "%4$s"上无法找到自动发现规则 "%3$s"上的"%2$s"监控项原型所对应的接口 "%1$s"

en-us	Cannot find item "%1$s" on "%2$s" used as the Y axis MAX value for graph "%3$s".
zh-cn	无法为数据图"%3$s"在"%2$s"上找到可以作为最大Y值的监控项目 "%1$s".

en-us	Cannot find item "%1$s" on "%2$s" used as the Y axis MAX value for graph prototype "%3$s" of discovery rule "%4$s" on "%5$s".
zh-cn	无法在"%2$s"上为"%5$s"上的自动发现规则"%4$s"上的数据图模板"%3$s"找到可以作为最大Y值的监控项目"%1$s".

en-us	Cannot find item "%1$s" on "%2$s" used as the Y axis MIN value for graph "%3$s".
zh-cn	无法为数据图 "%3$s"在"%2$s"上可以作为最小值的监控项目"%1$s"

en-us	Cannot find item "%1$s" on "%2$s" used as the Y axis MIN value for graph prototype "%3$s" of discovery rule "%4$s" on "%5$s".
zh-cn	无法在"%2$s"上为"%5$s"上的自动发现规则"%4$s"上的数据图模板"%3$s"找到可以作为最小Y值的监控项目"%1$s"

en-us	Cannot find item "%1$s" on "%2$s" used in graph "%3$s".
zh-cn	无法在"%2$s"上找到被数据图"%3$s"引用的监控项目"%1$s".

en-us	Cannot find item "%1$s" on "%2$s" used in graph prototype "%3$s" of discovery rule "%4$s" on "%5$s".
zh-cn	在 "%5$s"中无法找到被自动发现规则"%4$s"上的数据图模板 "%3$s"在"%2$s"上所引用的监控项目"%1$s".

en-us	Cannot find item "%1$s" used in screen "%2$s".
zh-cn	无法找到监控项 "%1$s" 用于聚合图形 "%2$s".

en-us	Cannot find map "%1$s" used in map "%2$s".
zh-cn	无法找到地图 "%1$s" 用于地图 "%2$s".

en-us	Cannot find map "%1$s" used in screen "%2$s".
zh-cn	无法找到地图 "%1$s" 用于聚合图形 "%2$s".

en-us	Cannot find template "%1$s" for host prototype "%2$s" of discovery rule "%3$s" on "%4$s".
zh-cn	无法在"%4$s"上为自动发现规则 "%3$s"上的主机模板"%2$s"找模板"%1$s"

en-us	Cannot find template "%1$s" for override "%2$s" of discovery rule "%3$s" on "%4$s".
zh-cn	在"%4$s"上找不到用于覆盖"%2$s"上的自动发现规则"%3$s"的模板"%1$s"

en-us	Cannot find trigger "%1$s" used in map "%2$s".
zh-cn	无法找到触发器 "%1$s" 用于地图 "%2$s".

en-us	Cannot find value map "%1$s" used for item "%2$s" on "%3$s".
zh-cn	无法在 "%3$s"上找到由监控项目"%2$s" 所引用的数据映射"%1$s".

en-us	Cannot find value map "%1$s" used for item prototype "%2$s" of discovery rule "%3$s" on "%4$s".
zh-cn	无法在"%4$s"上找到由自动发现规则 "%3$s"上的 "%2$s"监控项目模板所引用的数据映射 "%1$s".

en-us	Cannot format tree.
zh-cn	无法形成树状格式

en-us	Cannot format Tree. Check logic structure in service links.
zh-cn	无法形成树状格式。检查服务链接的逻辑结构。

en-us	Cannot have empty visible template name.
zh-cn	模板的显示名称不得为空.

en-us	Cannot import template "%1$s", linked template "%2$s" does not exist.
zh-cn	无法导入模板 "%1$s",被关联的模板"%2$s"不存在.

en-us	Cannot insert trigger expression
zh-cn	不能插入触发器表达式

en-us	Cannot link template
zh-cn	无法链接模板

en-us	Cannot link template.
zh-cn	无法链接到模板。

en-us	Cannot load module at: %1$s.
zh-cn	在%1$s上无法加载模块。

en-us	Cannot logout.
zh-cn	不能登出

en-us	Cannot mass update host name.
zh-cn	不能大量更新主机名称.

en-us	Cannot mass update template name.
zh-cn	无法批量更新模板名称.

en-us	Cannot mass update visible host name.
zh-cn	不能大量更新可见主机名称

en-us	Cannot mass update visible template name.
zh-cn	无法批量更新模板的显示名称

en-us	Cannot pass duplicate template IDs for the linkage: %1$s.
zh-cn	无法为链接传递重复的模板 ID：%1$s。

en-us	Cannot perform delete statement on table "%1$s" without where condition.
zh-cn	不能完成没有where条件的删除描述式在表 "%1$s" 上.

en-us	cannot perform Scroll API request, data could be truncated
zh-cn	无法执行 Scroll API 请求，数据可能会被截断

en-us	Cannot perform update statement on table "%1$s" without values.
zh-cn	不能完成没有值的更新表达式料表 "%1$s" 上.

en-us	Cannot perform update statement on table "%1$s" without where condition.
zh-cn	不能完成没有条件的更新描述式在表 "%1$s" 上.

en-us	Cannot process applications from different hosts or templates.
zh-cn	无法在不同的主机或模板上执行分类

en-us	Cannot read JSON: %1$s.
zh-cn	无法读取JSON：%1$s 。

en-us	Cannot read the response, check connection with the Zabbix server "%1$s".
zh-cn	不能读取响应, 检查与Zabbix服务器 "%1$s" 的连接.

en-us	Cannot read XML: %1$s.
zh-cn	无法读取XML： %1$s 。

en-us	Cannot rename guest user.
zh-cn	无法重新命名访客用户.

en-us	Cannot save discovery rule without checks.
zh-cn	无法储存未检验的自动发现规则

en-us	Cannot save widget "%1$s".
zh-cn	无法保存小构件 "%1$s" 。

en-us	Cannot send command, check connection with Zabbix server "%1$s".
zh-cn	无法发送命令, 检查于Zabbix 服务器 "%1$s" 的连接.

en-us	Cannot send request
zh-cn	无法发送请求

en-us	Cannot send request: %1$s.
zh-cn	%1$s 请求无法发送。

en-us	Cannot set "%1$s" for action "%2$s".
zh-cn	在动作 "%2$s" 中无法设置 "%1$s" 

en-us	Cannot set "%1$s" for graph "%2$s".
zh-cn	在图形 "%2$s" 中无法设置 "%1$s"

en-us	Cannot set "%1$s" for graph prototype "%2$s".
zh-cn	在模板 "%2$s" 中无法设置 "%1$s"

en-us	Cannot set "%1$s" for item "%2$s".
zh-cn	无法设置 "%1$s" 为监控项 "%2$s".

en-us	Cannot set "%1$s" for template screen "%2$s".
zh-cn	不能设置"%1$s"在模板聚合图形"%2$s"中。

en-us	Cannot set inventory fields for disabled inventory.
zh-cn	无法设置审计字段为已经禁止的审计.

en-us	Cannot set resource ID for screen element.
zh-cn	无法设置聚合图形元素的资源ID.

en-us	Cannot set "templateid" field for application prototype in item prototype "%1$s".
zh-cn	不能设置 "templateid" 设置到项目原形 "%1$s" 。

en-us	Cannot set "templateid" for screen "%1$s".
zh-cn	无法设置 "模板序列号" 为聚合图形 "%1$s".

en-us	Cannot support notification audio for this device.
zh-cn	此设备不支持声音通知。

en-us	Cannot switch host for interface.
zh-cn	无法切换接口主机.

en-us	Cannot test disabled media type.
zh-cn	无法测试禁用的消息媒介类型。

en-us	Cannot unblock user
zh-cn	无法解锁用户

en-us	Cannot unlink and clear applications.
zh-cn	无法断开和清除应用程序.

en-us	Cannot unlink and clear Web scenarios.
zh-cn	无法断开和清除 Web 场景.

en-us	Cannot unlink template
zh-cn	无法断开与模板的连接

en-us	Cannot unlink template.
zh-cn	无法断开与模板的连接。

en-us	Cannot unlink trigger "%1$s", it has items from template that is left linked to host.
zh-cn	无法取消链接触发器“%1$s”，它有来自模板的监控项仍链接到主机。

en-us	Cannot update "%1$s" for action "%2$s".
zh-cn	不能对动作"%2$s"更新"%1$s".

en-us	Cannot update "%1$s" for graph "%2$s".
zh-cn	图形 "%2$s" 无法更新 "%1$s"

en-us	Cannot update "%1$s" for graph prototype "%2$s".
zh-cn	图形模板 "%2$s" 无法更新 "%1$s" 

en-us	Cannot update "%1$s" for item "%2$s".
zh-cn	无法更新 "%1$s" 为监控项 "%2$s".

en-us	Cannot update "%1$s" for templated trigger "%2$s".
zh-cn	触发器模板 "%2$s" 无法更新 "%1$s"

en-us	Cannot update "%1$s" for templated trigger prototype "%2$s".
zh-cn	触发器原型 "%2$s" 无法更新到模板 "%1$s"。

en-us	Cannot update "%2$s" for a discovered host "%1$s".
zh-cn	无法更新 "%2$s"在发现的主机"%1$s"。

en-us	Cannot update "%2$s" for a discovered item "%1$s".
zh-cn	无法更新 "%2$s"在发现的监控项 "%1$s"。

en-us	Cannot update "%2$s" for a discovered trigger "%1$s".
zh-cn	无法更新 "%2$s" 在发现的触发器"%1$s"。

en-us	Cannot update action
zh-cn	无法更新动作

en-us	Cannot update a discovered graph.
zh-cn	无法更新一个被自动发现的数据图

en-us	Cannot update a discovered host group.
zh-cn	无法更新一个被自动发现的主机组.

en-us	Cannot update application
zh-cn	无法更新应用集

en-us	Cannot update a templated graph "%1$s".
zh-cn	无法更新模板中图表 "%1$s"。

en-us	Cannot update a templated web scenario "%1$s": %2$s.
zh-cn	无法更新模板web场景 "%1$s": %2$s 。

en-us	Cannot update authentication
zh-cn	无法更新验证信息

en-us	Cannot update configuration
zh-cn	无法更新配置

en-us	Cannot update correlation
zh-cn	无法更新关联

en-us	Cannot update discovered application "%1$s".
zh-cn	无法更新发现的应用"%1$s"。

en-us	Cannot update discovery rule
zh-cn	无法更新自动发现规则

en-us	Cannot update event
zh-cn	无法更新事件

en-us	Cannot update graph
zh-cn	无法更新图形

en-us	Cannot update graph prototype
zh-cn	无法更新数据图模板

en-us	Cannot update group
zh-cn	无法更新群组

en-us	Cannot update groups for discovered host "%1$s".
zh-cn	对于被自动发现的主机"%1$s"无法更新其主机组

en-us	Cannot update host
zh-cn	无法更新主机

en-us	Cannot update host encryption settings. Connection settings for both directions should be specified.
zh-cn	无法更新主机的加密设置，配置两端的设置规则不正确。

en-us	Cannot update host prototype
zh-cn	无法更新主机模板

en-us	Cannot update hosts
zh-cn	无法更新主机

en-us	Cannot update icon map
zh-cn	无法更新图标映射

en-us	Cannot update image
zh-cn	无法更新图片

en-us	Cannot update "imagetype" for image "%1$s".
zh-cn	无法对图片"%1$s"更新"图片类型".

en-us	Cannot update interface for discovered host "%1$s".
zh-cn	对于自动发现的主机"%1$s"无法更新其接口.

en-us	Cannot update item
zh-cn	无法更新监控项

en-us	Cannot update item prototype
zh-cn	无法更新监控项目模板

en-us	Cannot update item prototypes
zh-cn	无法更新监控项原型

en-us	Cannot update items
zh-cn	无法更新监控项

en-us	Cannot update macros
zh-cn	无法更新宏

en-us	Cannot update maintenance
zh-cn	无法更新维护

en-us	Cannot update media type
zh-cn	无法更新媒介型态

en-us	Cannot update module: %1$s.
zh-cn	无法更新模块: %1$s。

en-us	Cannot update network map
zh-cn	无法更新网络拓扑图

en-us	cannot update property for templated discovery rule
zh-cn	无法更新模板中的自动发现规则属性

en-us	Cannot update proxy
zh-cn	无法更新agent代理程序

en-us	Cannot update proxy for discovered host "%1$s".
zh-cn	对于被自动发现的主机 "%1$s"无法更新其代理节点

en-us	Cannot update regular expression
zh-cn	无法更新正则表达式

en-us	Cannot update screen
zh-cn	无法更新聚合图形

en-us	Cannot update script
zh-cn	无法更新脚本

en-us	Cannot update service
zh-cn	无法更新服务

en-us	Cannot update slide show
zh-cn	无法更新幻灯片演示

en-us	Cannot update step for a templated web scenario "%1$s": %2$s.
zh-cn	无法更新模板化Web场景的步骤 "%1$s": %2$s。

en-us	Cannot update template
zh-cn	无法更新模板

en-us	Cannot update templated applications.
zh-cn	无法更新被模板化的应用程序.

en-us	Cannot update "templateid" for screen "%1$s".
zh-cn	无法更新 "模板序列号" 为聚合图形 "%1$s"。

en-us	Cannot update "templateid" for template screen "%1$s".
zh-cn	无法对聚合图形模板"%1$s"更新"模板ID"。

en-us	Cannot update templates
zh-cn	无法更新模板

en-us	Cannot update templates on discovered host "%1$s".
zh-cn	对于被自动发现的主机 "%1$s"无法更新其模板

en-us	Cannot update trigger
zh-cn	无法更新触发器

en-us	Cannot update trigger "%1$s": %2$s.
zh-cn	无法更新触发器 "%1$s": %2$s 

en-us	Cannot update trigger prototype
zh-cn	无法更新触发器模板

en-us	Cannot update trigger prototype "%1$s": %2$s.
zh-cn	无法更新触发器模板 "%1$s": %2$s。

en-us	Cannot update trigger prototypes
zh-cn	无法更新触发器模板

en-us	Cannot update user
zh-cn	无法更新用户

en-us	Cannot update user group
zh-cn	无法更新用户组

en-us	Cannot update value map
zh-cn	无法更新值映射

en-us	Cannot update web scenario
zh-cn	无法更新 web 场景

en-us	Case sensitive
zh-cn	区分大小写

en-us	Case sensitive login
zh-cn	登录区分大小写

en-us	Catalan (ca_ES)
zh-cn	加泰罗尼亚（ca_ES）

en-us	Catches all SNMP traps that match regex. If regexp is unspecified, catches any trap.
zh-cn	采集所有符合规则的 SNMP 信息，如果没有规则则会采集所有信息。

en-us	Catches all SNMP traps that were not caught by any of snmptrap[] items.
zh-cn	采集所有SNMP traps规则以外的snmptrap[]

en-us	Centre
zh-cn	居中

en-us	CERT
zh-cn	CERT

en-us	Certificate
zh-cn	证书

en-us	Change
zh-cn	更改

en-us	Change
zh-cn	更改

en-us	change() - Difference between last and previous value
zh-cn	change() - 最新值和前一个值的差异

en-us	Change password
zh-cn	修改密码

en-us	Change per second
zh-cn	每秒更改

en-us	Change PSK
zh-cn	修改 PSK

en-us	Change severity
zh-cn	更改严重性

en-us	Change type
zh-cn	修改类型

en-us	Character
zh-cn	字符

en-us	Character string included
zh-cn	字符串已包含

en-us	Character string not included
zh-cn	字符串未包含

en-us	Chassis
zh-cn	机壳

en-us	Chassis information. Returns string
zh-cn	机架信息。返回字符串

en-us	Check already exists.
zh-cn	检查已存在.

en-us	Check expression part starting from "%1$s".
zh-cn	检查开始于"%1$s"的表达式部份.

en-us	check expression starting from "%1$s"
zh-cn	检查表达式从"%1$s"开始

en-us	Check for error in JSON
zh-cn	JSON数据错误检查

en-us	Check for error in XML
zh-cn	XML数据错误检查

en-us	Check for error using regular expression
zh-cn	使用正则表达式检查错误

en-us	Check of pre-requisites
zh-cn	必要条件检测

en-us	Checks
zh-cn	检查 

en-us	Checks if DNS service is up. Returns 0 - DNS is down (server did not respond or DNS resolution failed); 1 - DNS is up
zh-cn	检查 DNS 服务是否开启。返回 0 - DNS 服务关闭（服务未响应或DNS解析失败）；1 - DNS 服务开启

en-us	Checks if file exists. Returns 0 - not found; 1 - file of the specified type exists
zh-cn	检查文件是否存在。返回 0 - 文件不存在；1 - 存在指定类型的文件

en-us	Checks if host is accessible by ICMP ping. 0 - ICMP ping fails. 1 - ICMP ping successful.
zh-cn	通过ICMP ping检查主机是否可以访问。0 - ICMP ping失败。1 - ICMP ping成功。

en-us	Checks if it is possible to make TCP connection to specified port. Returns 0 - cannot connect; 1 - can connect
zh-cn	检查是否能建立 TCP 连接到指定端口。返回 0 - 不能连接；1 - 可以连接

en-us	Checks if service is running and accepting TCP connections. Returns 0 - service is down; 1 - service is running
zh-cn	检查服务是否运行并接受 TCP 连接。返回 0 - 服务关闭；1 - 服务运行

en-us	Checks if service is running and responding to UDP requests. Returns 0 - service is down; 1 - service is running
zh-cn	检查服务是否运行并响应 UDP 请求。返回 0 - 服务关闭；1 - 服务运行

en-us	Checks if this TCP port is in LISTEN state. Returns 0 - it is not in LISTEN state; 1 - it is in LISTEN state
zh-cn	检查 TCP 端口 是否处于侦听状态。返回 0 - 未侦听；1 - 正在侦听

en-us	Checks if this UDP port is in LISTEN state. Returns 0 - it is not in LISTEN state; 1 - it is in LISTEN state
zh-cn	检查 UDP 端口 是否处于侦听状态。返回 0 - 未侦听；1 - 正在侦听

en-us	Checks performance of TCP service. Returns 0 - service is down; seconds - the number of seconds spent while connecting to the service
zh-cn	检查 TCP 服务的性能，当服务 down 时返回 0，否则返回连接服务花费的秒数

en-us	Checks performance of UDP service. Returns 0 - service is down; seconds - the number of seconds spent waiting for response from the service
zh-cn	检查 UDP 服务的性能，当服务 down 时返回 0，否则返回连接到服务花费的秒数

en-us	Checks should be unique.
zh-cn	检查必需是唯一的

en-us	Check the key, please. Default example was passed.
zh-cn	请检查键值。使用了默认的示例。

en-us	Check type
zh-cn	检查类型

en-us	Chinese (zh_CN)
zh-cn	中文 (zh_CN)

en-us	Chinese (zh_TW)
zh-cn	中文 (zh_TW)

en-us	circular dependency is not allowed
zh-cn	不允许循环依赖

en-us	circular item dependency is not allowed
zh-cn	不允许循环项依赖

en-us	Circular reference in templates: %1$s.
zh-cn	模板 %1$s 存在环形引用。

en-us	Circular template linkage is not allowed.
zh-cn	不允许环形模板链接.

en-us	Class %1$s not found for action %2$s.
zh-cn	找不到动作 %2$s 的类 %1$s。

en-us	Clear history
zh-cn	清除历史

en-us	Clear history and trends
zh-cn	清除历史和趋势

en-us	Clear when unlinking
zh-cn	清除当无链接时

en-us	Click and drag to desired size.
zh-cn	点击并拖动到所需的大小。

en-us	Click to view or edit
zh-cn	点击查看或编辑

en-us	Clock
zh-cn	时钟

en-us	Clone
zh-cn	克隆

en-us	Close
zh-cn	关闭

en-us	Close expression constructor
zh-cn	关闭表达式构造器

en-us	Close new event
zh-cn	关闭新的事件

en-us	Close old events
zh-cn	关闭过去的事件

en-us	Close problem
zh-cn	关闭问题

en-us	CLOSING
zh-cn	关闭中

en-us	Collapse
zh-cn	宕机

en-us	Collapse sidebar
zh-cn	隐藏侧边栏

en-us	colour
zh-cn	颜色

en-us	Colour
zh-cn	颜色

en-us	Colour "%1$s" is not correct: expecting hexadecimal colour code (6 symbols).
zh-cn	颜色 "%1$s" 是错误的: 期望十六进制的颜色代码(6 个符号).

en-us	Colour (OK)
zh-cn	颜色 (OK)

en-us	Column added
zh-cn	列已添加

en-us	Column deleted
zh-cn	列已删除

en-us	Columns
zh-cn	列数

en-us	Column span
zh-cn	列跨度

en-us	Combined result
zh-cn	合并的结果

en-us	Command
zh-cn	命令

en-us	Commands
zh-cn	命令

en-us	comma-separated list
zh-cn	以逗号分隔的列表

en-us	Community
zh-cn	团队

en-us	Compact view
zh-cn	紧凑视图

en-us	Comparing several triggers with "and" is not allowed.
zh-cn	不能比较触发器之间的和。

en-us	Component %1$s already registered.
zh-cn	组件 %1$s 已注册。

en-us	Component %1$s is not registered.
zh-cn	组件 %1$s 未注册。

en-us	Compression
zh-cn	压缩

en-us	Compression is not available due to incompatible DB version
zh-cn	由于数据库版本不兼容，压缩不可用

en-us	Compress records older than
zh-cn	压缩早于

en-us	Concurrent sessions
zh-cn	并发会话

en-us	Condition
zh-cn	条件

en-us	Condition "%2$s" is not used in formula "%3$s" for action "%1$s".
zh-cn	对于动作"%1$s"条件"%2$s"不可以应用于计算式"%3$s"中

en-us	Condition "%2$s" is not used in formula "%3$s" for correlation "%1$s".
zh-cn	在关联"%1$s"中，条件"%2$s"无法使用公式 "%3$s" 

en-us	Condition "%2$s" is not used in formula "%3$s" for discovery rule "%1$s".
zh-cn	对于自动发现规则"%1$s"条件"%2$s"不可以应用于计算式"%3$s"中

en-us	Condition "%2$s" is not used in formula "%3$s" for override "%1$s".
zh-cn	条件“%2$s”未在公式“%3$s”中用于覆盖“%1$s”。

en-us	Condition "%2$s" used in formula "%3$s" for action "%1$s" is not defined.
zh-cn	对于动作"%1$s"应用于计算式 "%3$s"中的"%2$s"条件未被定义

en-us	Condition "%2$s" used in formula "%3$s" for correlation "%1$s" is not defined.
zh-cn	在关联项 "%1$s" 中 条件 "%2$s" 在表达式 "%3$s"没有被使用

en-us	Condition "%2$s" used in formula "%3$s" for discovery rule "%1$s" is not defined.
zh-cn	对于自动发现规则"%1$s"应用于计算表达式 "%3$s"中的条件 "%2$s"未被定义

en-us	Condition "%2$s" used in formula "%3$s" for override "%1$s" is not defined.
zh-cn	用于覆盖“%1$s”的公式“%3$s”中的条件“%2$s”未定义。

en-us	Conditions
zh-cn	条件

en-us	Conditions duplicates for correlation "%1$s".
zh-cn	条件复制关联项 "%1$s"。

en-us	Configuration
zh-cn	配置

en-us	Configuration cache statistics. Cache - buffer (modes: pfree, total, used, free).
zh-cn	配置缓存统计.缓存—缓冲(模式：空闲的百分数，总计，已使用，未使用

en-us	Configuration file "%1$s" created.
zh-cn	配置文件 "%1$s" 已创建。

en-us	Configuration import
zh-cn	配置导入

en-us	Configuration of actions
zh-cn	动作的配置

en-us	Configuration of applications
zh-cn	应用集的配置

en-us	Configuration of authentication
zh-cn	配置身份验证

en-us	Configuration of discovery rules
zh-cn	配置发现规则

en-us	Configuration of graph prototypes
zh-cn	配置图形原型

en-us	Configuration of graphs
zh-cn	配置图标

en-us	Configuration of GUI
zh-cn	图形接口的配置

en-us	Configuration of host groups
zh-cn	配置主机群组

en-us	Configuration of host prototypes
zh-cn	配置主机原型

en-us	Configuration of hosts
zh-cn	配置主机

en-us	Configuration of housekeeping
zh-cn	管家设置

en-us	Configuration of icon mapping
zh-cn	配置图标映射

en-us	Configuration of images
zh-cn	配置图像

en-us	Configuration of item prototypes
zh-cn	配置监控项原型

en-us	Configuration of items
zh-cn	配置监控项

en-us	Configuration of macros
zh-cn	配置宏

en-us	Configuration of maintenance periods
zh-cn	配置维护时段

en-us	Configuration of media types
zh-cn	配置媒体类型

en-us	Configuration of network maps
zh-cn	配置网络地图

en-us	Configuration of proxies
zh-cn	配置代理

en-us	Configuration of regular expressions
zh-cn	配置正则表达式

en-us	Configuration of screens
zh-cn	配置聚合图形

en-us	Configuration of scripts
zh-cn	配置脚本

en-us	Configuration of services
zh-cn	配置服务

en-us	Configuration of slide shows
zh-cn	配置幻灯片显示

en-us	Configuration of templates
zh-cn	配置模板

en-us	Configuration of trigger displaying options
zh-cn	配置触发器显示选项

en-us	Configuration of trigger prototypes
zh-cn	配置触发器原型

en-us	Configuration of triggers
zh-cn	配置触发器

en-us	Configuration of trigger severities
zh-cn	配置触发器严重级别

en-us	Configuration of user groups
zh-cn	配置用户组

en-us	Configuration of users
zh-cn	配置用户

en-us	Configuration of value mapping
zh-cn	配置值映射

en-us	Configuration of web monitoring
zh-cn	配置 web 监控

en-us	Configuration of working time
zh-cn	配置工作时间

en-us	Configuration of Zabbix
zh-cn	Zabbix的配置

en-us	Configuration updated
zh-cn	配置已更新

en-us	configure
zh-cn	配置

en-us	Configure DB connection
zh-cn	配置DB连接

en-us	Confirmation text
zh-cn	确认文字

en-us	Congratulations! You have successfully installed Zabbix frontend.
zh-cn	恩！不错zabbix前端已经配置好了！千山万水第一步！加油，少年！

en-us	Connected
zh-cn	已连接

en-us	Connections
zh-cn	链接

en-us	Connection security
zh-cn	安全链接

en-us	Connections from host
zh-cn	从主机连接

en-us	Connections from proxy
zh-cn	从代理连接

en-us	Connections to host
zh-cn	连接主机

en-us	Connections to proxy
zh-cn	连接代理

en-us	Connection timeout of %1$s seconds exceeded when connecting to Zabbix server "%2$s".
zh-cn	连接超时 %1$s 秒超出当连接Zabbix 服务器 "%2$s".

en-us	Connection to Zabbix server "%1$s" failed. Possible reasons: 1. Incorrect server IP/DNS in the "zabbix.conf.php"; 2. Incorrect DNS server configuration. 
zh-cn	连接到Zabbix服务器 "%1$s" 失败. 可能的原因是: 1."zabbix.conf.php"中的服务器IP/DNS配置不正确； 2.DNS服务器配置不正确。 

en-us	Connection to Zabbix server "%1$s" refused. Possible reasons: 1. Incorrect server IP/DNS in the "zabbix.conf.php"; 2. Security environment (for example, SELinux) is blocking the connection; 3. Zabbix server daemon not running; 4. Firewall is blocking TCP connection. 
zh-cn	连接 Zabbix 服务器“%1$s”被拒绝。可能的原因： 1. “zabbix.conf.php”中的服务器IP/DNS不正确； 2. 安全环境（例如SELinux）阻塞连接； 3. Zabbix server 守护进程没有运行； 4. 防火墙阻止了TCP 连接。 

en-us	Connection to Zabbix server "%1$s" timed out. Possible reasons: 1. Incorrect server IP/DNS in the "zabbix.conf.php"; 2. Firewall is blocking TCP connection. 
zh-cn	连接Zabbix服务器 "%1$s" 超时. 可能的原因是: 1."zabbix.conf.php" 中的服务器IP/DNS配置不正确； 2.防火墙阻止了TCP连接。 

en-us	Connection will not be encrypted because it uses a socket file (on Unix) or shared memory (Windows).
zh-cn	连接不会被加密，因为它使用套接字文件（在 Unix 上）或共享内存（Windows）。

en-us	Connect to
zh-cn	连接到

en-us	Constructor
zh-cn	构造函数

en-us	Contact
zh-cn	联系

en-us	contains
zh-cn	包含

en-us	Contains
zh-cn	包含

en-us	Content controls
zh-cn	内容控制

en-us	Content controls: header
zh-cn	内容控件：标题

en-us	Content menu
zh-cn	内容菜单

en-us	Context name
zh-cn	上下文名称

en-us	Continue overrides
zh-cn	继续覆盖

en-us	Contract number
zh-cn	合同号码

en-us	Convert to JSON
zh-cn	转换到 JSON

en-us	Coordinates
zh-cn	座标

en-us	Copy
zh-cn	复制

en-us	Correlation
zh-cn	相关性

en-us	Correlation "%1$s" already exists.
zh-cn	关联项 "%1$s" 已经存在

en-us	Correlation added
zh-cn	关联项添加

en-us	Correlation deleted
zh-cn	删除关联项

en-us	Correlation disabled
zh-cn	禁用关联项

en-us	Correlation enabled
zh-cn	启用关联项

en-us	Correlation is missing parameters: %1$s
zh-cn	%1$s找不到关联项参数

en-us	Correlation name cannot be empty.
zh-cn	关联项名字不能为空。

en-us	Correlation rule
zh-cn	关联规则

en-us	Correlation updated
zh-cn	关联项已更新

en-us	Could not save image!
zh-cn	不能储存图片!

en-us	count
zh-cn	计数

en-us	Count
zh-cn	计数

en-us	count() - Number of successfully retrieved values V (which fulfill operator O) for period T
zh-cn	count() - 对于周期 T，成功检索的值 V（其满足运算符 O）的数量

en-us	Count of context switches. Returns integer
zh-cn	上下文的数量进行切换。它返回一个整数值。

en-us	Count of directory entries, recursively. Returns integer
zh-cn	目录递归的条目数量。返回整数

en-us	Count of matched lines in log file monitoring. Returns integer
zh-cn	监控日志文件行数统计。返回 整数

en-us	Count of matched lines in log file monitoring with log rotation support. Returns integer
zh-cn	日志文件监视中匹配行的计数与日志轮换支持。 返回整型

en-us	Count of values enqueued in the low-level discovery processing queue.
zh-cn	在LLD处理队列中排队的值的计数。

en-us	Count of values enqueued in the preprocessing queue.
zh-cn	在预处理队列中排队的值的计数。

en-us	CPU information. Returns string or integer
zh-cn	CPU 信息。返回字符串或整数

en-us	CPU load. Returns float
zh-cn	CPU 负载。返回浮点数

en-us	CPU utilisation percentage. Returns float
zh-cn	CPU 使用率。返回浮点数

en-us	Create action
zh-cn	创建动作

en-us	Create application
zh-cn	创建应用集

en-us	Create application (select host first)
zh-cn	创建应用程序 (先选择主机)

en-us	Create background
zh-cn	创建背景

en-us	Create correlation
zh-cn	创建关联项

en-us	Create dashboard
zh-cn	创建仪表盘

en-us	Create dependent discovery rule
zh-cn	创建依赖项发现规则

en-us	Create dependent item
zh-cn	创建仪表盘依赖项

en-us	Create disabled
zh-cn	禁止创建

en-us	Create discovery rule
zh-cn	创建发现规则

en-us	Create discovery rule (select host first)
zh-cn	创建发现规则(先选择主机)

en-us	Create enabled
zh-cn	启用新的

en-us	Create graph
zh-cn	创建图形

en-us	Create graph prototype
zh-cn	创建图形原型

en-us	Create graph (select host first)
zh-cn	创建图形(先选择主机)

en-us	Create host
zh-cn	创建主机

en-us	Create host group
zh-cn	创建主机群组

en-us	Create host prototype
zh-cn	创建主机模板

en-us	Create hosts from selected prototypes as disabled?
zh-cn	您是否要从所选原型中禁用主机并创建它？

en-us	Create hosts from selected prototypes as enabled?
zh-cn	您是否要在启用所选原型的情况下创建主机？

en-us	Create icon
zh-cn	创建图标

en-us	Create icon map
zh-cn	创建图标映射

en-us	Create item
zh-cn	创建监控项

en-us	Create item prototype
zh-cn	创建监控项原型

en-us	Create item (select host first)
zh-cn	创建监控项(先选择主机)

en-us	Create items from selected prototypes as disabled?
zh-cn	您想通过使所选原型中的禁用监控项来创建项目吗？

en-us	Create items from selected prototypes as enabled?
zh-cn	您想通过使所选原型中的启用项目来创建项目吗？

en-us	Create maintenance period
zh-cn	创建维护期间

en-us	Create map
zh-cn	创建拓扑图

en-us	Create media type
zh-cn	创建媒体类型

en-us	Create new
zh-cn	创建新的

en-us	Create proxy
zh-cn	创建代理

en-us	Create screen
zh-cn	创建聚合图形

en-us	Create script
zh-cn	创建脚本

en-us	Create slide show
zh-cn	创建幻灯片播放

en-us	Create template
zh-cn	创建模板

en-us	Create trigger
zh-cn	创建触发器

en-us	Create trigger prototype
zh-cn	创建触发器原型

en-us	Create trigger (select host first)
zh-cn	创建触发器(先选择主机)

en-us	Create triggers from selected prototypes as disabled?
zh-cn	您是否要禁用所选原型的触发器并创建它？

en-us	Create triggers from selected prototypes as enabled?
zh-cn	您是否要启用所选原型的触发器并创建它？

en-us	Create user
zh-cn	创建用户

en-us	Create user group
zh-cn	创建用户群组

en-us	Create value map
zh-cn	创建值映射

en-us	Create web scenario
zh-cn	创建 Web 场景

en-us	Create web scenario (select host first)
zh-cn	创建 Web 场景（首先选择主机）

en-us	Critical
zh-cn	严重

en-us	CRLF
zh-cn	CRLF

en-us	CSV to JSON
zh-cn	转换 CSV 为 JSON

en-us	Current host
zh-cn	当前主机

en-us	Current value
zh-cn	当前值

en-us	Custom
zh-cn	习惯

en-us	Custom expression
zh-cn	自定义表达式

en-us	Custom graphs
zh-cn	自定义图表

en-us	Custom intervals
zh-cn	自定义时间间隔

en-us	Custom label
zh-cn	自定义标签

en-us	Custom label for map "%2$s" elements of type "%1$s" may not be empty.
zh-cn	自定义标签地图 "%2$s" 类型元素 "%1$s" 不能为空.

en-us	Custom message
zh-cn	自定义消息内容

en-us	Custom multiplier
zh-cn	自定义倍数

en-us	Custom on fail
zh-cn	自定义失败

en-us	Custom screens
zh-cn	自定义聚合图形

en-us	Custom script
zh-cn	自定义脚本

en-us	Custom scripts
zh-cn	自定义脚本

en-us	Custom severity names affect all locales and require manual translation!
zh-cn	自定义的严重性的名称影响所有的语系而必须手动翻译!

en-us	Custom size
zh-cn	自定义大小

en-us	Custom slides
zh-cn	自定义幻灯片

en-us	Czech (cs_CZ)
zh-cn	捷克(cs_CZ)

en-us	d
zh-cn	d

en-us	Daily
zh-cn	每日

en-us	Dark
zh-cn	暗色

en-us	Dashboard
zh-cn	仪表板

en-us	Dashboard "%1$s" already exists.
zh-cn	仪表盘 "%1$s" 已经存在。

en-us	Dashboard "%1$s" cell X - %2$s Y - %3$s is already taken.
zh-cn	仪表板 "%1$s" 单元格X - %2$s Y - %3$s 已被占用。

en-us	Dashboard "%1$s" widget in cell X - %2$s Y - %3$s is out of bounds.
zh-cn	单元格X - %2$s Y - %3$s 控制台 "%1$s" 的小部件超出范围。

en-us	Dashboard created
zh-cn	仪表盘创建成功。

en-us	Dashboard deleted
zh-cn	仪表板已删除

en-us	Dashboard properties
zh-cn	仪表板属性

en-us	Dashboards
zh-cn	仪表盘

en-us	Dashboard sharing
zh-cn	共享仪表盘

en-us	Dashboard updated
zh-cn	更新仪表盘

en-us	Dashed line
zh-cn	虚线

en-us	Database history tables upgraded
zh-cn	数据库中历史数据表已升级

en-us	Database host
zh-cn	数据库主机

en-us	Database host verification
zh-cn	数据库主机验证

en-us	Database monitor
zh-cn	数据库监控

en-us	Database name
zh-cn	数据库名称

en-us	Database password
zh-cn	数据库密码

en-us	Database port
zh-cn	数据库端口

en-us	Database schema
zh-cn	数据库概要

en-us	Database server
zh-cn	数据库服务器

en-us	Database TLS CA file
zh-cn	数据库 TLS CA 文件

en-us	Database TLS certificate file
zh-cn	数据库 TLS 证书文件

en-us	Database TLS certificate files must be read-only
zh-cn	数据库 TLS 证书文件权限必须为只读

en-us	Database TLS cipher list
zh-cn	数据库 TLS 密码列表

en-us	Database TLS encryption
zh-cn	数据库 TLS 加密

en-us	Database TLS key file
zh-cn	数据库 TLS 密钥文件

en-us	Database type
zh-cn	数据库类型

en-us	Database user
zh-cn	数据库用户

en-us	Data from %1$s. Generated in %2$s sec.
zh-cn	数据来自 %1$s. 产生于 %2$s 秒.

en-us	Data is not properly encoded.
zh-cn	数据不正确的编码。

en-us	Data overview
zh-cn	数据概览

en-us	Data set
zh-cn	数据设置

en-us	Data storage period
zh-cn	数据存储期

en-us	Date
zh-cn	日期

en-us	date() - Current date
zh-cn	date() - 当前日期

en-us	Date HW decommissioned
zh-cn	硬件退役日期

en-us	Date HW installed
zh-cn	硬件安装日期

en-us	Date HW maintenance expires
zh-cn	硬件维修过期日期

en-us	Date HW purchased
zh-cn	硬件购买日期

en-us	Day
zh-cn	日

en-us	Day before yesterday
zh-cn	前天

en-us	Day of month
zh-cn	月中第几日

en-us	dayofmonth() - Day of month
zh-cn	dayofmonth() - 当前是本月的第几天

en-us	Day of week
zh-cn	星期几

en-us	dayofweek() - Day of week
zh-cn	dayofweek() - 当前是本周的第几天

en-us	days
zh-cn	日

en-us	Days
zh-cn	天数

en-us	%d device
zh-cn	%d个设备

en-us	DD.MM.YY
zh-cn	DD.MM.YY

en-us	Debug
zh-cn	调试

en-us	Debug mode
zh-cn	调试模式

en-us	Dec
zh-cn	十二

en-us	December
zh-cn	十二

en-us	default
zh-cn	默认的

en-us	Default
zh-cn	默认

en-us	Default authentication
zh-cn	默认认证方式

en-us	Default delay
zh-cn	默认延迟

en-us	Default host inventory mode
zh-cn	默认主机资产记录模式

en-us	Default login form
zh-cn	默认登录表格

en-us	Default media type
zh-cn	默认媒介类型

en-us	Default operation step duration
zh-cn	默认操作步骤持续时间

en-us	Default theme
zh-cn	默认主题

en-us	Default theme "%1$s".
zh-cn	默认主题 "%1$s".

en-us	Delay
zh-cn	延迟

en-us	Delayed by
zh-cn	被延迟由于

en-us	Delete
zh-cn	删除

en-us	Delete all elements that are not present in the XML file?
zh-cn	删除XML文件中不存在的元素吗？

en-us	Delete and clear
zh-cn	删除并清除

en-us	Delete and clear selected templates? (Warning: all linked hosts will be cleared!)
zh-cn	删除并清除所选的模板? (警告: 所有链接的主机将被清除!)

en-us	Delete and clear template? (Warning: all linked hosts will be cleared!)
zh-cn	删除并清除模板? (警告: 所有链接的主机将被清除!)

en-us	Delete application?
zh-cn	删除应用集?

en-us	Delete current action?
zh-cn	删除目前的动作?

en-us	Delete current correlation?
zh-cn	删除当前的关联项？

en-us	Delete dashboard?
zh-cn	你确定要删除仪表盘？

en-us	Deleted: Host "%1$s".
zh-cn	已删除: 主机 "%1$s".

en-us	Deleted: Host prototype "%1$s" on "%2$s".
zh-cn	已删除：主机原型 "%1$s" 于 "%2$s"。

en-us	Delete discovery rule?
zh-cn	删除发现规则?

en-us	Deleted: Template "%1$s".
zh-cn	已删除: 模板 "%1$s".

en-us	Delete expression?
zh-cn	删除表达式?

en-us	Delete graph?
zh-cn	删除图形?

en-us	Delete graph prototype?
zh-cn	删除数据图模板？

en-us	Delete history of selected items?
zh-cn	删除所选监控项的历史数据?

en-us	Delete history of selected web scenarios?
zh-cn	删除所选的 web 场景历史？

en-us	Delete icon map?
zh-cn	删除图标映射?

en-us	Delete item?
zh-cn	删除监控项?

en-us	Delete item prototype?
zh-cn	删除监控项目模板?

en-us	Delete links between selected elements?
zh-cn	删除所选组件间的连接?

en-us	Delete maintenance period?
zh-cn	删除维修期间?

en-us	Delete media type?
zh-cn	删除媒体值？

en-us	Delete missing
zh-cn	删除失败

en-us	Delete proxy?
zh-cn	删除代理?

en-us	Delete regular expression?
zh-cn	删除正则表达式?

en-us	Delete screen?
zh-cn	删除聚合图形?

en-us	Delete script?
zh-cn	删除脚本?

en-us	Delete selected actions?
zh-cn	删除所选的动作?

en-us	Delete selected applications?
zh-cn	删除所选的应用集?

en-us	Delete selected correlations?
zh-cn	删除选择的关联项？

en-us	Delete selected dashboards?
zh-cn	删除所有的仪表盘？（危险）

en-us	Delete selected discovery rules?
zh-cn	删除所选的发现规则?

en-us	Delete selected elements?
zh-cn	删除所选的元素?

en-us	Delete selected graph prototypes?
zh-cn	删除所选定的数据图模板?

en-us	Delete selected graphs?
zh-cn	删除所选的图表?

en-us	Delete selected group?
zh-cn	删除所选的群组?

en-us	Delete selected groups?
zh-cn	删除所选的群组?

en-us	Delete selected host?
zh-cn	删除所选的主机?

en-us	Delete selected host groups?
zh-cn	删除所选的主机群组?

en-us	Delete selected host prototype?
zh-cn	删除所选定的主机模板?

en-us	Delete selected host prototypes?
zh-cn	删除所选定的主机模板?

en-us	Delete selected hosts?
zh-cn	删除所选的主机?

en-us	Delete selected image?
zh-cn	删除所选的图像?

en-us	Delete selected item prototypes?
zh-cn	删除所选定的监控项目模板?

en-us	Delete selected items?
zh-cn	删除所选的监控项?

en-us	Delete selected maintenance periods?
zh-cn	删除所选的维修期间?

en-us	Delete selected map?
zh-cn	删除选择的拓扑图？

en-us	Delete selected maps?
zh-cn	删除所选的地图?

en-us	Delete selected media types?
zh-cn	删除所选的报警媒体类型?

en-us	Delete selected proxies?
zh-cn	删除所选的代理?

en-us	Delete selected regular expressions?
zh-cn	删除所选的正则表达式?

en-us	Delete selected screens?
zh-cn	删除所选的聚合图形？

en-us	Delete selected scripts?
zh-cn	删除所选的脚本?

en-us	Delete selected shapes?
zh-cn	删除所选形状？

en-us	Delete selected slide shows?
zh-cn	删除所选的幻灯片展示?

en-us	Delete selected templates?
zh-cn	删除所选的模板?

en-us	Delete selected trigger prototypes?
zh-cn	删除所选的触发器原型？

en-us	Delete selected triggers?
zh-cn	删除所选的触发器?

en-us	Delete selected user?
zh-cn	删除所选的用户?

en-us	Delete selected users?
zh-cn	删除所选的用户?

en-us	Delete selected value mapping?
zh-cn	删除所选的值映射?

en-us	Delete selected value mapping? It is used for %d item!
zh-cn	删除所选的值映射? 它用于 %d 监控项!

en-us	Delete selected value maps?
zh-cn	删除所选的值映射？

en-us	Delete selected web scenarios?
zh-cn	删除所选的 web 场景？

en-us	Delete service "%1$s"?
zh-cn	删除服务 "%1$s"？

en-us	Delete slide show?
zh-cn	删除幻灯片演示?

en-us	Delete template?
zh-cn	删除模板?

en-us	Delete trigger?
zh-cn	删除触发器?

en-us	Delete trigger prototype?
zh-cn	删除触发器原型？

en-us	Delete web scenario?
zh-cn	删除 web 场景？

en-us	Delimiter
zh-cn	分隔符

en-us	delta() - Difference between MAX and MIN value of a period T
zh-cn	delta() - 周期 T 内的 MAX 和 MIN 值之间的差异

en-us	Deny
zh-cn	拒绝

en-us	Dependencies
zh-cn	依赖关系

en-us	Dependent
zh-cn	依赖

en-us	Dependent item
zh-cn	相关项目

en-us	Depends on
zh-cn	依赖于

en-us	Deployment status
zh-cn	部署状态

en-us	DES
zh-cn	DES

en-us	descending
zh-cn	降

en-us	description
zh-cn	描述

en-us	Description
zh-cn	描述

en-us	Details
zh-cn	细节

en-us	Details of web scenario
zh-cn	网络方案详细信息

en-us	Device
zh-cn	设备

en-us	Device interrupts. Returns integer
zh-cn	设备的中断数。返回整数

en-us	Device uniqueness criteria
zh-cn	设备唯一性准则

en-us	diff() - Difference between last and preceding values (1 - true, 0 - false)
zh-cn	diff() - 最后一个值和前一个值之间的差异（1 - true，0 - false）

en-us	Dimension (cols x rows)
zh-cn	图表规格 (列 x 行)

en-us	Directory
zh-cn	目录

en-us	directory or script name cannot be empty
zh-cn	目录或脚本名称不能为空

en-us	Directory size (in bytes). Returns integer
zh-cn	目录大小（bytes）。返回整数

en-us	Disable
zh-cn	禁用

en-us	Disabled
zh-cn	停用的

en-us	Disable debug mode
zh-cn	禁用调试模式

en-us	Disable debug mode in selected groups?
zh-cn	停用所选群组的调试模式?

en-us	Disable host
zh-cn	停用主机

en-us	Disable host?
zh-cn	停用主机?

en-us	Disable hosts
zh-cn	禁用主机

en-us	Disable hosts in the selected host groups?
zh-cn	停用所选的主机群组中的主机?

en-us	Disable hosts monitored by selected proxies?
zh-cn	停用所选的agent代理程序所监测的主机?

en-us	Disable selected actions?
zh-cn	停用所选的动作?

en-us	Disable selected applications?
zh-cn	停用所选的应用集?

en-us	Disable selected correlations?
zh-cn	禁用选择的关联项？

en-us	Disable selected discovery rules?
zh-cn	停用所选的自动发现规则?

en-us	Disable selected groups?
zh-cn	停用所选的群组?

en-us	Disable selected hosts?
zh-cn	停用所选的主机?

en-us	Disable selected items?
zh-cn	停用所选的监控项?

en-us	Disable selected media types?
zh-cn	停用所选的报警媒介类型?

en-us	Disable selected modules?
zh-cn	禁用所选的模块?

en-us	Disable selected triggers?
zh-cn	停用所选的触发器?

en-us	Disable selected web scenarios?
zh-cn	禁用所选定的web场景？

en-us	Disaster
zh-cn	灾难

en-us	Discard unchanged
zh-cn	丢弃未变化的值

en-us	Discard unchanged with heartbeat
zh-cn	丢弃检测周期内未变化的值

en-us	Discard value
zh-cn	丢弃值

en-us	Discover
zh-cn	发现

en-us	Discovered
zh-cn	已发现的

en-us	Discovered by
zh-cn	被发现的

en-us	Discovered device
zh-cn	已发现的设备

en-us	discovered host
zh-cn	被发现的主机

en-us	Discovered items
zh-cn	已发现的监控项

en-us	discovered service
zh-cn	被发现的服务

en-us	discovery
zh-cn	发现

en-us	Discovery
zh-cn	自动发现

en-us	Discovery actions
zh-cn	发现动作

en-us	Discovery by proxy
zh-cn	由agent代理程序自动发现

en-us	Discovery check
zh-cn	自动发现检查

en-us	Discovery checks
zh-cn	自动发现检查

en-us	Discovery list
zh-cn	自动发现清单

en-us	Discovery object
zh-cn	自动发现物件

en-us	Discovery of VMware clusters, <url> - VMware service URL. Returns JSON
zh-cn	发现 VMware 集群，<url> - VMware 服务 URL。返回 JSON

en-us	Discovery of VMware datastores, <url> - VMware service URL. Returns JSON
zh-cn	发现 VMware 数据存储，<url> - VMware 服务 URL。返回 JSON

en-us	Discovery of VMware hypervisor datastores, <url> - VMware service URL, <uuid> - VMware hypervisor host name. Returns JSON
zh-cn	发现 VMware hypervisor数据存储，<url> - VMware 服务 URL，<uuid> - VMware 管理程序主机名。返回 JSON

en-us	Discovery of VMware hypervisors, <url> - VMware service URL. Returns JSON
zh-cn	发现 VMware hypervisor，<url> - VMware 服务 URL。返回 JSON

en-us	Discovery of VMware virtual machine disk devices, <url> - VMware service URL, <uuid> - VMware virtual machine host name. Returns JSON
zh-cn	发现 VMware 虚拟机磁盘设备，<url> - VMware 服务 URL，<uuid> - VMware 虚拟机主机名。返回 JSON

en-us	Discovery of VMware virtual machine file systems, <url> - VMware service URL, <uuid> - VMware virtual machine host name. Returns JSON
zh-cn	发现 VMware 虚拟机文件系统，<url> - VMware 服务 URL，<uuid> - VMware 虚拟机主机名。返回 JSON

en-us	Discovery of VMware virtual machines, <url> - VMware service URL. Returns JSON
zh-cn	发现 VMware 虚拟机，<url> - VMware 服务 URL。返回 JSON

en-us	Discovery rule
zh-cn	自动发现规则

en-us	Discovery rule "%1$s" already exists.
zh-cn	发现规则"%1$s"已存在

en-us	Discovery rule "%1$s" already exists on "%2$s".
zh-cn	发现规则"%1$s"已存在于 "%2$s".

en-us	Discovery rule "%1$s" already exists on "%2$s", inherited from another template.
zh-cn	自动发现规则 "%1$s" 已存在于 "%2$s", 继承自其它的模板.

en-us	Discovery rule "%1$s" cannot be copied without its master item.
zh-cn	发现规则“%1$s”在没有主监控项的情况下无法复制。

en-us	Discovery rule "%1$s" is used in "%2$s" action.
zh-cn	发现规则 "%1$s" 已经在动作 "%2$s" 中使用。

en-us	discovery rule "%1$s" on host "%2$s" is not monitored
zh-cn	主机“%2$s”上的自动发现规则“%1$s”不受监控

en-us	Discovery rule created
zh-cn	自动发现规则已创建

en-us	Discovery rule deleted
zh-cn	自动发现规则已删除

en-us	Discovery rule disabled
zh-cn	发现规则已禁用

en-us	Discovery rule enabled
zh-cn	发现规则已经启用

en-us	Discovery rules
zh-cn	自动发现规则

en-us	Discovery rules deleted
zh-cn	自动发现规则已删除

en-us	Discovery rule updated
zh-cn	自动发现规则已更新

en-us	Discovery status
zh-cn	自动发现状态

en-us	Disk read statistics. Returns integer with type in sectors, operations, bytes; float with type in sps, ops, bps
zh-cn	磁盘读取数据。类型是sectors, operations, bytes;返回整数，类型是 sps, ops, bps则返回浮点。

en-us	Disk space in bytes or in percentage from total. Returns integer for bytes; float for percentage
zh-cn	磁盘容量。如果返回的是字节则是整数，如果返回的是百分比则是浮点。

en-us	Disk write statistics. Returns integer with type in sectors, operations, bytes; float with type in sps, ops, bps
zh-cn	磁盘写入数据。类型是sectors, operations, bytes;返回整数，类型是 sps, ops, bps则返回浮点。

en-us	Display graph
zh-cn	显示数据图

en-us	Displaying %1$s of %2$s found
zh-cn	显示 已自动发现的 %2$s中的%1$s

en-us	Displaying %1$s to %2$s of %3$s found
zh-cn	在 %3$s 中打印 %1$s 到 %2$s 

en-us	displaying %1$s to %2$s of %3$s Items
zh-cn	显示 %1$s 到 %2$s 的 %3$s 监控项

en-us	Displaying options
zh-cn	显示选项

en-us	Display OK triggers for
zh-cn	显示OK触发器予

en-us	Display problems
zh-cn	显示问题

en-us	Display stacked graph
zh-cn	显示堆叠数据图

en-us	d.M
zh-cn	d.M

en-us	DNS
zh-cn	DNS

en-us	DNS name
zh-cn	DNS名称

en-us	does not contain
zh-cn	不含

en-us	does not equal
zh-cn	不等于

en-us	does not match
zh-cn	不匹配

en-us	Does not match regular expression
zh-cn	未匹配正则表达式

en-us	Do not calculate
zh-cn	不要计算

en-us	Do not keep history
zh-cn	不保留历史数据

en-us	Do not keep trends
zh-cn	不保留趋势数据

en-us	Dot
zh-cn	点

en-us	Down
zh-cn	下

en-us	Down
zh-cn	下

en-us	Download image
zh-cn	下载图片

en-us	Download the configuration file
zh-cn	下载配置文件

en-us	Downtime
zh-cn	断线时间

en-us	Do you wish to replace the conditional expression?
zh-cn	您想要替换条件式表达式吗?

en-us	Draw
zh-cn	绘制

en-us	Draw style
zh-cn	绘图风格

en-us	Duplicate "%1$s" value "%2$s" for correlation.
zh-cn	在关联项中复制"%1$s"的值 "%2$s"

en-us	Duplicate "%1$s" value "%2$s" for correlation "%3$s".
zh-cn	复制关联项 "%3$s" 中 "%1$s" 的值 "%2$s" 。

en-us	Duplicate dependencies in trigger "%1$s".
zh-cn	重复依赖关系在触发器 "%1$s" 中.

en-us	Duplicate dependencies in trigger prototype "%1$s".
zh-cn	触发器的原形依赖复制"%1$s"。

en-us	Duplicate host. Host with the same host name "%1$s" already exists in data.
zh-cn	重复主机。数据中已存在具有相同主机名“%1$s”的主机。

en-us	Duplicate host. Host with the same visible name "%1$s" already exists in data.
zh-cn	重复主机。数据中已存在具有相同可见名称“%1$s”的主机。

en-us	Duplicate "name" value "%1$s" for application prototype in item prototype "%2$s".
zh-cn	"%2$s"与"%1$s"的名字有冲突。

en-us	Duplicate "name" value "%1$s" for map.
zh-cn	拓扑图 %1$s 名字重复。

en-us	Duplicate "name" value "%1$s" for screen.
zh-cn	复制聚合图形的"name"值"%1$s"

en-us	Duplicate severity name "%1$s".
zh-cn	重复的严重性名称"%s".

en-us	Duplicate userid "%1$s" in users for map "%2$s".
zh-cn	用户ID "%1$s" 与 "%2$s" 冲突

en-us	Duplicate userid "%1$s" in users for screen "%2$s".
zh-cn	用户ID "%1$s" 聚合图形的用户 "%2$s" 冲突

en-us	Duplicate usrgrpid "%1$s" in user groups for map "%2$s".
zh-cn	用户组ID "%1$s" 与 "%2$s" 冲突

en-us	Duplicate usrgrpid "%1$s" in user groups for screen "%2$s".
zh-cn	用户组ID "%1$s" 与 "%2$s" 聚合图形用户组冲突。

en-us	Duration
zh-cn	持续时间

en-us	Dutch (nl_NL)
zh-cn	荷兰(nl_NL)

en-us	Dynamic item
zh-cn	动态监控项

en-us	Dynamic items
zh-cn	动态监控项

en-us	Each item
zh-cn	每个监控项

en-us	Each URL should have a unique name. Please make sure there is only one URL named
zh-cn	每个URL必须是唯一的. 请确保只有一个被命名的 URL.

en-us	Edit
zh-cn	编辑

en-us	Edit dashboard
zh-cn	编辑仪表盘

en-us	Edit map
zh-cn	编辑拓扑图

en-us	Edit operation
zh-cn	编辑操作

en-us	Edit screen
zh-cn	编辑聚合图形

en-us	Edit slide show
zh-cn	编辑幻灯片

en-us	Edit tree element
zh-cn	编辑树元素

en-us	Edit trigger
zh-cn	编辑触发器

en-us	Edit widget
zh-cn	编辑构件

en-us	Effective value
zh-cn	可用值

en-us	Elasticsearch error: %1$s.
zh-cn	Elasticsearch 错误：%1$s。

en-us	Elasticsearch url is not set for type: %1$s.
zh-cn	未设置下一个类型的Elasticsearch网址：%1$s。

en-us	Element
zh-cn	组件

en-us	Element name
zh-cn	组件名称

en-us	Ellipse
zh-cn	椭圆

en-us	Email
zh-cn	电子邮件

en-us	Empty
zh-cn	空

en-us	Empty application prototype name in item prototype "%1$s".
zh-cn	该项目的原型应用名称为 "%1$s" 里面是空的。

en-us	Empty colour.
zh-cn	空的颜色。

en-us	Empty correlation ID.
zh-cn	空的关联ID。

en-us	Empty filter condition formula ID for action "%1$s".
zh-cn	针对动作"%1$s"的过滤器条件表达式ID为空

en-us	Empty filter condition formula ID for discovery rule "%1$s".
zh-cn	针对自动发现规则 "%1$s"的过滤器条件表达式ID为空

en-us	Empty filter condition macro for discovery rule "%1$s".
zh-cn	针对自动发现规则 "%1$s"的过滤器条件宏变量为空

en-us	Empty filter condition operator for action "%1$s".
zh-cn	动作"%1$s"的过滤器条件表达式为空

en-us	Empty filter condition type for action "%1$s".
zh-cn	动作"%1$s"的过滤器条件类型为空

en-us	Empty input parameter.
zh-cn	空的输入参数.

en-us	Empty input parameters.
zh-cn	所输入的参数为空.

en-us	Empty map ID.
zh-cn	空的拓扑图ID。

en-us	Empty media type ID.
zh-cn	空的媒介类型ID。

en-us	Empty name.
zh-cn	空名字

en-us	Empty parameters
zh-cn	空参数

en-us	Empty screen ID.
zh-cn	空白聚合图形ID。

en-us	Empty screen ID for screen.
zh-cn	聚合图形的ID号为空

en-us	Empty screen ID for template screen.
zh-cn	聚合图形模板的聚合图形ID号为空

en-us	Empty SSL certificate file for web scenario "%1$s".
zh-cn	场景"%1$s"配置了空的SSL证书文件

en-us	Empty SSL key file for web scenario "%1$s".
zh-cn	场景"%1$s"配置了空的SSL证书文件

en-us	<empty string>
zh-cn	<空字符串>

en-us	Enable
zh-cn	启用

en-us	Enable compression
zh-cn	启用压缩

en-us	Enable confirmation
zh-cn	启用确认

en-us	Enabled
zh-cn	已启用

en-us	Enable debug mode
zh-cn	启用调试模式

en-us	Enable debug mode in selected groups?
zh-cn	于所选的群组中启用调试模式?

en-us	Enable host
zh-cn	启用主机

en-us	Enable host?
zh-cn	启用主机?

en-us	Enable hosts
zh-cn	启用主机

en-us	Enable hosts monitored by selected proxies?
zh-cn	启用受所选的agent代理程序所监测的主机?

en-us	Enable HTTP authentication
zh-cn	开启 HTTP 验证

en-us	Enable internal housekeeping
zh-cn	开启内部管家

en-us	Enable LDAP authentication
zh-cn	开启 LDAP 验证

en-us	Enable SAML authentication
zh-cn	启用SAML身份验证

en-us	Enable selected actions?
zh-cn	启用所选的动作?

en-us	Enable selected applications?
zh-cn	启用所选的应用集

en-us	Enable selected correlations?
zh-cn	开启选择的关联项？

en-us	Enable selected discovery rules?
zh-cn	启用所选的自动发现规则?

en-us	Enable selected groups?
zh-cn	启用所选的群组?

en-us	Enable selected hosts?
zh-cn	启用所选的主机?

en-us	Enable selected items?
zh-cn	启用所选的监控项？

en-us	Enable selected media types?
zh-cn	启用所选的报警媒介类型?

en-us	Enable selected modules?
zh-cn	启用所选的模块?

en-us	Enable selected triggers?
zh-cn	启用所选的触发器?

en-us	Enable selected web scenarios?
zh-cn	启用所选定的web场景?

en-us	Enable trapping
zh-cn	启用trapping

en-us	Encrypt
zh-cn	加密

en-us	Encryption
zh-cn	加密

en-us	Encryption level
zh-cn	加密等级

en-us	End of line sequence
zh-cn	行序结束

en-us	English (en_GB)
zh-cn	英语 (en_GB)

en-us	English (en_US)
zh-cn	英语(en_US)

en-us	equals
zh-cn	等于

en-us	Equals
zh-cn	等于

en-us	Error
zh-cn	错误

en-us	Error: %1$s
zh-cn	错误: %1$s

en-us	Error in search request for table "%1$s".
zh-cn	查找表请求出现 "%1$s"的错误.

en-us	error message
zh-cn	错误信息

en-us	Error message
zh-cn	错误信息

en-us	esc_step_from and esc_step_to must be set together.
zh-cn	esc_step_from和esc_step_to必须一起设定.

en-us	Event
zh-cn	事件

en-us	Event acknowledged
zh-cn	事件已确认

en-us	Event correlation
zh-cn	关联项事件

en-us	Event correlation rules
zh-cn	关联项事件规则

en-us	Event details
zh-cn	事件细节

en-us	Event generation
zh-cn	事件生成

en-us	Event ID
zh-cn	事件ID

en-us	Event is acknowledged
zh-cn	事件已确认

en-us	Event is not acknowledged
zh-cn	事件未确认

en-us	Event list [previous 20]
zh-cn	事件清单[前 20]

en-us	Event log monitoring. Returns log
zh-cn	事件日志监控。返回日志

en-us	Events and alerts
zh-cn	事件和报警

en-us	Event tag pair
zh-cn	事件标签对

en-us	Event type
zh-cn	事件类型

en-us	Event updated
zh-cn	事件更新

en-us	Every day(s)
zh-cn	每日

en-us	Every week(s)
zh-cn	每周

en-us	Except selected
zh-cn	已选除外

en-us	Exclude
zh-cn	除外

en-us	Exclude host groups
zh-cn	排除主机组

en-us	Execute
zh-cn	执行

en-us	Executed
zh-cn	已执行

en-us	Executed script
zh-cn	已执行的脚本

en-us	Execute now
zh-cn	立即执行

en-us	Execute on
zh-cn	执行在

en-us	Execute SQL error [%1$s] in [%2$s].
zh-cn	执行SQL错误[%1$s]于[%2$s].

en-us	Execute WMI query and return the first selected object. Returns integer, float, string or text (depending on the request)
zh-cn	执行 WMI 查询返回第一个对象。返回整形、浮点、字符串或者文本内容

en-us	Execute WMI query and return the JSON document with all selected objects
zh-cn	执行 WMI 查询并返回包含所有选定对象的 JSON 文档

en-us	Execution confirmation
zh-cn	执行确认

en-us	Expand
zh-cn	扩展

en-us	Expand macros
zh-cn	展开宏

en-us	Expand sidebar
zh-cn	展开侧边栏

en-us	Expand single problem
zh-cn	展开单一问题

en-us	Expired
zh-cn	过期的

en-us	Exploded
zh-cn	爆发的

en-us	Export
zh-cn	导出

en-us	Export to CSV
zh-cn	导出到CSV

en-us	Expression
zh-cn	表达式

en-us	Expression cannot be empty
zh-cn	表达式不能为空白

en-us	Expression constructor
zh-cn	表达式构造器

en-us	expression is empty
zh-cn	表达式为空

en-us	Expressions
zh-cn	表达式

en-us	Expression syntax error.
zh-cn	表达式语法错误。

en-us	Expression type
zh-cn	表达式类型

en-us	Expression Variable Elements
zh-cn	表达式变量组成

en-us	External check
zh-cn	外部检查

en-us	F
zh-cn	F

en-us	Fail
zh-cn	失败

en-us	Failed
zh-cn	已失败

en-us	Failed to create dashboard
zh-cn	创建仪表盘失败

en-us	failed to parse JSON
zh-cn	无法解析 JSON

en-us	Failed to parse URL.
zh-cn	无法解析URL。

en-us	Failed to update dashboard
zh-cn	更新仪表盘失败

en-us	Failed to update template.
zh-cn	更新模板失败

en-us	Failure Audit
zh-cn	失败审计

en-us	FALSE
zh-cn	假

en-us	Fatal error, please report to the Zabbix team
zh-cn	呦吼~中奖了。你发现了一个致命的zabbix错误。来我们的社区把问题跟我们说下吧。我们很乐意帮你解决。

en-us	Favourite graphs
zh-cn	常用的图形

en-us	Favourite maps
zh-cn	常用的拓扑图

en-us	Favourite screens
zh-cn	常用的聚合图形

en-us	Feb
zh-cn	二月

en-us	February
zh-cn	二月

en-us	Field
zh-cn	栏位

en-us	Field "%1$s" cannot be set to NULL.
zh-cn	字段 "%1$s"不能被设置为空

en-us	Field "%1$s" is mandatory.
zh-cn	选项"%1$s"为必填项

en-us	Field "%1$s" is missing a value for map "%2$s".
zh-cn	字段 "%1$s" 缺少拓扑图 "%2$s" 的值。

en-us	Field "%1$s" is missing a value for media type "%2$s".
zh-cn	字段 "%1$s" 缺少媒体类型 "%2$s" 的值。

en-us	Field "%1$s" is missing a value for screen "%2$s".
zh-cn	字段 "%1$s" 缺少聚合图形 "%2$s" 的值。

en-us	Field "%1$s" is not correct: %2$s
zh-cn	字段 "%1$s" 设置错误: %2$s

en-us	Field "%1$s" is not correct: %2$s.
zh-cn	字段 "%1$s" 错误: %2$s。

en-us	Field "%1$s" is not integer.
zh-cn	字段 "%1$s" 不是整数

en-us	Field "%1$s" is not string.
zh-cn	字段 "%1$s"不是字符串

en-us	Field "%1$s" is required for media type "%2$s".
zh-cn	字段 "%1$s" 需要媒体类型 "%2$s".

en-us	Field "%1$s" must be missing.
zh-cn	字段"%1$s"不可以填写

en-us	Field "host" is mandatory.
zh-cn	字段"host"为必填项.

en-us	File checksum, calculated by the UNIX cksum algorithm. Returns integer
zh-cn	文件效验，unix标准算法。返回整数

en-us	File format is unsupported.
zh-cn	Only super admins can create groups

en-us	File is too big, max upload size is %1$s bytes.
zh-cn	文件太大, 最大的上传大小是 %1$s 个字节.

en-us	File size (in bytes). Returns integer
zh-cn	文件大小（单位bytes）。返回整数

en-us	File time information. Returns integer (Unix timestamp)
zh-cn	文件事件信息，返回的是时间戳 整数

en-us	Fill
zh-cn	填

en-us	Filled region
zh-cn	填满的区域

en-us	Filter
zh-cn	过滤器

en-us	Filters
zh-cn	过滤器

en-us	Find string in a file. Returns 0 - match not found; 1 - found
zh-cn	查找文件中的字符串，如果有则返回1，没有则返回0。

en-us	Find string in a file. Returns the line containing the matched string, or as specified by the optional output parameter
zh-cn	查找文件中的字符串，返回内容是被匹配内容的整行字符串，或者其他可选参数

en-us	Find string on a web page. Returns the matched string, or as specified by the optional output parameter
zh-cn	查找网页中的字符串，返回内容是被匹配内容的整行字符串，或者其他可选参数

en-us	Finish
zh-cn	完成

en-us	Finnish (fi_FI)
zh-cn	芬兰语 (fi_FI)

en-us	first
zh-cn	第一

en-us	First
zh-cn	首

en-us	first parameter is expected
zh-cn	第一个参数是预设的

en-us	Fit
zh-cn	适合

en-us	Fit to map
zh-cn	调整至符合拓扑图

en-us	Fixed
zh-cn	固定的

en-us	Flexible
zh-cn	灵活

en-us	Follow redirects
zh-cn	跟随跳转

en-us	Font
zh-cn	字体

en-us	Font colour
zh-cn	字体颜色

en-us	Font size
zh-cn	字体大小

en-us	forecast() - Forecast for next t seconds based on period T
zh-cn	forecast() - 基于周期 T 预测下一个 t 秒

en-us	Form data
zh-cn	表格资料

en-us	Formula
zh-cn	公式

en-us	Formula missing for action "%1$s".
zh-cn	动作“%1$s”缺少公式。

en-us	Formula missing for discovery rule "%1$s".
zh-cn	发现规则“%1$s”缺少公式。

en-us	Formula missing for override "%1$s".
zh-cn	覆盖“%1$s”的公式缺失。

en-us	fourth
zh-cn	第四

en-us	French (fr_FR)
zh-cn	法语 (fr_FR)

en-us	Fri
zh-cn	周五

en-us	Friday
zh-cn	周五

en-us	From
zh-cn	自从

en-us	Frontend access
zh-cn	前端访问

en-us	Frontend messaging
zh-cn	前端信息中

en-us	FTP
zh-cn	FTP

en-us	Full clone
zh-cn	全克隆

en-us	Function
zh-cn	功能

en-us	fuzzytime() - Difference between item value (as timestamp) and Zabbix server timestamp is less than or equal to T seconds (1 - true, 0 - false)
zh-cn	fuzzytime() - 监控项值的时间戳和 Zabbix 服务器时间戳之间的差异小于或等于 T 秒（1 - true，0 - false）

en-us	General
zh-cn	一般

en-us	Generated in %1$s sec
zh-cn	在 %1$s 秒内生成

en-us	Georgian (ka_GE)
zh-cn	格鲁吉亚（ka_GE）

en-us	German (de_DE)
zh-cn	德语 (de_DE)

en-us	Get content of web page. Returns web page source as text
zh-cn	获取网页。返回信息为网页源码或者TXT

en-us	Get value
zh-cn	获取值

en-us	Get value and test
zh-cn	获取值并进行测试

en-us	Get value from host
zh-cn	从主机获取值

en-us	Given expression is not a macro
zh-cn	此表达式不是宏

en-us	global housekeeping settings
zh-cn	全局管家设置

en-us	Global regular expression "%1$s" does not exist.
zh-cn	找不到全局正则表达式 "%1$s" 。

en-us	Global script
zh-cn	全局脚本

en-us	Global scripts
zh-cn	全局脚本

en-us	Global value
zh-cn	全局值

en-us	GMT%1$s
zh-cn	GMT %1$s

en-us	Go back to %1$s
zh-cn	返回 %1$s

en-us	Google Chrome
zh-cn	谷歌 Chrome

en-us	Go to
zh-cn	到

en-us	Go to dashboard
zh-cn	转到仪表板

en-us	Go to first page
zh-cn	返回首页

en-us	Go to last page, %1$s
zh-cn	跳转到尾页，%1$s

en-us	Go to next page, %1$s
zh-cn	跳转到下一页，%1$s

en-us	Go to page %1$s
zh-cn	跳转到第 %1$s 页

en-us	Go to page %1$s, current page
zh-cn	跳转到第 %1$s 页，当前页

en-us	Go to previous page, %1$s
zh-cn	跳转到上一页，%1$s

en-us	Gradient line
zh-cn	梯度线

en-us	Graph
zh-cn	图形

en-us	Graph "%1$s" already exists on "%2$s".
zh-cn	图形"%1$s"已存在于"%2$s"中.

en-us	Graph "%1$s" already exists on "%2$s" (inherited from another template).
zh-cn	图形"%1$s"已存在于"%2$s"中 (继承自其它的模板).

en-us	Graph "%1$s" already exists on "%2$s" (items are not identical).
zh-cn	图形"%1$s"已存在于"%2$s"中 (项目不一致).

en-us	Graph "%1$s" cannot inherit. No required items on "%2$s".
zh-cn	图形"%1$s"不能继承. "%2$s"中并无所要的项目.

en-us	Graph "%1$s" cannot inherit. No required items on "%2$s" (Ymax value item).
zh-cn	图形"%1$s"不能继承. "%2$s"中并无所要的项目 (Ymax值项目).

en-us	Graph "%1$s" cannot inherit. No required items on "%2$s" (Ymin value item).
zh-cn	图形"%1$s"不能继承. "%2$s"中并无所要的项目 (Ymin值项目).

en-us	Graph "%1$s" does not exist on template "%2$s".
zh-cn	图形 "%1$s"不存在于模板"%2$s"中.

en-us	Graph "%1$s" with templated items cannot contain items from other hosts.
zh-cn	含模板项目的图形"%1$s"不能包含其它主机的项目.

en-us	Graph added
zh-cn	图形已添加

en-us	Graph (classic)
zh-cn	图表（经典）

en-us	Graph copied
zh-cn	图表复制

en-us	Graph deleted
zh-cn	图形已删除

en-us	Graph element
zh-cn	图形组件

en-us	graph pattern
zh-cn	图形模式

en-us	Graph prototype
zh-cn	图形原型

en-us	Graph prototype "%1$s" contains item prototypes from multiple discovery rules.
zh-cn	数据图模板 "%1$s" 包含来自多个自动发现规则上的监控项目模板

en-us	Graph prototype "%1$s" must have at least one item prototype.
zh-cn	数据图模板"%1$s"必须要有至少一个监控项目模板

en-us	Graph prototype "%1$s" with templated items cannot contain items from other hosts.
zh-cn	含模板项目的图形原型"%1$s"不能包含其它主机的项目.

en-us	Graph prototype added
zh-cn	数据图模板已添加

en-us	Graph prototype deleted
zh-cn	数据图模板已删除

en-us	Graph prototype not found.
zh-cn	数据图模板没有找到

en-us	Graph prototypes
zh-cn	图形原型

en-us	Graph prototypes deleted
zh-cn	数据图模板已经删除

en-us	Graph prototype updated
zh-cn	数据图模板已更新

en-us	Graph prototype with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的聚合图形不可用。

en-us	Graphs
zh-cn	图形

en-us	Graphs deleted
zh-cn	图形已删除

en-us	Graph sum
zh-cn	图形总数

en-us	Graph type
zh-cn	图形类别

en-us	Graph updated
zh-cn	图形已更新

en-us	Graph with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的图表不可用。

en-us	Graph with name "%1$s" already exists in graphs or graph prototypes.
zh-cn	图表名称 "%1$s" 已经存在在图表或者图表原型.

en-us	Graph with same name but other type exist.
zh-cn	同名但不同类型的图形已存在.

en-us	Greek (el_GR)
zh-cn	希腊(el_GR)

en-us	Grid
zh-cn	网格

en-us	Group
zh-cn	群组

en-us	Group "%1$s" cannot be deleted, because it is used by a host prototype.
zh-cn	组"%1$s" 不可以被删除，因为它正在被主机模板使用

en-us	Group "%1$s" cannot be deleted, because it is used in a correlation condition.
zh-cn	"%1$s" 组因为他的关联条件无法删除。

en-us	Group "%1$s" does not exist.
zh-cn	群组 "%1$s" 不存在.

en-us	Group "%1$s" for host "%2$s" does not exist.
zh-cn	主机 "%2$s" 的群组 "%1$s" 不存在.

en-us	Group added
zh-cn	群组已添加

en-us	Group deleted
zh-cn	组已删除

en-us	Group for discovered hosts
zh-cn	自动发现到的主机的群组

en-us	Group for discovered hosts "%1$s".
zh-cn	应用于被自动发现主机 "%1$s"的主机组

en-us	Grouping by
zh-cn	群组化之于

en-us	Group name
zh-cn	组名

en-us	Group prototype cannot be based on a discovered host group "%1$s".
zh-cn	组模板不可以基于一个已经被自动发现的主机组"%1$s"

en-us	Group prototypes
zh-cn	组模板

en-us	Groups
zh-cn	群组

en-us	Group updated
zh-cn	群组已更新

en-us	GSM modem
zh-cn	GSM 调制解调器

en-us	Guest user
zh-cn	访客用户

en-us	GUI
zh-cn	界面设置

en-us	GUI access disabled.
zh-cn	图形化界面已经被禁用。

en-us	h
zh-cn	h

en-us	Hardware
zh-cn	硬件

en-us	Hardware (Full details)
zh-cn	硬件(全细节)

en-us	Hardware sensor reading. Returns float
zh-cn	硬件传感器读数。返回浮点型

en-us	Headers
zh-cn	头

en-us	Hebrew (he_IL)
zh-cn	希伯来语（he_IL）

en-us	Height
zh-cn	高

en-us	Help
zh-cn	帮助

en-us	Hexadecimal to decimal
zh-cn	十六进制到十进制

en-us	hh
zh-cn	hh

en-us	hh.mm
zh-cn	hh.mm

en-us	H:i
zh-cn	H:i

en-us	Hidden
zh-cn	隐藏的

en-us	Hide debug
zh-cn	隐藏调试

en-us	Hide groups without problems
zh-cn	隐藏组没有问题

en-us	Hide selected
zh-cn	隐藏所选的

en-us	Hide sidebar
zh-cn	隐藏侧边栏

en-us	High
zh-cn	严重

en-us	High-contrast dark
zh-cn	高对比度暗色

en-us	High-contrast light
zh-cn	高对比度亮色

en-us	Highlight whole row
zh-cn	高亮整行

en-us	H:i:s
zh-cn	H:i:s

en-us	History
zh-cn	历史记录

en-us	History and trends compression
zh-cn	压缩历史和趋势数据

en-us	History cleanup is not supported if compression is enabled
zh-cn	如果启用压缩功能，则不支持历史数据清理

en-us	History cleared
zh-cn	历史已清除

en-us	History clearing can take a long time. Continue?
zh-cn	历史清除可能会很久。继续吗?

en-us	History data selection
zh-cn	选择历史数据

en-us	History data storage period "%1$s".
zh-cn	历史数据存储期 "%1$s"。

en-us	History of events
zh-cn	事件历史

en-us	History storage period
zh-cn	历史数据保留时长

en-us	Homepage
zh-cn	主页

en-us	Horizontal
zh-cn	横向

en-us	Horizontal align
zh-cn	横向对齐

en-us	host
zh-cn	主机

en-us	Host
zh-cn	主机

en-us	Host "%1$s" already exists.
zh-cn	主机 "%1$s" 已存在.

en-us	Host "%1$s" cannot be without host group.
zh-cn	主机 "%1$s" 没有设置主机组

en-us	Host "%1$s" is monitored with proxy "%2$s".
zh-cn	主机"%1$s"是以agent代理程序"%2$s"来监控的.

en-us	Host access
zh-cn	主机存取

en-us	Host added
zh-cn	已添加主机

en-us	Host address
zh-cn	主机地址

en-us	Host (ascending)
zh-cn	主机(升序)

en-us	Host availability
zh-cn	主机可用性

en-us	Host cannot have more than one default interface of the same type.
zh-cn	主机不能有超过一个同类型的默认接口.

en-us	Host count
zh-cn	主机计数

en-us	Host deleted
zh-cn	主机已删除

en-us	Host disabled
zh-cn	主机已被禁用

en-us	Host enabled
zh-cn	主机已启用

en-us	host group
zh-cn	主机群组

en-us	Host group
zh-cn	主机群组

en-us	Host group "%1$s" already exists.
zh-cn	主机群组 "%1$s" 已存在.

en-us	Host group "%1$s" cannot be deleted, because it is used in a global script.
zh-cn	主机群组“%1$s”不能被删除，因为它被用于全局脚本

en-us	Host group "%1$s" is internal and can not be deleted.
zh-cn	主机群组 "%1$s" 为内建的且不能被删除

en-us	Host group elements
zh-cn	主机群组组件

en-us	Host group issues
zh-cn	主机群组问题

en-us	Host group label type
zh-cn	主机群组标签类型

en-us	Host groups
zh-cn	主机群组

en-us	Host group with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 主机组不可用。

en-us	hostid of dependent item and master item should match
zh-cn	依赖项目和主项目的hostid应该匹配

en-us	Host info
zh-cn	主机信息

en-us	Host interface
zh-cn	主机接口

en-us	Host inventory
zh-cn	主机资产记录

en-us	Host inventory overview
zh-cn	主机资产记录概览

en-us	Host IP
zh-cn	主机IP地址

en-us	Host issues
zh-cn	主机问题

en-us	"host:key" pair is expected
zh-cn	“主机：key值” 关键的预计

en-us	Host label type
zh-cn	主机标签类型

en-us	Host macros
zh-cn	主机宏

en-us	Host metadata
zh-cn	主机元数据

en-us	Host name
zh-cn	主机名称

en-us	Host networks
zh-cn	主机网络

en-us	host pattern
zh-cn	主机样式

en-us	Host prototype
zh-cn	原型主机

en-us	Host prototype "%1$s" already exists on "%2$s".
zh-cn	主机模板"%1$s"已存在于"%2$s"

en-us	Host prototype "%1$s" already exists on "%2$s", inherited from another template.
zh-cn	主机模板 "%1$s"已存在于"%2$s", 它继承自其它模板

en-us	Host prototype added
zh-cn	主机模板已添加

en-us	Host prototype deleted
zh-cn	主机模板已删除

en-us	Host prototype macros
zh-cn	主机原型宏

en-us	Host prototypes
zh-cn	主机模板

en-us	Host prototypes deleted
zh-cn	主机模板已删除

en-us	Host prototype updated
zh-cn	主机模板已更新

en-us	Host prototype with host name "%1$s" already exists in discovery rule "%2$s".
zh-cn	主机名称为 "%1$s" 的主机模板已经存在于自动发现规则 "%2$s"中.

en-us	Host prototype with visible name "%1$s" already exists in discovery rule "%2$s".
zh-cn	显示名称为"%1$s"的主机模板已存在于自动发现规则"%2$s"中.

en-us	Host router
zh-cn	主机路由

en-us	Hosts
zh-cn	主机

en-us	Hosts and groups
zh-cn	主机和组

en-us	Host screens
zh-cn	主机聚合图形

en-us	Hosts location
zh-cn	主机位置

en-us	Host subnet mask
zh-cn	主机子网掩码

en-us	Hosts updated
zh-cn	主机已更新

en-us	Host time
zh-cn	主机时间

en-us	Host updated
zh-cn	主机已更新

en-us	Host update failed.
zh-cn	主机更新失败.

en-us	Host with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的主机不可用

en-us	Host with the same name "%1$s" already exists.
zh-cn	主机名称为"%1$s"的主机已存在

en-us	Host with the same visible name "%1$s" already exists.
zh-cn	显示名称为"%1$s" 的主机已经存在

en-us	Hours
zh-cn	时

en-us	Housekeeping
zh-cn	管家

en-us	HTML
zh-cn	HTML

en-us	HTTP
zh-cn	HTTP

en-us	HTTP agent
zh-cn	HTTP 代理

en-us	HTTP authentication
zh-cn	HTTP认证

en-us	HTTP login form
zh-cn	HTTP 登录表格

en-us	HTTP proxy
zh-cn	HTTP 代理

en-us	HTTPS
zh-cn	HTTPS

en-us	HTTP settings
zh-cn	HTTP 设置

en-us	Hungarian (hu_HU)
zh-cn	匈牙利(hu_HU)

en-us	HW architecture
zh-cn	硬件架构

en-us	ICMP ping
zh-cn	ICMP ping

en-us	icon
zh-cn	图标

en-us	Icon
zh-cn	图标

en-us	Icon (default)
zh-cn	图标(默认)

en-us	Icon (disabled)
zh-cn	图标(停用的)

en-us	I confirm to remove all macros
zh-cn	我确认删除所有宏

en-us	Icon highlight
zh-cn	图标高亮

en-us	Icon (maintenance)
zh-cn	图标(维修)

en-us	Icon map
zh-cn	图标映射

en-us	Icon map "%1$s" already exists.
zh-cn	图标映射"%1$s"已存在。

en-us	Icon map "%1$s" cannot be deleted. Used in map "%2$s".
zh-cn	图标映射"%1$s"无法被删除. 已用映射"%2$s"中.

en-us	Icon map created
zh-cn	图标映射已创建

en-us	Icon map deleted
zh-cn	图标映射已删除

en-us	Icon mapping
zh-cn	图标映射

en-us	Icon map updated
zh-cn	图标映射已更新

en-us	Icon (problem)
zh-cn	图标(问题)

en-us	Icons
zh-cn	图标

en-us	Icon with ID "%1$s" is not available.
zh-cn	ID为 "%1$s" 的图标不可用。

en-us	ID
zh-cn	ID

en-us	Identical actions are used by modules located at %1$s.
zh-cn	位于 %1$s 的模块使用了相同的动作。

en-us	Identical ID (%1$s) is used by modules located at %2$s.
zh-cn	位于 %2$s 的模块使用了相同的 ID (%1$s)。

en-us	Identical namespace (%1$s) is used by modules located at %2$s.
zh-cn	位于 %2$s 的模块使用了相同的命名空间 (%1$s)。

en-us	Identification of the system. Returns string
zh-cn	识别系统。返回 字符串

en-us	IdP entity ID
zh-cn	IdP 实体 ID

en-us	If filter matches
zh-cn	如果过滤器匹配

en-us	If you think this message is wrong, please consult your administrators about getting the necessary permissions.
zh-cn	假如您认为这个信息是错的, 请咨询您的管理员关于如何取得需要的权限.

en-us	image
zh-cn	图片

en-us	Image
zh-cn	图片

en-us	Image "%1$s" already exists.
zh-cn	图片"%1$s"已经存在

en-us	Image added
zh-cn	图片已添加

en-us	Image deleted
zh-cn	图片已删除

en-us	Image label type
zh-cn	图片标签类型

en-us	Image load error [%1$s] in [%2$s].
zh-cn	图片加载错误[%1$s] in [%2$s]

en-us	Images
zh-cn	图片

en-us	Images for all maps will be updated!
zh-cn	所有拓扑图都将被更新!

en-us	Image size must be less than %1$s.
zh-cn	图片大小必须小于 %1$s。

en-us	Image updated
zh-cn	图片已更新

en-us	IMAP
zh-cn	IMAP

en-us	Immediately
zh-cn	立即地

en-us	Import
zh-cn	导入

en-us	Imported successfully
zh-cn	已成功导入

en-us	Import failed
zh-cn	导入失败

en-us	Import file
zh-cn	导入文件

en-us	Impossible to filter by inventory field "%1$s", which does not exist.
zh-cn	无法按资产字段“%1$s”过滤，该字段不存在。

en-us	in
zh-cn	在

en-us	Inaccessible discovery rule
zh-cn	无法访问发现规则

en-us	Inaccessible graph
zh-cn	不能访问的图表

en-us	Inaccessible graph prototype
zh-cn	无法访问图形原型

en-us	Inaccessible group
zh-cn	不能访问的组

en-us	Inaccessible host
zh-cn	无法访问的主机

en-us	Inaccessible item
zh-cn	无法访问的项

en-us	Inaccessible item prototype
zh-cn	无法访问监控项原型

en-us	Inaccessible maintenance
zh-cn	无法访问的维护

en-us	Inaccessible map
zh-cn	无法访问的拓扑图

en-us	Inaccessible template
zh-cn	无法访问的模板

en-us	Inaccessible trigger
zh-cn	无法访问的触发器

en-us	Inaccessible user
zh-cn	用户无法访问

en-us	Include
zh-cn	包含

en-us	Include event menu entry
zh-cn	包括事件菜单条目

en-us	Include subgroups
zh-cn	包括子组

en-us	including subgroups
zh-cn	包括子组

en-us	Incoming traffic statistics on network interface. Returns integer
zh-cn	网络接口上传流量统计。返回 整数

en-us	Incorrect %1$s label type value for map "%2$s".
zh-cn	映射 "%2$s" 中存在错误的 %1$s 标签类型数据.

en-us	Incorrect acceptable SLA for service "%1$s".
zh-cn	服务 "%1$s" 存在错误的可接受的 SLA.

en-us	Incorrect acknowledgement action operationid.
zh-cn	哇哦。这个确认操作不正确！

en-us	Incorrect action condition discovery check.
zh-cn	探索检查存在错误的动作情况.

en-us	Incorrect action condition discovery check. Discovery check does not exist or you have no access to it.
zh-cn	探索检查存在错误的动作情况. 探索检查不存在或您没有访问权.

en-us	Incorrect action condition discovery object.
zh-cn	不正确的动作条件发现对象。

en-us	Incorrect action condition discovery rule. Discovery rule does not exist or you have no access to it.
zh-cn	不正确的动作条件自动发现规则. 自动发现规则不存在或您不能访问它.

en-us	Incorrect action condition discovery status.
zh-cn	错误的动作条件探索状态.

en-us	Incorrect action condition event type.
zh-cn	错误的动作条件时间类型.

en-us	Incorrect action condition host group. Host group does not exist or you have no access to it.
zh-cn	错误的动作条件主机群组. 主机群组不存在或您不能访问它.

en-us	Incorrect action condition host. Host does not exist or you have no access to it.
zh-cn	错误的动作条件主机. 主机不存在或您不能访问它.

en-us	Incorrect action condition port "%1$s".
zh-cn	错误的动作条件端口"%1$s".

en-us	Incorrect action condition proxy. Proxy does not exist or you have no access to it.
zh-cn	不正确的动作条件agent代理程序. agent代理程序不存在或您没有存取权.

en-us	Incorrect action condition template. Template does not exist or you have no access to it.
zh-cn	错误的动作条件模板. 模板不存在或您没有访问权.

en-us	Incorrect action condition trigger severity.
zh-cn	错误的操作条件触发器严重性.

en-us	Incorrect action condition trigger. Trigger does not exist or you have no access to it.
zh-cn	错误的动作条件触发器. 触发器不存在或您没有访问权.

en-us	Incorrect action condition type.
zh-cn	错误的动作条件类型.

en-us	Incorrect action operation command type.
zh-cn	错误的动作操作命令类型.

en-us	Incorrect action operation condition acknowledge type.
zh-cn	错误的动作操作条件确认类型.

en-us	Incorrect action operation condition type.
zh-cn	错误的动作操作条件类型.

en-us	Incorrect action operation escalation step values.
zh-cn	错误的动作操作升级步骤值.

en-us	Incorrect action operation host group. Host group does not exist or you have no access to this host group.
zh-cn	错误的动作操作主机群组. 主机群组不存在或您没有访问权限.

en-us	Incorrect action operation host. Host does not exist or you have no access to this host.
zh-cn	错误的动作操作主机. 主机不存在或您没有访问权限.

en-us	Incorrect action operationid.
zh-cn	错误的动作操作ID.

en-us	Incorrect action operation port "%1$s".
zh-cn	不正确的动作操作端口"%1$s"。

en-us	Incorrect action operation template. Template does not exist or you have no access to this template.
zh-cn	错误的模板操作。 模板不存在或您无权访问此模板。

en-us	Incorrect action operation type "%1$s" for event source "%2$s".
zh-cn	在事件源 "%2$s" 中有错误的动作类型 "%1$s" 

en-us	Incorrect action operation user group. User group does not exist or you have no access to this user group.
zh-cn	错误的动作操作用户群组. 用户群组不存在或您没有访问权.

en-us	Incorrect action operation user. User does not exist or you have no access to this user.
zh-cn	错误的动作操作用户. 用户不存在或您没有访问权.

en-us	Incorrect algorithm for service "%1$s".
zh-cn	服务"%1$s" 配置了错误的算法.

en-us	Incorrect API "%1$s".
zh-cn	不正确的API接口 "%1$s"

en-us	Incorrect arguments passed to function
zh-cn	函数传入了错误的参数

en-us	Incorrect arguments passed to function.
zh-cn	函数传入了错误的参数。

en-us	Incorrect bulk value for interface.
zh-cn	接口的值不正确

en-us	incorrect calculated item formula
zh-cn	计算监控项公式不正确

en-us	incorrect calculated item formula starting from "%1$s"
zh-cn	从“%1$s”开始的计算监控项公式不正确

en-us	Incorrect calculate SLA value for service "%1$s".
zh-cn	服务"%1$s"出现了错误的计算SLA值.

en-us	Incorrect characters used for host name "%1$s".
zh-cn	主机名称 "%1$s" 中有不支持的字符。

en-us	Incorrect characters used for proxy name "%1$s".
zh-cn	代理名"%1$s" 使用了错误的字符.

en-us	Incorrect characters used for template name "%1$s".
zh-cn	模板名称"%1$s"使用了不正确的名称.

en-us	Incorrect conditions for action "%1$s".
zh-cn	动作"%1$s"的条件不正确

en-us	Incorrect conditions for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的条件不正确.

en-us	incorrect condition type
zh-cn	条件类型不正确

en-us	Incorrect correlation ID.
zh-cn	错误的关联项ID。

en-us	Incorrect custom expression "%2$s" for action "%1$s": %3$s.
zh-cn	动作"%1$s": %3$s自定义的表达式"%2$s" 不正确.

en-us	Incorrect custom expression "%2$s" for correlation "%1$s": %3$s.
zh-cn	在关联项"%1$s": %3$s中使用了错误的表达式"%2$s"。

en-us	Incorrect custom expression "%2$s" for discovery rule "%1$s": %3$s.
zh-cn	自动发现规则"%1$s": %3$s自定义的表达式 "%2$s"不正确.

en-us	Incorrect custom expression "%2$s" for override "%1$s": %3$s.
zh-cn	覆盖“%1$s”的自定义表达式“%2$s”不正确：%3$s。

en-us	Incorrect data.
zh-cn	数据错误。

en-us	Incorrect default charset for Zabbix database: %1$s.
zh-cn	Zabbix 数据库的默认字符集不正确：%1$s。

en-us	incorrect element count
zh-cn	错误的元素

en-us	Incorrect evaltype value.
zh-cn	评估类型的值不正确。

en-us	Incorrect event object "%1$s" (%2$s) for event source "%3$s" (%4$s), only the following objects are supported: %5$s.
zh-cn	错误的事件对象 "%1$s" (%2$s)对于事件源"%3$s" (%4$s),只有以下对象的支持:%5$s.

en-us	Incorrect eventobject value.
zh-cn	错误的事件对象值.

en-us	Incorrect eventsource value.
zh-cn	错误的事件源的值.

en-us	Incorrect field "%1$s" name or value in where statement for table "%2$s".
zh-cn	不正确的栏位名称"%1$s"或用于资料表"%2$s"的where描述式的值.

en-us	Incorrect fields for sysmap.
zh-cn	错误的sysmap字段.

en-us	Incorrect file path for "%1$s": %2$s.
zh-cn	"%1$s" 的文件路径不正确：%2$s。

en-us	Incorrect file upload.
zh-cn	错误的文件上传.

en-us	Incorrect filter condition formula ID for action "%1$s".
zh-cn	动作"%1$s"的过滤器条件计算式ID不正确.

en-us	Incorrect filter condition formula ID for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的条件计算式ID不正确.

en-us	Incorrect filter condition formula ID given for correlation "%1$s".
zh-cn	错误的过滤条件公式给出相关ID "%1$s" 。

en-us	Incorrect filter condition macro for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的过滤器条件宏变量不正确

en-us	Incorrect filter condition macro for override "%1$s".
zh-cn	覆盖 "%1$s" 的宏过滤条件不正确。

en-us	Incorrect filter condition operator for action "%1$s".
zh-cn	动作"%1$s"过滤器条件行为不正确.

en-us	Incorrect filter condition operator for discovery rule "%1$s".
zh-cn	自动发现规则"%1$s"的过滤器条件行为不正确

en-us	Incorrect filter condition type for action "%1$s".
zh-cn	动作"%1$s"的过滤器条件类型不正确

en-us	Incorrect function is used
zh-cn	使用了错误的函数

en-us	Incorrect graph ID "%1$s" provided for screen element.
zh-cn	聚合图形元素中使用了不正确的数据图ID"%1$s"

en-us	Incorrect graph prototype ID "%1$s" provided for screen element.
zh-cn	聚合图形元素中使用了不正确的数据图模板ID"%1$s"。

en-us	Incorrect "height" value for map "%1$s".
zh-cn	拓扑图 "%1$s" 高度值错误。

en-us	Incorrect host group.
zh-cn	错误的主机群组.

en-us	Incorrect host group ID "%1$s" provided for screen element.
zh-cn	聚合图形元素使用了不正确主机组ID "%1$s"。

en-us	Incorrect host ID "%1$s" provided for screen element.
zh-cn	聚合图形中使用了不正确的主机ID"%1$s"。

en-us	Incorrect image index.
zh-cn	错误的图片索引

en-us	Incorrect input parameters.
zh-cn	不正确的输入参数

en-us	Incorrect interface DNS parameter "%1$s" provided.
zh-cn	提供的接口 DNS 参数“%1$s”不正确。

en-us	Incorrect interface port "%1$s" provided.
zh-cn	提供的接口端口“%1$s”不正确。

en-us	Incorrect inventory field "%1$s".
zh-cn	资产字段“%1$s”不正确。

en-us	Incorrect inventory mode in action operation.
zh-cn	要执行的动作库存方式是不正确的。

en-us	Incorrect item for axis value.
zh-cn	错误的项目轴线值.

en-us	Incorrect item ID "%1$s" provided for screen element.
zh-cn	聚合图形元素应用了不正确的监控项目ID "%1$s" 。

en-us	Incorrect item key "%1$s" provided for trigger expression on "%2$s".
zh-cn	提供错误的项目键值"%1$s"给"%2$s"上的触发器表达式.

en-us	Incorrect item prototype ID "%1$s" provided for screen element.
zh-cn	图表元素应用了不正确的监控项目模板ID"%1$s" 

en-us	Incorrect item value type
zh-cn	项目的数据类型不正确

en-us	Incorrect item value type "%1$s" provided for trigger function "%2$s".
zh-cn	提供错误的项目值类型"%1$s"给触发器函数"%2$s".

en-us	Incorrect list of items.
zh-cn	错误的监控项列表

en-us	Incorrect maintenance - date must be between 1970.01.01 and 2038.01.18
zh-cn	错误的维护-日期必须在1970.01.01和2038.01.18之间

en-us	Incorrect maintenance period (minimum 5 minutes)
zh-cn	错误的维护期间(至少要5分钟)

en-us	Incorrect map ID.
zh-cn	错误的拓扑图ID

en-us	Incorrect map ID "%1$s" provided for screen element.
zh-cn	图表元素中应用了不正确的拓扑图ID"%1$s"

en-us	Incorrect max columns provided for screen element.
zh-cn	聚合图形的最大列数不正确.

en-us	Incorrect media type ID.
zh-cn	错误的 媒介类型ID

en-us	Incorrect method "%1$s.%2$s".
zh-cn	不正确的方法 "%1$s.%2$s".

en-us	Incorrect object value.
zh-cn	错误的对象值.

en-us	Incorrect parameter "%1$s" value: %2$s.
zh-cn	参数“%1$s”值不正确：%2$s。

en-us	Incorrect parameter for action "%1$s".
zh-cn	动作"%1$s" 使用了错误的参数.

en-us	Incorrect parameter for operations.
zh-cn	错误的操作参数.

en-us	Incorrect parameters for action update method "%1$s".
zh-cn	动作更新方法"%1$s"使用了不正确的参数.

en-us	Incorrect parameters for condition.
zh-cn	错误的条件参数.

en-us	Incorrect parameters for maintenance.
zh-cn	错误的维护参数.

en-us	Incorrect parent for service "%1$s".
zh-cn	错误的服务"%1$s"的上层

en-us	Incorrect parent service.
zh-cn	错误的上层服务.

en-us	Incorrect "permission" value "%1$s" in user groups for map "%2$s".
zh-cn	拓扑图 "%2$s" 用户组 "permission" 的值 "%1$s" 冲突

en-us	Incorrect "permission" value "%1$s" in user groups for screen "%2$s".
zh-cn	聚合图形 "%2$s" 用户组 "permission" 的值 "%1$s" 冲突

en-us	Incorrect "permission" value "%1$s" in users for map "%2$s".
zh-cn	拓扑图 "%2$s" 用户 "permission" 的值 "%1$s" 冲突

en-us	Incorrect "permission" value "%1$s" in users for screen "%2$s".
zh-cn	聚合图形 "%2$s" 权限值 "%1$s" 异常。

en-us	Incorrect port range.
zh-cn	错误的端口范围.

en-us	Incorrect "private" value "%1$s" for map "%2$s".
zh-cn	拓扑图 "%2$s" 的"private" “%1$s" 值错误。

en-us	Incorrect "private" value "%1$s" for screen "%2$s".
zh-cn	聚合图形 "%2$s" 的"private" 值 "%1$s" 异常。

en-us	Incorrect regular expression "%1$s": "%2$s"
zh-cn	不正确的正则表达式 "%1$s": "%2$s"

en-us	Incorrect resource type provided for screen item.
zh-cn	提供了不正确的资源类型给聚合图形项目.

en-us	Incorrect response received from Zabbix server "%1$s".
zh-cn	收到了来自于zabbix服务器"%1$s"的错误应答.

en-us	Incorrect screen ID.
zh-cn	不正确的聚合图形ID

en-us	Incorrect screen ID "%1$s" provided for screen element.
zh-cn	聚合图形应用了不正确的聚合图形ID "%1$s"

en-us	Incorrect screen provided for slide show.
zh-cn	用于聚合图形的不正确聚合图形。

en-us	Incorrect service end time.
zh-cn	错误的服务终止时间.

en-us	Incorrect service start time.
zh-cn	错误的服务开始时间.

en-us	Incorrect service time type.
zh-cn	错误的服务时间类型.

en-us	Incorrect SNMP community.
zh-cn	错误的SNMP community.

en-us	Incorrect SNMP OID.
zh-cn	错误的SNMP OID

en-us	Incorrect "soft" field value for dependency for service "%1$s".
zh-cn	在服务 "%1$s" 依赖了"soft"栏位的错误数据.

en-us	Incorrect sort order for service "%1$s".
zh-cn	服务"%1$s" 中的排序不正确。

en-us	Incorrect source value.
zh-cn	错误的源值.

en-us	Incorrect status for host "%1$s".
zh-cn	主机"%1$s"的状态值不正确.

en-us	Incorrect status for service "%1$s".
zh-cn	服务"%1$s"存在错误的状态.

en-us	Incorrect style provided for screen element.
zh-cn	指定的聚合图形元素样式不正确.

en-us	incorrect syntax near "%1$s"
zh-cn	"%1$s"附近语法错误

en-us	Incorrect templated web scenario step count.
zh-cn	模板Web方案步骤计数不正确。

en-us	Incorrect template screen ID.
zh-cn	模板的聚合图形ID错误。

en-us	incorrect trigger expression
zh-cn	错误的触发器表达式

en-us	Incorrect trigger expression
zh-cn	错误的触发器表达式

en-us	Incorrect trigger expression.
zh-cn	错误的触发器表达式.

en-us	Incorrect trigger expression. Host "%1$s" does not exist or you have no access to this host.
zh-cn	错误的触发器表达式. 主机 "%1$s"不存在或您不能存取此主机.

en-us	incorrect trigger expression starting from "%1$s"
zh-cn	从“%1$s”开始的触发器表达式不正确

en-us	Incorrect trigger expression. Trigger expression elements should not belong to a template and a host simultaneously.
zh-cn	错误的触发器表达式. 触发器表达式组件不该同时属于一个模板和一个主机.

en-us	Incorrect trigger function "%1$s" provided in expression.
zh-cn	用了错误的触发器方程序"%1$s"于表达式中.

en-us	Incorrect trigger ID for service "%1$s".
zh-cn	服务"%1$s"存在错误的触发器 ID.

en-us	Incorrect trigger prototype expression. Host "%1$s" does not exist or you have no access to this host.
zh-cn	触发器的模板表达式错误。主机"%1$s"不存在或您没有权限访问它.

en-us	Incorrect trigger prototype expression. Trigger prototype expression elements should not belong to a template and a host simultaneously.
zh-cn	触发器模板表达式错误。触发器表达式元素不应该同时属于一个模板和一个主机.

en-us	Incorrect type of calculation for action "%1$s".
zh-cn	动作"%1$s"的计算类型不正确.

en-us	Incorrect type of calculation for correlation "%1$s".
zh-cn	"%1$s"的关联项计算类型错误。

en-us	Incorrect type of calculation for discovery rule "%1$s".
zh-cn	自动发现规则 "%1$s"的计算类型不正确.

en-us	Incorrect user group.
zh-cn	错误的用户群组.

en-us	Incorrect user group ID specified for map "%1$s".
zh-cn	拓扑图 "%1$s" 用户组ID错误。

en-us	Incorrect user group ID specified for screen "%1$s".
zh-cn	聚合图形 "%1$s" 用户组ID错误。

en-us	Incorrect user ID specified for map "%1$s".
zh-cn	拓扑图 "%1$s" 用户ID错误。

en-us	Incorrect user ID specified for screen "%1$s".
zh-cn	聚合图形 "%1$s" 用户ID错误。

en-us	Incorrect user name or password or account is temporarily blocked.
zh-cn	用户名或密码不正确，或帐户被临时禁用。

en-us	Incorrect value "%1$s" for "%2$s" field.
zh-cn	字段 "%2$s"的值 "%1$s"不正确.

en-us	Incorrect value "%1$s" for "%2$s" field: must be between %3$s and %4$s.
zh-cn	字段 "%2$s"的值 "%1$s"不正确:必须在%3$s到%4$s之间

en-us	Incorrect value "%1$s" for "%2$s" field: must be between %3$s and %4$s, and have no more than %5$s digits after the decimal point.
zh-cn	“%2$s”字段的值“%1$s”不正确：必须介于 %3$s 和 %4$s 之间，并且小数点后不超过 %5$s 位。

en-us	Incorrect value "%1$s" for float field "%2$s".
zh-cn	错误的值"%1$s"于浮点栏位"%2$s"中.

en-us	Incorrect value "%1$s" for int field "%2$s".
zh-cn	错误的值"%1$s"于整数栏位"%2$s"中.

en-us	Incorrect value "%1$s" for unsigned int field "%2$s".
zh-cn	错误的值"%1$s"于无正负的整数栏位"%2$s"中.

en-us	Incorrect value "%1$s" in field "%2$s" for correlation "%3$s".
zh-cn	在关联项中"%3$s"，"%2$s"使用了错误的值"%1$s"。

en-us	Incorrect value "%1$s" in field "%2$s" for media type "%3$s".
zh-cn	"%2$s" 中 媒体值 "%3$s" 的 "%1$s" 值错误。

en-us	Incorrect value for "%1$s" field.
zh-cn	"%1$s" 字段的值不正确。

en-us	Incorrect value for field "%1$s": %2$s.
zh-cn	字段 "%1$s": %2$s 值错误。

en-us	Incorrect value used for proxy status "%1$s".
zh-cn	错误的值用于代理服务器状态 "%1$s".

en-us	Incorrect value used for PSK field. It should consist of an even number of hexadecimal characters.
zh-cn	在PSK字段使用的值是不正确的。未配置为十六进制字符串。

en-us	Incorrect "width" value for map "%1$s".
zh-cn	拓扑图的宽度值 "%1$s" 错误。

en-us	Indonesian (id_ID)
zh-cn	印度尼西亚 (id_ID)

en-us	Infinity
zh-cn	无穷

en-us	Info
zh-cn	信息

en-us	Information
zh-cn	信息

en-us	Information about a service. Returns integer with param as state, startup; string - with param as displayname, path, user; text - with param as description; Specifically for state: 0 - running, 1 - paused, 2 - start pending, 3 - pause pending, 4 - continue pending, 5 - stop pending, 6 - stopped, 7 - unknown, 255 - no such service; Specifically for startup: 0 - automatic, 1 - automatic delayed, 2 - manual, 3 - disabled, 4 - unknown
zh-cn	有关服务的信息。返回整数字段表示状态，启动状态；字符串 - 以字段作为显示名，路径，用户; 文本 - 使用字段作为描述； 状态码：0 - 运行，1 - 暂停，2 - 启动挂起，3 - 暂停挂起，4 - 继续挂起，5 - 停止挂起，6 - 停止，7 - 未知，255 - 没有这个服务；启动码：0 - 自动，1 - 自动延迟，2 - 手动, 3 - 禁用，4 - 未知

en-us	Inherited
zh-cn	已继承

en-us	Inherited and host macros
zh-cn	继承以及主机 宏

en-us	Inherited and host prototype macros
zh-cn	继承和主机原型宏

en-us	Inherited and template macros
zh-cn	继承模板的宏

en-us	Inherited and trigger tags
zh-cn	继承和触发标签

en-us	Inherited items
zh-cn	继承监控项

en-us	In maintenance
zh-cn	维修中

en-us	In progress
zh-cn	启用中

en-us	In range
zh-cn	区间值

en-us	Insert
zh-cn	插入

en-us	Insert expression
zh-cn	插入表达式

en-us	Install
zh-cn	安装

en-us	Installation
zh-cn	安装

en-us	Installer name
zh-cn	安装名称

en-us	Interface
zh-cn	接口

en-us	Interface is linked to item "%1$s" on "%2$s".
zh-cn	接口是链接到"%2$s"上的监控项"%1$s".

en-us	Interfaces
zh-cn	接口

en-us	Interface type
zh-cn	接口类型

en-us	Interface with DNS "%1$s" cannot have empty IP address.
zh-cn	DNS为"%1$s"的接口不能有空白的IP地址.

en-us	Interface with IP "%1$s" cannot have empty DNS name.
zh-cn	IP为"%1$s"的接口不能有空白的DNS名称.

en-us	Interface with IP "%1$s" cannot have empty DNS name while having "Use DNS" property on "%2$s".
zh-cn	当"%2$s"上有 "Use DNS"属性, IP为"%1$s"的接口不能有空白的DNS名称.

en-us	internal
zh-cn	事件源

en-us	Internal
zh-cn	认证

en-us	Internal
zh-cn	用户类型

en-us	Internal actions
zh-cn	内部动作

en-us	Internal data storage period
zh-cn	内部数据存储期

en-us	Internal error.
zh-cn	内部错误.

en-us	Internal event and alert data storage period "%1$s".
zh-cn	内部时间以及报警的存储期 "%1$s" 。

en-us	Internal JSON-RPC error.
zh-cn	内部的JSON-RPC错误.

en-us	Internal problem
zh-cn	内部问题

en-us	Internal problem recovery
zh-cn	内部问题恢复

en-us	Internet Explorer
zh-cn	IE浏览器

en-us	Interval
zh-cn	间隔

en-us	Invalid action condition: %1$s.
zh-cn	无效的动作条件：%1$s。

en-us	invalid address range "%1$s"
zh-cn	无效地址范围 "%1$s"

en-us	Invalid audit data storage period: %1$s.
zh-cn	审核资料储存期无效： %1$s。

en-us	Invalid autoregistration data storage period: %1$s.
zh-cn	无效的自动注册数据存储期限：%1$s。

en-us	Invalid blinking on trigger status change: %1$s.
zh-cn	触发状态更改无效闪烁：%1$s。

en-us	invalid byte sequence in UTF-8
zh-cn	UTF-8中无效的字节排序

en-us	Invalid data storage period for services: %1$s.
zh-cn	服务的数据保留期不正确：%1$s.

en-us	invalid data type
zh-cn	无效的数据类型

en-us	Invalid date.
zh-cn	无效数据.

en-us	invalid delay
zh-cn	无效延迟

en-us	Invalid displaying of OK triggers: %1$s.
zh-cn	OK触发器无效显示： %1$s。

en-us	Invalid email address "%1$s".
zh-cn	无效 email 地址 "%1$s"。

en-us	Invalid email address for media type with ID "%1$s".
zh-cn	媒介类型 ID: "%1$s" 的 email 地址无效。

en-us	Invalid fifth parameter.
zh-cn	第五个参数无效。

en-us	Invalid first parameter.
zh-cn	第一个参数无效.

en-us	Invalid fourth parameter.
zh-cn	第四个参数无效.

en-us	Invalid history data storage period: %1$s.
zh-cn	%1$s 历史数据存储时间段无效。

en-us	invalid history storage period
zh-cn	无效的历史数据期间

en-us	invalid host group name
zh-cn	无效的主机群组名称

en-us	Invalid hostid for macro "%1$s".
zh-cn	宏 "%1$s" 存在无效的 hostid.

en-us	invalid host name
zh-cn	无效的主机名称

en-us	Invalid internal data storage period: %1$s.
zh-cn	内部存储期 %1$s 无效。

en-us	Invalid interval "%1$s".
zh-cn	无效的间隔 "%1$s".

en-us	Invalid IP address "%1$s".
zh-cn	不合法的IP地址"%1$s".

en-us	Invalid JSON. An error occurred on the server while parsing the JSON text.
zh-cn	无效的JSON. 当解析JSON文字时, 在服务器端发生了一个错误.

en-us	Invalid key "%1$s": %2$s.
zh-cn	不舍法的关键字 "%1$s": %2$s

en-us	Invalid key "%1$s" for discovery rule "%2$s" on "%3$s": %4$s.
zh-cn	"%3$s"：%4$s上的自动发现规则 "%2$s" 引用了不合法的关键字 "%1$s"。

en-us	Invalid key "%1$s" for item "%2$s" on "%3$s": %4$s.
zh-cn	"%3$s": %4$s上的监控项目 "%2$s"使用了不合法的关键字 "%1$s"

en-us	Invalid key "%1$s" for item prototype "%2$s" on "%3$s": %4$s.
zh-cn	"%3$s": %4$s上的监控项目模板 "%2$s" 使用了不合法的关键字 "%1$s"。

en-us	Invalid macro "%1$s": %2$s.
zh-cn	无效的宏"%1$s": %2$s.

en-us	Invalid method parameters.
zh-cn	无效的方法参数.

en-us	Invalid network discovery data storage period: %1$s.
zh-cn	网络发现数据存储期间无效：%1$s 。

en-us	Invalid number of parameters.
zh-cn	无效的参数个数.

en-us	Invalid parameter "%1$s": %2$s.
zh-cn	无效的参数 "%1$s": %2$s 。

en-us	Invalid params.
zh-cn	无效的参数.

en-us	invalid Prometheus output
zh-cn	无效的Prometheus输出

en-us	invalid Prometheus pattern
zh-cn	无效的Prometheus模式

en-us	Invalid refresh of unsupported items: %1$s
zh-cn	刷新不受支持的项目无效：%1$s

en-us	invalid regular expression
zh-cn	无效的正则表达式

en-us	Invalid Request.
zh-cn	无效的请求.

en-us	Invalid response code "%1$s".
zh-cn	无效的响应代码 "%1$s".

en-us	Invalid second parameter.
zh-cn	第二个参数无效.

en-us	Invalid tag "%1$s": %2$s.
zh-cn	标签无效 "%1$s": %2$s。

en-us	Invalid third parameter.
zh-cn	第三个参数无效.

en-us	Invalid time period.
zh-cn	无效的时间段

en-us	Invalid trends data storage period: %1$s.
zh-cn	趋势数据存储期限无效：%1$s 。

en-us	invalid trend storage period
zh-cn	无效的趋势存储期

en-us	Invalid trigger data storage period: %1$s.
zh-cn	触发器 %1$s 数据存储期间无效。

en-us	Invalid type for macro "%1$s".
zh-cn	无效的宏类型“%1$s”。

en-us	Invalid user sessions data storage period: %1$s.
zh-cn	无效的用户会话数据存储期：%1$s 。

en-us	Inventory
zh-cn	资产记录

en-us	Inventory disabled for host "%1$s".
zh-cn	主机"%1$s"的资产记录被禁用.

en-us	Inventory field
zh-cn	资产纪录栏位

en-us	Inventory mode
zh-cn	资产纪录模式

en-us	IP
zh-cn	IP地址

en-us	IP address
zh-cn	IP地址

en-us	IP and DNS cannot be empty for host interface.
zh-cn	主机接口的IP和DNS不能为空.

en-us	IPMI
zh-cn	IPMI

en-us	IPMI agent
zh-cn	IPMI客户端

en-us	IPMI interfaces
zh-cn	IPMI接口

en-us	IPMI scripts can be executed only by server.
zh-cn	IPMI脚本只能由服务器运行。

en-us	IPMI sensor
zh-cn	IPMI传感器

en-us	IPMI sensor IDs and other sensor-related parameters. Returns JSON.
zh-cn	IPMI 传感器 ID 和其他传感器相关参数。返回 JSON。

en-us	IP range
zh-cn	IP范围

en-us	IP range "%1$s" exceeds "%2$s" address limit
zh-cn	IP范围 "%1$s" 超出 "%2$s" 地址限制

en-us	iregexp() - Regular expression V matching last value in period T (non case-sensitive; 1 - match, 0 - no match)
zh-cn	iregexp() - 周期 T 内，最后的值与正则表达式 V 匹配（不区分大小写；1 - 匹配，0 - 不匹配）

en-us	is greater than or equals
zh-cn	大于等于

en-us	is less than or equals
zh-cn	小于等于